This book was produced in EPUB format by the Internet Archive.

The book pages were scanned and converted to EPUB format automatically. This process relies on optical character recognition, and is somewhat susceptible to errors. The book may not offer the correct reading sequence, and there may be weird characters, non-words, and incorrect guesses at structure. Some page numbers and headers or footers may remain from the scanned page. The process which identifies images might have found stray marks on the page which are not actually images from the book. The hidden page numbering which may be available to your ereader corresponds to the numbered pages in the print edition, but is not an exact match; page numbers will increment at the same rate as the corresponding print edition, but we may have started numbering before the print book's visible page numbers. The Internet Archive is working to improve the scanning process and resulting books, but in the meantime, we hope that this book will be useful to you.

The Internet Archive was founded in 1996 to build an Internet library and to promote universal access to all knowledge. The Archive's purposes include offering permanent access for researchers, historians, scholars, people with disabilities, and the general public to historical collections that exist in digital format. The Internet Archive includes texts, audio, moving images, and software as well as archived web pages, and provides specialized services for information access for the blind and other persons with disabilities.

Created with hocr-to-epub (v.1.0.0)

The text on this page is estimated to be only 1.59% accurate

1145 ?tfii to^f,1l#^'5fnto «nl fir^FtTFI'Sfntosill 4 tw aWI-KM i^i to anl 3Tfifc "P^r^n fq?n sjii 6 3lk"Pm'^TM^f3TE;'q^ij3ni 7 y^HH T^m ^7i to?n 8 3?k^WM£>ll4-jk1'5fnto«Hll to^ftWra^%m 3rh: %w 3 ^fw ^n ^fh i sn i 9 dR^^toR^toan to 3wh 3 ft^f^nw l ^fRfelW 3TWFI ^n to ^n 3rh: 3TWFI ^rtf^w^Tl 11 toi?m^i%#rff^^^TT^T 12 ^

The text on this page is estimated to be only 1.45% accurate

f^ 1:19-2:16 1146 "•Pfefttl 19feti tf ^1 £rj *tt ^t® ^wt an, rtt it: 23'1:?Ht, w ^ ^dd^H ^n 3rfr: wn&\ sfcwf^ jj*^ fad ^|Ai#y^ «idi3ftcnfe ^ff 1^ 3TR7WT ^ ^#R %m\ ^ ^=T% 3^Ft 3TFt ^T T?T snl fcR ^st ^W ^8?H 3TM ^?f ^w «n^ «n, ^fadKN-H^^qr** 'Ml 105M^FfR^^gi ?ir ^ ^p 3TnP

The text on this page is estimated to be only 1.79% accurate

1147 Wft 2:17-3:14 3TPT^lT'ftW[|^?3 3^(1^1% s|dI R|44I3 &KI =b^l JHI^IW =HH LRIfSIT: l8"TFn? *f J^'JTOTTSPDI'^'HHI JI-MI, S)|K<\H\ IVd-H4^LKJ^<=Kf} 311^1 4l# TRFI %TT #n'i5F^H*Toiiwo|Tf'Hl^i5rf3iiil 93fa^?r #E?T 1% 3^ 3TTq 3 ^f ■Ef^TT ft ■SfTFFt ^TTI 1% il 10qff^^ff^R^flfTTM^^EJ=fntl 3TTT m oiw % ^ ^w ■era ^# ^?n cjnz "Prfit ^i^u 3TTT f^R "3^ 3TR ^f ife fen ^1%TJ| «m(d+*4i ^?n f %^t oif # ^r ^m an^ ~m?ti t, ^"^tl^Wd^' qfe 3TTfiT13fk aTp^f^tlLlid-WI ^III 123H%fT8JfTfd^obl^Nt"feltolW 3PTR 9^ 3rk ^ sft %ft 3?ft if ^rfcR ^n ^r ^*ft '5fnq;":#t'g^ftl" 13

The text on this page is estimated to be only 2.60% accurate

*tft 3:15-4:21 1148 ^^ "CTRT "5PTT 3TRT 5?" 153tTT *f -sft^T "^ ^3^ =FFT, "31^ eft f^ "f^ft tor ^ 3ri i^f, # m ^m sm\ afo ^'^^to^^^^I^^^to^cP? MWj "3 ^tTT fen, "TTRot if #R3I f: # m*W % W3~& fd=b

The text on this page is estimated to be only 0.90% accurate

1149 *# 4:22-5:20 3^ "fq^n ^ wte ^tt ^s% ^ w f^l % ^ft #nf ^t ^?t afk ^t ^n ^t=tt 23%t ttr^ wfa afa t[ ^t ^isfaw? 3 wf %TFq%^HNK^n^q^T^TI3fh:¥T'^7R ^fWafk^mf^^T % ^<=bl yid4->

The text on this page is estimated to be only 5.83% accurate

^€ 5:21-42 1150 WW *IPT^c|l«l$HI^III 3^^^ 3^f^^8J ^^I'at^ 3W3T,:R^r'^":TT^^3TFT%#Ef ^t ^ w5^ ^^^ra 3# #ftl 23"^ld5 ^ ^ ^t ^ 3FRt sqfe ^si in f afk'q^^^T aiq^^f^sj^^if^Ti ah ^f#lt, "Rff tt tn^rji ^ ^ -^ Tnf_-qjf ^ ^cfn ^ | ^TTtr* 28f^Fa^?F#^W?nt"fe-4i<

The text on this page is estimated to be only 1.61% accurate

1151 *# 5:43-6:18 wtifa~ui[ 7Tf3Tf3 ^fajR-SFTtl #cF| -4ldHl^t,^=T% 3jfa 'fqffT o^t "feg ^TR ~SR t^W oRffofi c|? ■jfl" 3rfr: «q#:?ra'qT^f^Ta^m^H| ylclMwl %Hl ■qr ts& #ft tjisri ^r=n ^nwd I ■dife n>i ^% 3mt cjfen ^ ^n ^ afo ur «F5 ^R% ^ "^ ^3m3 LKH-'te'^'aiaRT'^TlfcFT tkl mH-flcIT 7"^i5j dH tjistri xjjqf % Hut §TRT ^# T^rnl 16"^r gn ^rare ^?n nr 7jp ns^ ^qfferf ^ tr i^at'i c+iiTfc+i ^ T5n? ^511 ^ t^ ^n^ 5 ?nfe 3 nfff ^t Tii?Tpi % ^ ^rara ^7 7% f 1 3 ?F# ^Rq ^W?n f ^ Hi" T1?n # ^=T5fn yfd^d ■qr ^si t^i 3fh: 3tcrj -^ sfr 18?nfe #q ^ ^ TJTFl'isFTI

The text on this page is estimated to be only 0.85% accurate

*tfl 6:19-7:10 1152 cfrft 3TK #q ^S ^7T 3ft I #T tfe WMX ^ ^ TW?lil 20^ir^ 3}qft fcH^i wR I'W mt^ ^^fit ^#T"=T5S'=#'^T^I 3fk^tT *ftwf T}SMJ||ctH^T^I-#qFll 21-4K^1^1fd^KI *teir #n oi^f crwi ^ *ft Tim I 22"7rcfc % 1%ft wm ^t wfa 3fc ii ^nfoft ^fe ftft 3fe ^W I ?rt ftn Tiro ~mk y*i^i=iH TijJll 23&i-d ^RdTl 3fc'JTtit^Httkl-HKI #3r ^far I ^ 3?sj 3¥J^^^^W\ ^' T^ 'Sift *ft 3^T ^37 ^f^T f? 28"3ftr ?r 3^ ^f ^?t ^rf #^ if? #^t ^W?Tli% tyrlHH *ft 3W^ -Hi} 3ta=t%*nsi^i t} f^T^t "^ % TRR *ft "=#' TM TI371I 30^ld^ ^R ^ft 48Tt ^ # 3TR ^sftf^T t ^ "fe% o^f ft t^31T 3Tt^q ft^cH-HT^Wt,'^T'^^ 3fh: 3Tfe ^T3 ^ff LISHI^II? 31"iT#lft t^RTl ^?it jit ^ ^ cj^t fe ^ cpn 73#t m fq ^i ■qffl ^i wn ■qw^t?' 321%8wf eTR "^r tr ^T§3Tf % ^ '%^ T?^ f f^Fg f^if SIFT t( Tf^ -^WU 3rk gi# ^f ?rf *TTsn=rr ^w :Enw?n I, ^^ i^di ^^#ftl 3%^^i^?nTra^ft,^Tffe^^i^Ht 3FFft 3^T Wdiy' FFftl ?T fe ^fl 3FFft ft 4^iirn4fFRftll % oRT ofER: ^Rf opt ^t ^^p> % 5% ^IFf -&3\ -q^# % 3TTSTTT W: #n, ^t 'I^CT H^ ^Rff ^i-4M nl #^ Tit ?f| w^\ ifn ^ss^^ Tit tf?it #ht ir "^ "fen ^iii 8sprffe it ^lf #^™rit T^ni,yM ctHdiii^^sf^Tii'qi^niaftT^ teii<2ididiitTW?ni^Tr%i:^uT^l

The text on this page is estimated to be only 0.86% accurate

1153 Wft 7:11-8:6 %T sfi$ ^H WJ7\\\ "^nfoi) ?fc ^fi> TJ*T ^ ^ ■%t 1^ ^ 1 1 # ftwzw i\ *°rf 3 "fera gwi 12"^#l^ ^n °H4$R 3FF} firl^ gq ^FR #qf T?T "f ■5PTfi% "sffeTSR 3ffcsI51TTFf'^f5Hm'5??) l1(Vd&7dHI-Hra ^sr ^n: ^tft ^"®3n afk^fi, "fn^^'M'ft'R'En??nt"3fe'ft^!" zfc ■^wt, "^a ^t ^k *f f^ft ^ 'j® 'ira =t)£Hil 'qr ^Fra % ttoi^^t ^ 3iq^ 3nq ^"feaTl 1w sjtR; ^frjT ^ra *^h^h ■qsN, w ~M\ ^tt f^ft ■5rtti |3n ^r?n, 6"q«j, ^o ^ cro -er ^f ■^TTT'qfTtl^

The text on this page is estimated to be only 2.93% accurate

t# 8:7-31 1154 7cIR R^T 3 RRT R1R5P R R^l, "3 R1RR ^3R 3R*51RR%I" %n rito R ^3RT feti, "jm, R ^R ~$FQ Rff f 1% r rt rt 3 riri ^t#ir %rr arw 3 ^,RR ^kKI-HdlctjWtRlRJJTl 9q?R-RFiRTf'RRppR'Rt f% 'RfoPT' RtRf^RRRRTill" 103JR RWj R R? RRT Rt ^f^\ WiR JIT ^T^ Rt ?TF1 ^R% R© 3T[ Tl R,^RRR}?1, "r"rRRR?R R^RitRR^dni nwn feRra s^wi^r' rVIrrrr' r^rirti "RR^RfafcRdTditlR^R^RREf 3TTC Mf^H R 3TIRn 3TR 3 RiRR' pn#T, $HSI°b 3rt rtr^r % ^nar wf % tft r' 3tcrt_3tcri t-rr mm °bT'"l 1 12&>-d ^MRnRRRdy^Mi^ 3trt t( grip^ ^ 5nM ^f r #q Rte -rrrt rr?I ?>ij,'#TR)R?lTi»Rr 13R«t r^t r ^r +)HHi-4ob R r^t, "rj rri # rt 1%i?, 'ft, ^rt rr fecira if afk dr^M ^3R RRH1R5PR71 ^TR 3T^R ^rrti % R*T RfRf cPt #F RRRT 143fa] rr r^tr % rt rjri ^rr rrtr r3 RTRRRRSRRylfed fokKR'^^ail 15rTrWt r ^ 3rr wir r f ri 3TR ^rrti p ^rt rrt I 1rr ^f ^t 3TR r^t Rft t^ri rrr wftl ^si-HTsHjiRt^u-Hi Mm«gd^^#nf RR#PT RlR&HH'^-ilcHli? Rfl ^4Hlti 3TR5lfM opt 3Ufn ^ fsp -if ^f % TR^ f^RR ^ ^FTl 1!W TO ^t y4vihWl ^R% rr? sm 3TR %n, "^r , ^ ^wf tt ^rVtt, r r^ R©R#nl" 201R RT RWj R ^RR R^T, "dlMlS'MT cpt #5 3RT 3?lRR^%Ri%Rf%R{RR'^|iRFgRRST % RR % RTO RR f&RR^ RR Rt RRf ^ anR Rff 1 1 " 213fR ^R% 1T5P %sq R ^RR R^T, "RR, R# R^RTRR aRtRfqRIRRRTfRR?! 3TRRfRRl" 22&j-d 41^1 R^RRR^T, "R^ R^RRT 3TT 3TR tn: jojf rr 3wr r^ 3m RifR ^ I " % R*T TjqRR R5t W RRRT 23d«( 41y ti+i Vlild "^TRRtl 27#d RJRRl R I ^?ft R5fT , "R? RRH ^ffRR t ? 3lM RRR 3TR RFR R^ 1R^ R^ RR^ I ! " 2%M Rt5T ^ffel % ^R RR , RSRiRRt % ^T R|RT, Rt^R^t^lRR^IRR 3n^^"5JTirl5iR^,iRR4 ^IrHli? RTl R "I^R RRHRJ R fsp ^R TTW R R?lf fR5pRR5pR#fR5pRT RIl 29^ iR^nn, '% RTR^RT % R5I, R fRR RRI RI?RF t? RRI R RST f¥^Rd RR3 R R?^ # IR' % ^R 3T1RI t?" 30^gloj!^'ft^RTR|aRR3RfRnT^^Rf RT TIT RIl 31RT^R ^lrHI3TtR 3R^ ftHdl

The text on this page is estimated to be only 2.00% accurate

1155 *# 8:32-9:19 32Rt Rt?T R ^3RR oPIT, "RR ^TT3Ttl" Wt R ^3R o^ftd-41' R' ^ s[lWT t%5P?l 3TTIT aftr R3Rf R' ri ^Ifel RRR1 ^R5 ^IR R tR!tR>t tr^§ HoboijlcWopt^giU^obMlH*+til8nl'%J '^^T^'opn, "^■qi^^E^n 3nl"iT4'qTtMtTg5T 1 3TT 3TR ^1% if© lt%Hl 10^ai "?3TT fop ^M "^ft^T TRft % W 'oW?l ^ ^rft <=W ^n ^oTH?n fr* ^[ 8fM ■opt ^if, ^frop nfcprf =pt ■g?n^ 3miiI" %| ^ft 1|# Spf-%F^f ^ f^FT I 14fqR smldwi ^ on^ ^i^TT % %sq %t % ■qm ^ 3TR ^?ra xist "ir 3tr ■q^M ^tt-^tt 15fqR ^ ^ ^ wm\, "wn ~^% % Tn?ft,^ra ?Top ^^t ^qcp mat f ^ftop tRl Tisp^ f? fcp^ it TR^t ^ ^3t 1R 3TR ^qoTO ■opfTt I 16"f&RI fflopt T# cpq| opi TO yRt %TloP ■qT opff ^Rlf ^RMTcPlffcp-qi -fe qlvilob opt 3TR3Tfo1op xpis ^rn 3?R opqf opt 7sfa 3^ ^3 ^ftl 17H4)I

The text on this page is estimated to be only 1.41% accurate

Wft 9:20-10:10 1156 TZR eft TfT 8J1 | o|f ifl# ^ ^Wj % ftsFS 3TPft 3?fc "^rfe ^ ?rRra *ft i^pn ^t ^w, nt "afe Ft ^Twiftl" 22h47F,c(F##TFtFl"W #nf ^ w: ^rfen "w ^t *faj "3

The text on this page is estimated to be only 2.97% accurate

1157 *rat 10:11-36 rj?ti, r • • ^ u"rr Rtr R^ R^Rt feRt r*r rt "To r' ^narr Rt irai RRt 1% oi^f feRmt'R r?N ill ~Irr R«t RSfi RfT "517: Tit R^ R°fi R1T it RR R 3tl 12R^ ^R f^RRf RT RR R' ^T3ft Rt ■qfi^TT % Rftf R71 ■Hc R^ ^TFT 1TTT, ^3R fsR ^3R RTT R>t ftarfrl R TKlR 3Tk 3RR1* RTR' R>t fe# Ri?f RBtftlT'ttT stor iltM opt % R*t %FRt 16"R1RSTR! -% RR? T$ it RT1T RR TIT 1 ^R 3sf Rif ^rffRf % rtr r' ^n ^i # #tf R>t dTfR RT5TSTR TFR R'tffe 3 RR> R^t sHIoMRf^T 4^Wdl'^#t^t RTT^cFI RR^ RR-RRTRRff R'RMit fticll^ll lsgi| ¥IW<=bf RTT TIRTRf % R1RR ^T Hpqi RT^TT, R^ttfe ?R RT 3TR^TRft itl R># 3RTTR R-MMI^IltRJRR^RRtRTT 'hRlM RitRTRirR'RsnwT^N 19R^RR>'roi RffRRT RR RRRT %, RR? RR[ R^TT 1 3TR RT*t RTl^TT 1 1 r*tPfj ^r trrt rr? «trt fen Ri%rn % rr? rri « ^Rl^R % RRt RRR R71 R^^R RR RRt, RR5^ RH RR^RRl 3R^TTtRTTl 24"f?M R^ R? it Rf7 Rlf itRF 3?fc R it R7t^ ^IR3RtRTRlRtR^fTit?nil 25fR^R?tR?% RRRTllRR'3tkRlRR^fTRlRt'%RRRTltRR'lt ■HdlN

The text on this page is estimated to be only 1.50% accurate

*ffit 10:37-11:19 1158 J#oP7 7:6 37"^Tt 3FR "RlcTT-"fqcTT ^t 'JfT ^ 3Tfsi^J jfa opr?nf,'oWRTifR%'jftT'T':iffi|i #3^^ ^ft =Pt ■gfr^ ^tra -rain; ^^n f, -^ ^n -^ % 'Tfa'RSTfl 38oT? # ■^l?RT3Tf =TiT 3TO1 9RS ^ +xr1 M'll^T cpT H\\v\*i Wl'lcl =Md ftfcP c(f ¥l^T 3Wftf ,^ wp wt sri^ra ft#Ti ^rr foptft *^t 3rmjft opt 3 it foptft t^p cpt *ft "^#^ t^p fwm ^t 'qpft risp^isp-sif ■^TT3gzjpftf,5Tt^[gi#+(r4 ofc^dl f fop ^ "^WT yid^d, HSM-4 ft, fsRT fr# Rff T%TTTl" nm'A m% ftrsff cPtwsicpK -hh$im "# -^5 cR -gq 7% ft, 3TtT %*3 Tl ft, ^ToPT ^Rl -opt ^n3Tt fop, 53isff opt atfsi "fe Tff i ,^-wii w "qr Tf f , optft^oFt ^tx§ f, ^ ^r Tf I 3ffc r^ jq; f^nq^Tffl 3Tk ^H ^fW R' ^RToTTT ■oPT VRK fopqi^T TfTf I 'olf £PTf ^ ^ ^FHl ^oPdlfl" r' #if ^ ^n % ^h: ^f ■op?^ wi\, "^r Urn ^ ft-MNH^f^n^^3^ft?oMopi|+nop^i?^r f^T^f arraRiTflf I "=#! *at fcpT gq 'oWT ^^ 3Tl^ft? oWI l^ob y^iN Pi+|^ cjjd 3T&^ oR51 4^^l? ^t^t <1t|H iSop 3TH 'opt ^rfoTK^Mt o^t ipft sft, ■qw ^f=n oift "qf^nf tl '^Tt^^HoPdlf,^! 16"3TR ^ft iftst % #rff ^ft -g?RI ^' foP^ ^ ■oP#? ^ ^Mff t[ ^ ^R ^^off % W1R f # "^5P ■^ ^ ■qopR opt op^ t| f 17 fi^^fn:f^'%ft^Mt, 'cR'dq":lff":TTofl fR^Yftopiftd^ foP^gq"=#Ttqr 1 Vrffi^T ^ 'own ^=n sm\ ^rr "R 3rtff ^ft Tirf ''ara «n 3ftr "r ff 'to «n I 'qr ^nf "^ 'opfi an fop^r^f^i^ifi 19fq^;wq^n'g5!3iFnl^t aftff % *fir ft :sraT-'tfl?n f , w: #n 'op?^ i ^ 3T15ift^t^r,^fqst,iy-MotoP^tl^^llo|^^ wf 3ftr ■qifwf ■opt frpt f r fop=d ffe ^ft ^swm ^1% -oppff ^ %5 ftft 1 1 "

The text on this page is estimated to be only 1.97% accurate

1159 t# 11:20-12:12 3#?riM ^5t % w\ %ficFft 2ttfRR r)?tr^r RRffRR-fijctctjKi Ph4^rr RWRR 3^4*4 IrTR Rl RRflR}RWl%#'Tf 3 ^^H^stei 3rh: 3rri rr ngTfiwwi snl 21"3R. SWFt^MlH, 3R! 3?RFtRRR5T* c[R^' Rt 3WRRR7R fsRR RR, R^ R RT 3Tk R5T Rt %R ri^ ■#" rf( % #n r?r r^ % # "sis % Tfr^ r*r 3Tf? RR 3?^ 3RIR 7RR. RT TM R?T* ^T 7^ ^^RR^|ITRRlRRJR%-if)R|' 22f^g^'giT #nf r rjwri # ^rir % fe rt 3rfr: fki * rtHt-rIr Tpt3TfsraW^4l'-M^J|ll233fR3n:ff ^ ?fi?ir t} rrir rt! n?ra op^f 3?^ •?tRtr %R^3FRTR.Rl#R5tTp3Rc|RcrER 253R 3I3RT RT RT?T RTR1, "RTR fq^i ^ ^rf 3RT £T^ft"^n^5fFft%,^ ri<1 ■bdid'^T^TT'f ■^?fi% r^ ^r rirt' rr, ^rr rt *ifr t sfrr *w#ku f , Hsrtrr Trait l aflr^r RlRt ri^I ^r%#i^ yobife-Miti 2(yHmn fidi^f^ldi)|3n^Tffe R^^TtFt'sfeRJRll ^'^RTRl^^T^R^R^TTffof^l? 3TR °ll-kio| R' -q^q fq^j % 3RT1R1 R?tf tft RR RR Rff rfirii 3TR^tf *ft'g5r%aidNi 4TraRRRiJil 29RnR3n?ft3RT^R mk TC TR3 Wl "55T^ ^l t3fR^^RT'^fR^tl'aJ%^3?Ll:l&^-Htel-^:l O o c\ o ^IffMf 5RT % afk ^1% f?Wf ^t 3TT#ER 1 /^ W]W\ ^ fFRf '^ ^fsa % i^i f^Tf ^ «q^ w\\ 3TR ^ T)f ^ ^7® ^lrf Hfe ^R m^ wtl 2w)IM 3 "^31 ^ ^3 ^n, "^g, -^ %ST ^W ^R T% f #RWT :?ra % fcR f^n ^M TraT^^Jol^K[I%3FRIR^i^R?f tl" ^T "CR "%T "3 ^~R^ "qi57, '^TT TFT^ "R#f ~^] % ^^ 3TR ^i% ^#prf ^, ^ra ^f «R3 wft, ^n ■^ft ^ect| Rfet ftfsRI ^ m| ?ff? ^iwfq ^a^t 3TR^I%^#PTf^

The text on this page is estimated to be only 1.21% accurate

f^ 12:13-35 1160 13rR ■%! "=) ^ ^ni iw "sn^ srmtft ^ ^n, "3Tq=nfl?l 3}Ft^3Y' 3rfr;^R 3[tRlflSl 3?Ft^fl ^=pi ^ftci wra ani 14fq^: 'q^M wi ^ ^ ^ #6HWtl 15^t ^ ^th "¥11 ak wi ^ ^ 'qfi l ^ft 9% ^H%TT©^^l^r^^i^Tl^T^HT16^dMHl ■^fl siT'cWTOft: 18 "^^o:tej|,i^^^'li 317=11 '3Hrtn' w^r "R T#n Q$\ -4W tflNUII ^Tl 19 ^^^H^'^ld'll^l^JI^II^ 20 ^W"^%-H| 28q^lr^|3lf^t M*H^cK%3Tl^i^^3H^\ c||

The text on this page is estimated to be only 3.98% accurate

1161 srfl 12:36-13:11 ftoddlll tospi^P spCltoii #cRjf ^to ^to,toto^'31dTH ^3T>rto to rnsft sitoit, to% m tot % to wtr fi to^^to&TTto tot tot 3TFC ^T 3t to ^HHTtosl^TTtol! 43"^m "Ept^ ^IrHI tto tol) cpt toft 1 TTt o|f 3TFCW cfft to 3 ^t tot fs# ttoft 1, ttoi^^tototol 44rra ^i ^to 1 % torn cpt^fttoi sn,^[to cigl'dV *i$'i)i^t w ?fto i stk ^ sra tt^ igicft, tk wm ctstt ^M-^fen to 11 45FR cf? toft i 3TTT 3TTH ^Tat^ra 3TFC ^i|rHI3Tf ^t'tot #^TCT ^fffft ■toil "fer^'?M 3TRn:'^iT?^'?toti 3tk 3^ srtrfj-^t^TI 4^N 1 ^ftitT?oi?Nt'^ m^-^g?" 4fq^^r^iT8i^ 3iq^ 3Tyntq3Tt'^t d<>+> ^IKI

The text on this page is estimated to be only 1.57% accurate

*tft 13:12-33 1162 "fen ^^fVji 3rk ^n% -qw ~*w\ arte it «n^nl f^Fd ffh% qra ^f® *ft ^?f I, ^s^ fatRT Tn ^r^qrat,^^"#i"fiqqi^nqqTl 13^ftf^^f ^-R^ ^SIFd oR«n3Tf ^71 JPJFI ^Td JIT «nd ^Tdl f I oRffe -qwfq 3 ^aa" f, qr 7=nrd^ t[ ^ -aps feaif "=#' ifcti, 3 "qwfq TRd I qr stw^\ ^> ^ TW ^fti^o||U|l wt^TTHtt: ^Tfftqa^T^iiTiFtq TRTfl^^-H^ M|i|i|| 15 oprffsF; FT% $ 3ir qidi I, ^r T^feq % ^jtw ^r? qr ^^ artr ■4ldHlif3H?fttHt^;^t'#^J|HJ|Mldlll22^fjf # i, qr tmt c?q "fen^ «fk sr ^n #h tj?S&i ^q c^t ^n f 3rh: ^ "arfe ^qwi "=# # qidil 233?^ 8^ qr fqr ^r ^ 3r«f t, ^w ^qfo # TjR^lcfqTfldTil «k ■HH^dltl ^W -HM-wrl ifldl tl c|f •U'+xrldl «P «lVif^dl-H IHI.W^Hl^T^^pT TR}"?ftftil" "wf=t)l (H ^ra hr nrqd^TT swift Ht ^=T% ^at, gR "qf ^ff ^31f ^A I 3%ra ?r^ ■q^^i "q% %ff cfft ^at ^s? ^ ^r, fq^; T)f "^ ^T "37T "RTt Wt "R't^ ^fl'" 195nf "^t # m % %=th: "Pr "q?i an, ^wt 3?sf an,^e^3Tf ^^ndtli 20^-5fte^NddHlsrc^ |,^r 3TFR%^iatdrt*Miigui ^^rarl 21"f^g 3Tq^*ndT^^ft^iH^'^H^^n,^??M">ft^T '^f ^T TFT T\$ % f# "^ #5T % fRH "fldl t, fe fe-Hi'^^T^'R'^Hfen'fH 32q? 41^i tsli f^^Vl ^Idlt fi-d =4^1 ^^'qT:q?WT%TWt'qisTf qS?) 3TR7T "|T^q 7TlM3Tf qT WW #tt I " 333T^ ^ "^ ^Fd ^«n 3?k ^#-"TSFf "^q TFT Wftr % TRH t, "fel f^# T^t "q ?TF1

The text on this page is estimated to be only 1.65% accurate

1163 ?rft 13:34-14:2 *nr z& if fn^iiii 3fh: wi to ^ w wteT *ra 34#g ^ #nf 3 ^f wi ^® |5?Fa--^an3ff % Ai«n^f%i^i ^®4tngT°bgdi «nl 3%n &\M sirfe 4i*l!Mi ^ ^fa^oMil % £KJ # ^5 opfT KfT WTO ft: Mi^oli^oFWllsiJ, "3^Rtop81T3lf % £RJ 3FR1% iM'lll ^fe%^|RcbM^^fwf feLili^l't,^t^^l,li'^#nl" •m^ntfWfTl 78:2 ^afk^iWIi^^peRT^t^sqi 36fi+ii 4Wj^t «flf3FtPwiobii-ER^II3IFtII era ^i% ftrsjf "^ 3?raT ^^ ^fT, "^ % teKMd°lli%^RI^PT3l«f'?if*F[?nr' 37^tt if ^j wfcn, "#ra^ ^?m ^ «fai an, ^ I wi ^pi ■gstl 383?r to ^ wr |i 3ts^ ■^t^T 3?«f§, wf%TTS*T%^FN T 3?R ^P2^ "EPT^ "5fT^ 40"^P ^ ft ^ teKMd°lli ^Pt" ^obddl -SR% 3TFI if ^T?TT 'fell "T^, ^ sfl ^fe % TO if #TTl 41^FFT opt ira 3^ c^ff ofjt ^TT 3TR 3 ^3*1% TFT 3 TWl TlM opT 3TTT ^TOTt, # ?M o(?r ^m %1c^inTTT^TOi|, 42 licT 4teT ^ "troil 45"TTO ^PT TFT T^P T$ °HM\(\ % ^FTH t ^t 3T^TTnM^PT^T3rif'?rl 4 ^Tl^t % ^FTH #fl felif rRf TRf "5f^ Hsstel-Mf Mc+,dl 'Kill "^cl? ^M'crom:rFn nt^%=Tn:TT!:7#fi%^nTRTi a^^f^-spr 34t**l H»ld4»Ti i dlohRiil'if *R ?fl 'l4i*^J ^SPR IS^pff Mbnl Wkd 3TFft 3TR SJPWif^T#PTf^ptW ■^T50qsra^qTf^'^Tl%^Tt^^f5j4H ilHI3TTTTO ■qi?Fn#nl" #?" ^F> ^TT fen, "FN" 52%T ^ ^=T^ op?T, '%§fr, ^iil&^ Ti y4vihWl ^4ii)^=(i %TF^^^TOl?,T^P"i$ '^ic||Hl %iRHi,^t3TO^'^R^^-'37Fn =(id3Tf^ ^lfTiHobMdltl" % ^PT 3TF> ^T ^fedT 5:Vl^Rl^an3Tf^-HHIki? 56=wi ^obl wn si^d' ihi} # 41^ H^l'l? # "I^^^^^FRllT^nl" 57#^S^-w1

The text on this page is estimated to be only 1.42% accurate

^ 14:3-31 1164 T^'tli3R^-qf '^^Hrobnl'oFtoFTrntl" % o|^l ^15-H an PtH^ -4SHI cpV^tsRT,*^ 3 #*, 3?T Tf' ¥M fe «n I ^ ^OT^ iidR-MI-H % oFf3 -qr fen an, ^ ^ ^% *nf fefew opt ■qcRt affl fe^nw: ^ =t)gi'5FTtiT«iTfe"sj^ 1^% *naj ^wf tw^t "ETTf^i" ^ trfe ^ ~hk si^ri ^di »n,'qT^#nf^^T?n an =wTi* ril'i ■q^^TTopt H^l HHcl a)| ^^artffeoFM-H Rh aMT^fefeWcjrtM^fe 3TR^op%RHf % *P^ ^TEf ^FT tffe'oFr < «j4id-wi^ oii3tfet^3tl "^^^n'oFlfean^ft^T^ cRtfWHWI3fa^ ^% #nff ^Ft 3T&WI fen l !%rawRjf ^^i%%srf^^i%'qra 3ttoft # *te "oFf i°Ki 'or, ?nf5p ^ fffoT t[ «n op^ 3ft^ 1*fop;g ^t ^ ^=r> ■opwt, "f^ op^f «n^ op) 3TloT^opaT T^f 1 1 gq ff fs5 W^ 'opt ^tl" 17-3^ft ^1^ -oPfT, "^RK 'tTO 'tffoT fnM 3TR 3t H»l?Hif opt Wte oR 3?ft ^S "^ ll" 18^T"^'opfT, "^% ^■qw^3n3fri" 193^ *ftf % #>Tt ^ ^WT % 3 "Etra ^R "oT3 ^1 "PpT 3^ -ot mT^ Oldiff afa ^t H®\v\M\ ^ oR ^opf o(ft 3TR^T3TR #^-op"f^ CR^oH oPI sp^m fop^Tl fqR Tt^t % ^op| nlf 3?R ^| 3^ %sqf ■opt ^ fell ftMf "^ ^ JopJ #rff ^f WS fel 20?Wt ^ Wop oPT Will 1^% sIR «fc) JII ZcFff ^ ~S^B %^rf "^ oJRf StoPR^f qffl 21"feRf 3fR ■5T5qt^t "gfe -5PT ^Fl 731^ ^ ■opt^ifN 'fjlR g^ratl 2VA ?rtt '^TR %t ^ 3iq^ %srf opr "=iioT -qr ™i 3?R ^5T ?T5P ^ site opt fel ^, ^-^ W^otjl^-^-qniSiq^^-q^Ft^T^ot,! ofjgll 23*ftf opffel of,

The text on this page is estimated to be only 2.43% accurate

1165 T& 14:32-15:26 323?R ^ "=WCR ^S 3TPtl Foil ?W ^FTtl 3%57 ^ % #rff 3 %I opt lot^TfFt "nf ^"Pr^fi" 15?M"q?rra"^^^"oFWl, "W^f 3H4fo|7|dl ^fF^sft 5IRloFT3?i>f^m" 16%T ^1, "oWl Hi? 3M *ft ^TWf ^TR?l?t? 17oRl qra 3^3^ pHdl ob^Wt/'^FF'lK i© ft^ldljf 3TlTFtF,"^^TF2H" 24%t "^ ^tt fen, "g^ %om ^i^ % #qf ^7t7§ftf f| «M"oF aq^noTii^t 3TR % fe^ "=#' ^"n^iFl" 25?ra ^r ^oft ^ #g % ^ra^ foF -^r fei?ft offt, '% "5PJ, ^ft TSTT "oFT ! " 263tTT 3 "qWT ^ "oFWl, "^F ^fed "=# F fe "5T5off ■^■am^oM

The text on this page is estimated to be only 1.42% accurate

*rat 15:27-16:12 1166 27o(f ^#; "qf -gfe f jpj, ^RJ 3^ ^3fFTt ^ %r ^ "Pft w ^ t( ^ sfer ^Fd ?rt"ER % ^ o * e\ o ^> *f)73Tf)^f I" 28d^^Wj"^'5RFl,"^, fRT"fecfra sgd^fTFl ;3TTd,EnFdli|,'qTlF>l" 3Tfr: dc=H£\ W 32?r^Wt^ 3w^ ftMf c^tto jriwi ! 3TR ■q^fUM 3TR *kM' % ^R ^ ^ ^ ww^itefawi;wis\vi,w%,''i\wtw I, ^r^ w< wm% ww\ w% "fe wr w\$ ft?) ^nat "3TT 31rq fecllIM, m 3TFRT ^ 3^ 'qR? T$, H ff gl ^ % ^ ^f °Wl -HH T% Ff ? ^TT cR 3M *ft "=# ffRfi^ ^ :jw ^r^ % ■qfef wwr ^w w 1^ "^ Mh^

The text on this page is estimated to be only 1.82% accurate

1167 Wft 16:13-17:7 133R ^Wj cWlR-41 fefenfl % 5^T 3 3TRT # ^tr 3^ %sqf 3 wi, "#q ^n ^w?l I, % ^ tr^t ^?n ^ ^fr f ?"* "•3 O c\ 15^Wt"^^=^'^wt, "3t1t cr °wi 3ik^T'q)##^l 25#^tf ^t^^r 1^p) aT^RT ^r ^P>n, ^#t^ ^m^n I 2M^^3T^Ri^f)^:i^TTnTiT^m: ^W^f) opl^ ^^n^n^T^^nf? 27T^f5?n'g5r^ffT#?T ^4^1 4

The text on this page is estimated to be only 1.02% accurate

?# 17:8-18:6 1168 ^f wt vi «ten, "sft *w, ^ai Steffi" ^ra ^?ft 3wt 3M ^t| Ht ^?t mi ^ ^ ^t 'rfitI 10fqn: ^s% %^rf 3 ^s3 wt, ^t 8)4«ii'Wl C\ Os f, oif ^r ma opt ^tcjfcs^ mi 3tti 12f^Fg 3 "ettft ^rai f^n I ^% un m % ■gst cp) *ft ^ •A "M ^lf% ^T 3T^I %qi ^JPTT 14mt ^ 9% t[ WW -SPH cTt T^ "STivli ^S% ■qra 3tm 3rk ^ izmi wm mim %n, 15'% JPJ, ^ ^ ^ ^TT mi I ^ Irpff 3?Fft t 1 W ^§cT ?i?qdi 1 1 m zm -$ m 'qpft if 3^fr "f?R?n ~^m 17^tt 3^1^-5^, "3^ *rs% fir 3#p?circft #nfi ^ imm} ww wvv( ^m ark tifji? "fer^ ww ^ f i?t ^pwt w^n "#m ^ ^ifi ^"qw Os ^> Cs 3R51'ift'rF[ll 19fiM mli$:mii-$ TmmKmmim~c$'smmKmis\\:$\ 6f^Fd^ m Wl ^?t ^T8n ^rai I, 3T5E57 ft'fe ^?i% i# Tf

The text on this page is estimated to be only 2.77% accurate

1169 *# 18:7-29 % %T TSfc i TO, ^TcTlif Hi" 3TFFft # TTOT1 T§fc # tot wra *n tot to 3r %$, ^rai wt

^ TO "^m TO ^T TI HT^ ^TTT TO 3TTOTPft % T^ ^f f5pS^ ?t^|, oTWl ^f^T% Tnat #1" m 1 cpr^ c[T^ ^ITT cp) |ESi^_cp«jj 211tot tottt? %j % ■qirr "T^tr 3TR ^fen, "a^, ^3qq^m^optfibdnl^R m'A yfd 3TTOTs?'=pt^ TO *ft Sffll cPT ^TT ^ETftiT? zrj^ -a^ TflcT ^TT 3TTO1^ ■SPT TTt #?" 22%T ^ cPWT, "d" %=M TIM ^TT, ■a#5p ^[ g^ ■^TFTTf ?T^^ TIclTO WT TO aWcPT?! ^HT 23"TTT T5F1 % TJST -opt c[?Rl ^T? TM T^ =pt 3n Ti5p?ft I #ra^ 3tto^ ^raf t^ ftnra TO?n =pt^ ^ TM 8ft| 21^i5j

The text on this page is estimated to be only 1.52% accurate

*# 18:30-19:19 1170 ^"^^■H^ HHI °b*feTTllcHT'?)';Tsff^T3^T ?ra ^op % #pt, ^ ^op ^w ^wt op^f "R "^n ^, %t *tt "f^PM fenl 31^ cTO ^1 m) ■ET2^T opt 5 < fen t3 =W 1$ I I^FSlft wf% TJ3T % -5FHTH f5T5TI? ^#f 2^5H ^ft qfe ^[ ^3% q)# ft ^f)> #^ ^3^ ^EFTT qfct ark «fl^, "^nq^^feit Rt> oh)| aiml mch) opt fetf) «ft oRRni ^ ^TJop ^ ^=RH I?' 43TR^'WJqt?T"^'opfT, "ohMldH^I SillWrf"^ TTfl Up ^FIH opt T^ oTT^ ^ 'RTT1^ *f , *3^ T^=P ^) 3TTT T^oP g^r % ■^q ■£[ T=TT »n?'* 53TTT oPfT an '^■h) opkui 3^3 Hidi-fqcnopttjte^Tq^rarcR) Tiof) % ^nat ^r ^ |^ «ft T^op Tjrftr. #r Tt^n I ' * 6^r^^rng)'^d'#opT^^q'it^ti ^Kii) tM ■qr^oTT -^ ^tfi t ^ Ioph) *f) w op> awn ^f)op^Tt^Tf%q|" ^■#^,''t^PT'ITOI"^:JT?'oPTr"I%sIlRd foh'41'1% optf q?q 3?cr) qr4) =pt ?r?nop ^ *rop?n 1 1 W ~m ■§ 1% o|f ^ f^n=P ^FTT %3 'OPT ^ I " 8%T ^ ^=T^ oPWT, "JRn ^ ^f "folSTH gT #nf % TPT -opt ^5HT % ■cPRTJT fen 8TTI 1oP^ 'RTTwr *f 13fer ^ttt ^s ^M=pf ■opt q)5T % -qm ?# fe ■or? ^t% Hr -qr fiat t^ 'opt ^i 3TRttorfe ^ ark ^=t% %r -qisRT op^i fip^ ^1% %^Tf ^ ^f Tfeil 143^qr:jti5T"^opfT>"^5^f-^-^^,^:i ^ra ffopt, ^ ■qw 3tt^ ^r oT^rffop ^opf-spi ti^t %rf ■oPTw)fi" 15fer^r^'^f%i%T'qT arcRTfTat t^t afk 'otit *t "oM fen l T^PH^H^f^d" 1(^H -qzf; oqt% anl ot? qt^T op iror arFn aftr sff?n, "tt? 3pri ^sttoR qT^ % 1%it ^ ^n 3tsejt oPFToPTHT^enfey 17qt?J"H"3^'oPfT, "3\t*A\ omif, ^i «ll^ ^f^ y^ owlwTnt? oWlfe 3TSt51cTT%^nr^-§t f ! feT #qftH 3IH^ «i)oH t[ y^| op

The text on this page is estimated to be only 3.59% accurate

1171 ^ 19:20-20:16 Rn3TRRRR'*3Tfc'RRRRqR3TRRRlRK "3 ^% ^a^ 1^ rtu, '"rrrt^Iritri 3Wraq^i, fa>-tj Ml rMI'l fell, Rl TR RRI RfRRi RTRR1 RTT 3RTRT RtRR RR R~t RfRRRTt RRRll 30f5Fg R1?T R Rt RR R?R 1, 3trw it rirr 3TR RT 3trw i , r?r it ^n^fn l " rs r\ "rm rh tft rr} str^r % rrtr i ^ V-/ ^ TJR? RRT 3RTR 3RTT % RiftRt % 1%R RRfT ^RTtlHctxrlll 23RRRfR%RRiTR?,RT R3RT TT3 RR 3Rf RR^ RRT % R^RRRR rrrrr Urii 3"4 RR % 3TWTO 3PtfeR fqR ■ER n Pl

The text on this page is estimated to be only 4.69% accurate

T# 20:17-21:9 1172 % srt sraftt TJ3 ^T ft%?T 17^M ft|?T 3?qft «ITT? ftwf % TITO -M-b^ltriH ^fl TS?T KIT ftl"3!> ^% "^ TTT

The text on this page is estimated to be only 1.84% accurate

1173 srfl 21:10-29 °PT cPWTl ^: #3nTnt^%^m^R ^R^fm 118:26 "^tt ^f IqT^qT *r "n^tl #a w^ wt, "^ ^rfa % 3t?l^Tf^^T^-#Ef^TTt s), ^*R opt" wr :*a% fetil ^^ Trat oift ^r-^i °ft^ "sn^rf cpt ^Mf d

The text on this page is estimated to be only 1.73% accurate

^ 21:30-22:7 1174 30"1rr rw fq?n ^r} ^ % rr? wr ark ^rr Ri R*1 ~£\ R^Tll ^3RT r' ift R R^l, *Rl fl', WK Rf WRfil 31"«iR[3Tt"?R #ff r' r rt RdMi^di ri,1rrf} few?" ^?r}r^i, "^^1" r)?t r ^rr r^t, "4 rrr rrt r^rt t ^n: rrrrrir 3?k item, w*ftm % tfr r' gi# ^ olMl -4£HI d^' RtcRRH m\ { l-kil Rtell^ 3flRI 3?k dH^ d^' |o|!MW H^f fi-MII Pb-rl =tH RRRR rirI 3?r Riprf r ^rr' f^v°ii-H Irtrii crr RSf R? ^31 TTt Rl RR ^> R^ f^RFn 3fa R 7t ^3R RT fecll-H f^qTl" 4T'll'H«l J^?RIR'?l"s^'^?t'5ra?l R'3TT^I3fri' 5"^T #Tf ^^ ~S$[$ «3TH R#f 'fel 3TR o) ^ "T^l ^1^ 3FT^ :^Tl' R' '5F1R '5R^ "^W WR Rf RTtf 3?qRRRR8RdRTl 63TR R7® #rff R Rf TFH % +)c|obT RTt R£Hf RR ^R% R(at RR-Rfe Rfl 3fk^lRR^Rl 7#TRnRWtf8W?)RR3R[R

The text on this page is estimated to be only 0.95% accurate

1175 *rat 22:8-36 Tfep ^ I ^?ft ^ IcRRf opt *fa % W ^TJT 8"fq?T TM "3 TfoT^pf Tf ^PWT, fsraif #»l iklT f IVd^H^HHWI an,^ spfarfrwj^l '$«£$ Wt% Hotobd1'lT^T3ft3Th:Hqi^#tn3ft"Sn? offt ^iort "qr "gcTT "^raitr 1%3^TM3?MHt^f ^3TF} T^5p %FH ^rfcra ^T f^ foToW % °T^t ^f W^ ?fl 12TM "3 ^S^ ^isFT, % "fooT, 1olW% ^T5! W^ foM TI W\ #TT %Tt 3fl fpn?' tr -^ -sqfo ^ISI-TO Wl '5PT ^1?T 3^sfr '^''fe ^Tl ^^Tdl'l ft^ 3rk ~zfc\ 'tft# #tr If 15fcRT qottlM ^ ^^JoFT T^oP TM «pi fTOTf 3 W «ira oft Tif&TfT oft tjf fip q^j ^pt ~3w£\ zm\ #

The text on this page is estimated to be only 1.24% accurate

Wh 22:37-23:17 1176 ^ttri ^ifi^l"* 38^iw *rar} 'qw?n 3ffc Trai} ^fT 3TR&T II 39ftR "^RT # s?ffO 3H^T ^ f: '317^ ■q^Rff ^ ^ lit iw ^n: ^ra ^ 3fr 3iFt'^'^T?n ^T3Tl^Tf'cRi&%tl" t^ ■a^i wi, 42"tr% % ^ ^f gir ■5pn #e^ ^ ^?R ^t W&, "'5FS^ -5fnl" 43#g "^ ^W Wt, 'iTO 3T1?RT ^ tfe ^TSc; "^ ^ 'a^' ^w^ j^ Wt rffi "fe 'R fft ?ra3ff ^t ^■ft-Hcbdll?" 463rR^'^f ^^TR^f®"^' -3^ 3frc w^ ^n *nm it ?3n I %J W\ ~^\ Erf-^T^f ^ 3fl#ERT O O ^ "^ ^ ^^ t^tf 3m; *tei} ^ J ^m\ ^th ^wi, "^w^t sw ^\m\ 3fk Hm\v\^ ^fr ^5 3 sfH ^? -qr ^ri 3rh:^^n ■qi^R ^fttI "&Fg # 3 sfns\ I ^ w\ ^f*rtI ^f "=#tl 4^#rft%^srf'cRicRT'^?f^n^'^'t"fe ■^^tst^t ^ #"rt# -sk#rfl"cR s^ra f^# it *ft w3 % 1%q; ■qfe ^ ^f %n?f I htc?r^ 3hr di4Wif 3rk 4>n

The text on this page is estimated to be only 1.02% accurate

1177 ^t 23:18-24:3 Ht ^f® "=#,' fsfFd -zfe S^ i$l -cr: T# :EI3T^ ~^\ *ta wn i ??t m ami ^fhrfsr ^■fsn'li 193R 37sffr -^h ^fi f? -^ -qr tm :e^m ^i ~?m ^ #ra^ ^ wi -qfsrsi sFrai f? 20^-h&^ ^rft °fi$ sDaT^^i^^Tfiqai^Tiili 223ffr;^#wf ^lfel-HH^Rft

The text on this page is estimated to be only 1.17% accurate

^ 24:4-37 1178 "3cr ^f ^t ^ ^-=f) wpt, "^ras?H! Wi #nf ^t'optfw^'R'qptl sH'qi"^TKlliiobgTfT'f % "^ ^Fd it f ^t"JR "^Ft ^ 3Tl^t 3TR ^ft '4* tr% f' 3?r ■it ^^ff ^t ^ftl *d*t ira % ^f opt ^ ^i ^r % gsf opt 3TOsni *rf) tr; ^# ?f? WHial ^?rt'#mi#)ftFd awt 3^^#' sim tl 7FT TO ^TTirt ^Rt *Tlfcl % ftftcl ^ 3TR TO TF*?G3RTF*?%ftft=Tif % ftir iqoRSon^t, 3TR 3 \ d±ll '1*11 «?I, tffe%'qf^tfatR'qT:sf ^#," Cqs^ cihi w4 WW it ft? ^opT 3T?f -5PTT t ) 16"cFt *Tt #n A^l^ll if ft 3^( xifisf TR Wl ^THl "Enft^l 17# 3FF) XR ^ ^ tr fft, c11"ER ^ ^lfT ^S *ft ^ ^ % %i "^ "r ^?Ri 183^r ^rr ^iwr tM t( ■5PTR '5R TIT 'ft, ^ ^ ^gf '5PT 3FT^'oRc[?T^-R ^it^^5&t#t,'^fe^??1^75S%#tl 205tI8f;TI till 21~3^ Rnl ^sfl drqft sn^fl ^l^rat 4|Tf ^ ^CT ^Fdl f "ft "§?T 'qM % #rff % ^tct ^t f\ ^ ^ra ^i?f ■si^ftl 35onl sR?ft 3TR snopm fts ^Ff ftFg ^n '5TEH 'oP'tft ^H ft^TT I" %om xr^cr ^jfictt t ft? ^ ww ^P«r awn 36"^T ftl ^ ^?r ^Ift % ^R if ^tf ^7® ■=# ^TFraTl "=r ^spf if ^ 3|r -^ ^r -q^tl -otT^i -q^q fqdi ^praT ll 37^ ^r? % ftrf if 1 3n, ■=r) ^

The text on this page is estimated to be only 1.12% accurate

1179 ■rrft 24:38-25:20 Wfq % TJ5! ^71 3TR1 iff ^rn| 38q^ f\ ^ ^T ^ wra 3^ ^ ti?^ % faff tt°p wt-'q)?) t%, ^nw-TTTfatf T$wt t# ^ra h=p "=r? "=rra tt "Rif ^1 3%%TRTT°P cW'qdl'Rlf'ERTT^TTcp^lcT WT "R 3TI "W 3TR ~$~^ Wl 'opt '3WT "=#' ^f "^FTTl i^Bq % -J5T Wl 3TR1 9^ %FH it #111 403Tf TTO ^^n affc T?of> opr oi^f wte 'fen T^%rni 41^^ Tftaft^t afterf ^ n n ip; °pt ^n i 50^Tt ^3TIcpl ^FTt T$ fal 3T1 *n3TT fatf fal o|f ^1% 3T1^ ^pf TTfERTt ?T^ ^#' 3Th: &-HM\ ^=T% ^T8? ^1 ^Tff i^RII %8R *ffcf*T W^T3Tf ^ 3frI TRMf % ^nat wfcqRf ^ ?^r «ft ^ %nl 5°wTfe ^% ^t 3?T^ ^' ^T ?t JW\ sft, fT^ff ^rct"fe^«n?rTEi#r 7"^rf wi ^ ^wf w^^; Taft |f afk 3mf 9"^tR Tf ^r ^TH cF3T13Tf ^ ofjfT, ^#'| 1R itm^tk"^ if^H^i^l^f d^H dd «M3 <=lle)"% 4l-H^il

The text on this page is estimated to be only 1.39% accurate

*tft 25:21-43 1180 ^•hih) % qra wsfa^oftifaafk^feiT ^ rfft ^r% ^n, '^sipft, tjrr r^ Tfe 0fePff RR°pRi^ti' 21"^r5P ^ofprt r ^?r or^t, '^irami ?r rtr % ^ffp 3T^ ^ra #i aMt r) trr % resfstr' fm I r>f ri 3rk 3fr r^fr) =Ft irfhi r' tjjifft 22"1qR. ff) wKt % fo rr rri^ I r 23"^RcFR5nRtR^Rcp?i, 'viisuvi! rrrtr % :qi>T¥l,RRl' 26'RtF r'^RcP ^Fft R ^f) op?T, r f°p «fj rf 3Wi# to I , tt rfri ? % r Hr «tr =FF?n f 3?k R?f RR r)r "R?f cf|£ R#[ R RRR ^FRl f 27nt r^ rr sr ■Hi^obiO' % to rrt opri ^r RTft^anlfeR3R3ndiR>RrRRanR?%RF[ rrstI' afkfecp qra 4nl 3rk "feRt ^ an^^i^cn i, t^^f) arf^RFWli^Fg^^.i^R^Tr^ SF^Tf q^l^MgK ^IHn 3FFft«( oPfNlT, ^ gi# ^FT ■^f TIT f ^R oF«^t cRR "R^ ^_*n^ m^ Tf ^ fertTF^%i^fq *ft ^® fen hI"3!> hr^ r^; # frrqfenl' 41"fe"oTf TFn 3FRt ^ 3TR on^f^ oh^i||, '3F 3wff! r^ ■qrat^^T3F, afk ^rr 3FnwR 3TR ^R% ^cff % %J Wm opt F4l I, ^R 3FF1 3FqR'^FFtl 42R#RR?FJ^?|oF?fFF^[R^ sn^T

The text on this page is estimated to be only 2.03% accurate

1181 ^ 25:44-26:25 44"fqR ^ *n ^?n: if ^r} t#)> ^ -^^ tj^ ■^RR ^ ^ ^^ ^31 3Tfc ^ft ^fal "=#' ^ I ' 45"ft^ ^W ^TT if ^Tft ^TT, *3 cP# ^ ^W ^fi-Hl tit I " ^ %3?f 5RT % ^t WH ^T w& Z^ O 3^ "f^rf 3 «fcn, 2"hr #n ^tft^ if -fe^HH^m^F^^tl 3rfr: wq^ra'iJPpTf % 5FR3 ^FTO % ^loFT % 31FR if ^sj JTr| 43lffc ^€ft "f^ft d<=b) o * cs wn, "jm, ^w tt ?rt "=# fi ^?n ^n ^f f ?" 23?ra ^ "^ ^?tt fen, "^#1 ^t ^ '?nai ^ an?nifnFnt^sM^4

The text on this page is estimated to be only 2.80% accurate

*# 26:26-51 1182 2%M 3 MR1 M it it «t, RT?T "R fist eft, ^3R 3?mK 3t 3?r fqR %j l ~Irr ^r %sjf cpr ^r i^ Rl ^faT, "#, ^R M3R, ^ TRT % tl " 27feT^RR^MiiH:RraRRi 1RJ 7TTR "•^RKfeT^RR^TRRRTsfRI ■RR3TR'RJn, '% ^ RTR fen, Ri^ R1RR1 RR Rl "^RCT ^ fef fRRI ^?I Rlf RR^RT Rt ■RTt f5t5T RTt #1" 43RR R13RRI3fk^feT'Rl^RIRTl'R3TRRt 3TRl#^"RlfT^:R%l 44Rl <=l? ^% "^tf 'RR fer RRT 3RT R)Rft RR ^ R# RR RT1 ^R it ?T^f R' ■gT?TRI-R5t| 45JRR RWj 3TRR fesrf % RRT RR1 3RT ^RR RS7, "RRIRR 31R ^ff 3RTTR ^'RtTllt? RRt,'RRR 3R ^RRR f, ^R ffl -^n -qst RTJRRf % n?lf #R ^RMTll 4%3t, 3R3lt^|^gt^R5FfRF^ ■RCTRlTnl" %|o[R^t^RHT 47-Rfe ^r Rfa it tit «n, ri^i ^rr rri fesRf R'^TT5p an, 3RRII ^r% ^Riat R^RRf 3RT ?R&Rf 3 ^R 1TO R M°bT 3TR Rl^t "RRT3ff RR ^RRt TO ^st *te *n ?ltl 48Rpn ^ # ^R RR^RR^ RM1 RRI 3TR RRR, '% "RRtl" 3TR RR ^RR R^T RR :RR tfenl 50Rfe "R ^RR 'R^n, "fel fef RRR % fej R 3RRIl,^RRRl"tRR 9% % #Rt "R RR? ^T 'RR RWj RR '5RTR RR R5t RRI tfenl 51tRR ^TT oTIR R^T % ^Riai $, ^RRt ^R TTRi R R^TRR TsitR ?tt -sk

The text on this page is estimated to be only 2.13% accurate

1183 ^ 26:52-27:2 ^7T TTT% TFt -MM?7 T ^TT W, "3^ T?T5nT cfft ^TR T'T#lTrT7^^^7^tTdd^KT'?tHIT-*1Kf')l 53TO T/7 Tff TTTd t% T 3^ TTTT TW ^t ■g?n T^nt 37TT T? d*d M'W 5I7T? *)HI377' T T) ^ ^> ^ aTf^TTTiriT^TO?5^^^^"^^^ TTKSlf ^ %# T? ^r ttI #ft 1% T«t ^5 TJT7 # #7tI?" 553Tl TIT^ ^ T T7f ^ ^j? "?R dcK %TfeT^T<52: ^T T5R?77 Itsk-fa-f&Ti^fTX-eHI T5R?77 fl" 62for H£l ■4M s tt fl 64%T "^ ^rTT 7^71, "17, 'R 1 1 f5Fr7 'R rP% "^cTT?TT f 7% TTR ^7=7^7 % ^Pt ^ ^T 'TrR TJTJWW) ^ 37T^ W& W\^ Wi, ^Wn, "fff^ # ^73f ^7 1 3 WTltl 66gi7 ^7 °WI -Hl^rl #?" ^rR ^f ^ ^, "q? 37qT7877 fl ^7 TT ^TTI ^nftql" 67f^T ^#R ^T7% % TT KfcfTT 377T ^T TT7 TITl 'JS T KfTf TIT 37IT ^f7, 68"37T TT%! ^ft

The text on this page is estimated to be only 1.95% accurate

*tfl 27:3-26 1184 opT^i 51TTO1 Wl.'fit'oTl «gd MtfdWI 3ffr:^?^ dl-Hfao^^Vlfel 1 opt ^tt w^ % %r ■q^s^T ^pt w Hpqi If "^T IT ^R #>f)"^ "cpU, "l*t ^IT! "^iffO 3FR1 TTTOllI" ^ xr ^T ^Kt % ^ fe^pf cpf *ife % qfeR Mb* *< **rll JWI 3tkfq^^lfT^T^T 3^ 6gw -4N°bl "^ 3 f*p% 3^r f^ 3rh: opgr, "l*flT ft*W % 3TOIR ^T SR ^t 'Itfe % °pfa Tf T^TI^f%lffqwft-SRpP1?lspi^HMisp#^Pt H ■d^lT R^ fop^ Sit, ^T3T^T oPt^T^T4^T'oPt,# ^RT% opgdldl i?" 18(4^WI 1 ^Tt ^tg ^n ^n ^r#?" ■ot TM ^, "3^ 'grsH TTsT ^37 -^n" Os 23(4 % ^=T T^ %T "oppf •HilohK "^il 11 glHTT frai If 253tTT ^'Tra#rff ^ oFfl, "$Hobl 4ld opt ^M^lt 1R 3Tk 1R1T ■^ ToftoPR o^ II" 26m "fenro ^ ^=t% %i ^T3T^T opt wis fen 3?k %T "oPt oplt ^FM -5?7T WH XR ^3T^ % %U ■hTm fen d-^l'd ... (sl

The text on this page is estimated to be only 1.05% accurate

1185 trfl 27:27-60 27I>M t ^WHjjcKdlFfTFTtl 28<0\ I^qF^^^^TR 3TTI" %13Tt % TITO ~&m\ ^ ft #=n "=tfw 3rk ^fWj ^r ■q?n ^ t% #n TEtMatk^TTlTt^-O t|dHI3Tt^5l ^^, "4tg on^ofTf q5l Tf"TT3 RAnM^T^^iiHTf-^TS^T

The text on this page is estimated to be only 0.74% accurate

^ 27:61-28:20 1186 3tr ^E^n ^ptti 61hR-mh h'k % ^ ^^ ^| 't "sft *ra, * ^tpt?tt # fe ?m ^%t ^ t#^ T#t Ft ^ o ^> fl 3n3ft,^T4T-atH^^#,^T'51f ^TSCTl 73TR fqR ^T>T ^TT3TT 3TTC ^3T1% %*Tf t} ^fift, ^ ?R ?3ff "3 t} "feT "fen "fpn i 3ftr w^w cf# 'q?^ TM^T ^ ^T T?T t gH ^ wT ^A' ^ ^ gi# ■^jfii.^^Trin" 8r=i"R-5PTf"^^i"#^ra^"®te"fenl ^ wi w^ % ~fi#3 % ■qffl '^^H^^T^^fi^n 3TR #?n, "3R ?R!"^^TI%TO 3TRf,^F>^1% ^ER^TO?firl^3fR^TWU4hHHI^I 10d^^T ^<5-H) c(,^|/'^% -M^

The text on this page is estimated to be only 1.00% accurate

1187 *rcgsr opT'SUT^'ill M^cMil JRMH ^■JRT^^f foWTtfe "TR! 'R 3TO^ ^ opt =W 3r "f^ tjP? 3*HT cp^JTl" W/l qrkT^cn TWTl =W W\3\ ^HolO'%TnSTTWI3flT ■W'Kdl' 3T^cpl ^oTT'oPT^Tl'l % 5RT ^S %qf effi ^R 14^HI'5p>'^Jf^f^^%m?41y

The text on this page is estimated to be only 0.73% accurate

Hi$H 1:21-2:4 1188 213rh: obi+>H^H 'qf^l for 3rn# ^ft % far 223TI% ^q^ff TR #T :Eff^ JlTj ^FTpP ^TS ^% Rt>*il SflM-^IMI 1 dig H^T «(K^b H 3Tfe>RI ^p)?R? ^q^T^TfT «nl 233^^-gi8RlTFHl Wm\ sftl ^fftTft} Mlfed ^T^^nf^rwn fe^i 3?fc'3JcTT}#'Tf'Epl' ^d|rHI3ff^^iot,K|RdWII #nf opt |otrr TfTR opt ikrct 35#RT Tl^, ^ft TJ51 =1W W Wff ^R feft T^ra'?STR'cR^dMliIM^Td-H^'3T?fRI'^l 36f^3 ?Ftr=T 3Tk ^H% ^T?ft ^ fs^ t%5p?t 373Tk ^ ^■^ft%%T3TPnfl" 39?^?m^w)?i^^ ■3prP(obMdiirail cpt? t |H5PK1 40tcpT i^ optst ^i% ms 3tmi ^r^ ^h% ^HFT^ f5p '5PT ^3^ tsRrft offt 3Tk ^PfT, "^TT? ^ ^l|,^t^'^3topoR^oP?II'll" 41^4-H'tTT^3T1^3fk^^3Tq^l'?ra%?n ^TT-3TT!" 423Tk^clc^ra < ScTTf U tel Ht

The text on this page is estimated to be only 0.55% accurate

1189 Hi$*\ 2:5-28 ^a wz ■%]; "^ ?ra^ % *n^ ^ ^wt, '% "gpr, fft w\ awTj^i" ■qr%^T % fen, 3rk ^h -qTqf ^ ami ^r to?ti I?" TR 7t "TR ^IT #Ef Tl f I ^W ^=T^ ^felT, "51! 3R^ ?W$^ slid' °wl'-HH T%#? 9-H<

The text on this page is estimated to be only 0.87% accurate

Hi$>M 3:1-29 1190 ^ wt ^m ^5t ^n ^ptht v^ ~&fa an &-Hobi t^ fra w ^t anl 2^dl'IMIdftl °T? 3FfEf W oTTT qpftil"

The text on this page is estimated to be only 1.08% accurate

1191 TRtf IT ^3TI^ ^ffewt3fk^WT,"^t'^ft"Ifl3lk"^T^! 35# ^ff TTT^rc ^ 1^51 -qr w?n t, ^ ^n ^, 4^TI^ ^T-%%=T1T 4 4^1 5HI ft-,* ^ +«rl (rl'ldlt cbll'dl-H^W,

The text on this page is estimated to be only 0.82% accurate

Hi$M 4:22-5:9 1192 "=# f # y&rt. "=#' ■ffTT 3TTT ^lf Tf^T T*HT "=# 5 tTt^r?TO!" 24fqTT ^"^ ^3"=TCt ^?1, "# ^7® ?R g^Td ?ft ^T ^R KTHqsfe "fsTETTT cfrft, #W ^TFt ^ ?R ^ft' TJ/?T^ %§ ^^' ^S 3TTT *ft T3T(f "fcn ^TTI 25fcra% 'qw t ^ 3lk ^ i^n ^n 3rk #m f5R# % to ^rwf I, ^a% to ^rt ^® i, ^ ^ -^ f^n^^nl" 26fq7!:^^^fT,"4^^=«^nTT^"^nt^ ^tf "srivii #i *f #^ %?tpti 27nd ^t #r ark fe ^t ^f) 3ttt f&i #^ ^f 3t^t ln "^^ TlfH q

The text on this page is estimated to be only 2.75% accurate

1193 W^{ 5:10-38 I R#5F FT RfR R tl" 103R^ R^T TT RR RR lRR#Rftt%Rf ^%^R#RTTRlH R%RFIR3T'|; 3TTT ^W "3# 2JT #TCT ^ t xfft ^tt ^TT^ sft r rt rri "fa-^lp r? rsri i&rr eft, #nf RJt d'H*! ^il^J'TRRlRTT^lRR^'^lcHHRRlf sft, ^3R% RTR 3TR R3TTT' % RTR RRT RTirftl 17TM ^n^ftHdlRR^^fttRTRW^R^RWTRRRT riri 183tr 1rr r^ Rtsj Rra rt r? t?i ?n R*ft trr ^t%J R' ^ilrHli? ?ft, RT?T R TR^ft ^R^ WW "fe R? ^3TT *ft 3TT^ RTR ^ ^1 19T5FR RT5T R 3R RR^ RTR WR 7=?ft RRRJR RfTRtl 3TR ^R^ R7?T, "3?^ 11 #nf % RTR RT rrt rt 3ftr ^% rw tm ^?n Rt rr "3 ?It "trr i^n II 3TTT ^%Rf R)R?TT1r; RR^^RTR^TRftl" 20fRRRW **rll 1R1 3ftT ^4(^-H%#nfR^^TT^ RRtRTRTST^^R^ M fedHI 5(41 T R^RFTRRFtl 30,TTR ^Rtdr

The text on this page is estimated to be only 3.67% accurate

TR3*T 5:39-6:20 1194 37T tI ll 393i *ffaT "fFn afk ^=rci 3fcn, "31 f^tet 731^37137®^'! ^ cpl 3WR~ WK Wl\ 6 fee %J ^ f&?R 37t ®lf 37T 3T^ WK 3>t ^T fell ^1% fer *ft ^037 wi s)| 2^3 ^sa '371 fe 3T131, ^3^ jnsfal fWFTTT if ^ ■wl 31 37® ftPPTT 3* 1181 T*3 37* ^% ^331 37* ^1 Mt^T^Tt^T^; 3lfe31*l'q* 313 3T3*^T13T[| fe* -3? tjM if #rjf opt ^q^r ^31 wti WW\ 7s*i3*i^3i*ife3f37r3i4^ qra ^m\ afk^t ^t 37* 3> 31 ^% ^HT 97^ ^FTll ^^ ^% ^lrHI3Tt W 3#3TR fell 83t1t ^1 f^T fe, "am 3TtRt ?m % t%^ ^nst % t%3t ^na? 37® "r ^''l^TtJt.^fedT.^'q^if'q^l 93TFt:3aq^nt ^11^ ^137^ 1 fea 37lf Sllfeffl^fl 10t^T T37# 'SIT ^' 'gq ^TT3Tt, 311 ^1 WW ?T37 "Sift Wt ?T37^I"=FTT37t"®1ftl n3fk ^ feflt f&?R ^ ^ITTl f3Fra "=Tlt 3TTT 311 % #7 H1^ "R ^f, Ht ^3T4 ®)f ^tl 3TTI ^=T37 t3TfSt ^ Wt ^ % t^ 3T^ iff f4 311 37t m ITTf ^tl " 12fe!: -3 31174^^1 3TlT^ft^q^Tfel f37 #rff , Wi fq7n3Tt! 133^r=f ^13 W ^lrHI3?f 37t^HT f%37Ml 3T1T «H3 f^ftPPTT 37t^?R % ^t 14TM %f%* "^ W ^ ^' 1^; "sPTtfsF ^fWT 371 :J17T ^W 37lf T7?l :3371 ?Hl 37® #T 371 Tl *T, 'Vrf3CT1^3Ml^l^l^fl3Tf'cif4^ft^ril 3Tk ^l^Wf-31^gfl^lRb4371il37TTltir' 15^lf 371 Tl SI, "31 T^TH* II" 37® 3Th; 371 T% 8), "^ ~^ 1 ^l W3tR 37M % ^fef^l37lfTT37l" 16qr ^m tffe ^ ^w ^hi 3t 3i «ffcn, "^w?n f3R1371 RK ^ obiolHl SU,3lt^ft^^ll!" «mRifHi^^t?jpi?^tirqi 173#37 tffe ^ ^SR it ^11=11 37t ^t ^11^ 31% ^r if ~swfi 3?t 3tm ^t sfti ^^ 3?q^ mf fq#rc 3?t T?=ii tftfew % 37RW, #raf4 ^r^ f331137TlfelSll,-feli:37'Tll 18sPTff37^1^1%ffe f^ '3711 37T31 sn f37 ^Tl ^1%3 ^f t f37 3^ 31^ ^37t-q^f4l33ii37Tlfeiil 19^-qrtffera ^ifi ^T T^ W\\ sftl 31 :3H3t Sit f37 ^ ^RIT ^MMI^HK H^fMldl sitl 20SRff37tffe^l=Tl f^ '5T3I EfTl tffe ^TF131 Sll T37 ?TF=H 1^37 ^f531 aftr -qf33 g^r i, ^^ 31 i*i37i t?h 37T31 ?HI tffe ^^3 ^1=^ 37t ^i ^R31 SH 3t 31 "313 "^ -3 -O ■33T131 811, fee s|t ^T4 ^H37t 313' ^g=Rl 313 ^7131 Sill %ffe 3181I^tfR3if?IW,"n^3fk^ft 37ITRIcl81I i^pqii 1737 i>ffl ^qfw ^t ?fa] ^rat? ii feff ¥R w^ ?3?i ari sfk ttt^r; 37 3if if #iff 37t 3^im sii I

The text on this page is estimated to be only 2.29% accurate

1195 Hi$*\ 6:21-50 21rrfi r 1rr r? rrr 3rr -m rt^r r wr 3# RRRR ^Tl" R^ ^Rft ^RR R^T, "cRT ?R RF4 3fk # R^ ^RR R?t ftfetf Rl^I ■R RR ^% MR RR ^'? ' ' 383RR ^RR RifT, "R13?t 3Tk ^#, RJRl^ RRI fedHlftfeffl?" Rdl RR% ?=RlR R^T, "WRn: RRI ilR ftfeff 3TR^rR®feRfll" 39JRR ^R^ 3T1RT ^, "RR RRT R?: R^ R^l" RH t[ -^31 RTI" 4(W R Ri-Ri 3Tk RRRt-RRRt R?t RTRt R' RS RRI 413Th: ^RR R RTR ftfeff 3?^ Rt R^fM^^t RR Wfsft 3TR ^^ JIT 8FRRRfen 3Tk ftfetf Rt? RR #Tf ^ RRRR % fe^, 3RF> "f^RRfRR^fl 3ftT ^RR ?R Rt Ha>id^' RR Rl ^R R^ #nf ^f RP fenl 42R^ R WRi RR 731RI 3TR rr jr;I 433?h: fer ^r)r rr) j$ fttM 3?h: R^1MRmRR,RRR'^R7RRI^T|l 4RRR#nf R ftfeff Mf , ^JRR %RR RWf R?t Rt WIT RR RRR sftl ■% R?T TfNr 1^[R ^ 3#]R? R5t *%SIR RR1RT 3ttJRR -feq ^?T RH RRR RRR RIR tferf R R)5T % R1R "|R^ RlRR ^ft RiS ^RlR feRt Rl sk"RR3FnRT,R^^RRRMl 31fer Rl^T R ^RR RJfT, "RR RRI R^ RIR feRt T^RRcI fRR RT R# ak %1 3R0R RRt" RrPf? Rlf R|R oM RH 3R=1T RHT RTT RR1 RT 3?k ^% 73T^ RRJ R7T Rfel RRfiRRRMT RIl 32§r!rR R 3feR Rt "^5R RR R' R5 RR feRt T^RRd fRH RR RR R^l 33^|R R RR?f R ^R RR] %m\ 3TR. q?R H "(RRt fe R R^R r I ir(rr r rr: rrr' r m$ % trr rr r| 3fk ^R^'^WR IHRWl^l'qiRl 34R^ RtR RR R R1WT R^R^TRlRt^^R 45JRR ^RR 3RR RRf RR RTR RR RT RSTRI ?nfe r^?tr; rw R|g R^"feiRr^,'^^R^'q^ Rt RTR RR RRR5I RR ^IR'l 4%R "fel RR%, aiRRtRRR%lRR,R?RflftR!:RRTRRtl 473RT T^'RWRfRtRra"^)R%RlRf-R)R ?ft 3RTRf 3fe^T8RRtRTRTl 483RR ^3T fe ^R RR #R RRtRf 7RT SRI RRtfe RRt ^R% fe>5 sftl ^RIRT TW\ % ^R -q^T R? lf)R RT RR^ JR. ^R% RRI 3TRTI Rf ^R%RraRfR^RRRRRt Rll 493^RlR ^R"|fiRRTRR^^3RlRTfeR?RR|«RlRl 3TR ^RRft Rte 1RRR1 RRt 50RRffe RRt R ^R %m\ RT

The text on this page is estimated to be only 3.11% accurate

TR^T 6:51-7:22 1196 3TKft*l?Il"rftsil did 4mA ftcfrfsicl'37lftjTT, W, "^TTW^T TSTT, ^W ft f ! sft ^1!" 51tftR o|f 3 WI ^rfsRrl 1^1 52ft ftfelf % 3W=Pf ^pft % twr ft ^r?t "=wf ^ «)i •iHobl 'gfe «if ?t ipft Si$\v\ W ^R% ft 'l^tKd ^ifftl ^?ft ^13 ^SJ^tl 5%raft"=Traft^dT^T^l?T arft^ftfa ftt?T cfTl ti^H Tftl 55JW ft «fftlft opt Wf *R £l R^dfedfiWl 56°lg J|| ^rfsjff 1, &HfliM 3frc spftnfeiftfft %j ft "Rlt'SBTft? ^fiN? 3FR1 W=H t%=Tl 178? Sift sft 131 ftfttl" •ftWj ft ^ft mm, "www ft cR ftft gq ^i% THdi-"fq?n % %% ms «ft ^Fll :?RR1 ^BT ^ ^ 3T3i# ^ fri 13^H cRl ^1 31^ft sh\% Ttfrl-K^Hf ^ qrft^l % c|^H ohldM^lTI%ftlt3lk4t^|?l#«(lcl'djH #rl'^T^lt|" 14^jft ^te^fq^ 3w^ qra ^wi afR^wi, "it ml$ ftft ^ra ^ 3?r ^f#i 15^rt op^f ^g ":#l^it'^l?T'^''T3KT% sfldT^Tl'^TT^ 31^5 lt^31^g:^T^^ft|l" 16[^ felt % ^g=ft %^7HlfHt'g;l^l]* ■^ ^i% ftM ft 3^ft -^f c^ri % ^k ft 'q^il 18cR ^?ft ^=ift opfi, "^n g*i 4t ^7® ■=# ^h^? 195PTtfe ^1 ^1% 1^1 ft "Rff, fts ft ^l?ft 1 3TR ■pFT 'craft ft iWl WT iH

The text on this page is estimated to be only 0.94% accurate

1197 ?RHlobl^f ^ijf sfti ^tr 3mt 27:jtWT"^ lTf "3 %j ^ jitsri ^t % ^w ^ w. 33%T ^t} *ffe i} ^T TO cTCTP ~% "TO I %] "3 3Tq^^l&4^f% opprf t( ¥!#' 3TIT "fcpT w^ 3TfT ^fTT ^S "opT TfTT fJTO *TC^ W ^3TTO ^5fT, "fOTSIW!" (3T«^"*g?P5|T!") 353Th:^f%^H^I ^, 3TIT ^TSFJT ^1 3RT -TT5 MT ^t "T^, skol? TW^FPsffcRcT'lTl 36fq^: %j "^ ^ 3TTfn ^t % ^ feft ^t ^ ^ wfl m ^?r^ #>Tf opt "feror TT5FTT :En?T, ^?ft ^ ^rt i\ 3TfsT=P ^rrai 37Hm 3fk 'I'll 5pl ■^fl^TIfl" "6TR I*[R oPt #3R 8^# ic^f TO ^ 3TSTOT TT T^op ^ft *fls ^obidl |^l ^t% -qro m^ opt fs ^ff «nl ^ ^ 3T^ %srf opt ttto -g^rra 3TV ^=TO 'oPWT, 2'"^ ^ OfS IT cTTTT 3U T?T t oTJTffop ^ #nf opt ^r Tira ?th fe it ^> 1 3TIT ^T% -qra ^ ^tcptf Hgl'fl 33TTT'5Tft'R"§;% ^^T#"ErT #3T%fTT f # ■=! TtPf^f # ^T ft ^TrSjrt | -^5 ?Tt ^WrT ^ T^ 3TF^ op #1^ 1oP# opt 1R 9^R -Sp^ ^ fe TToPdl 5T%T^T^% % #iTt if ^fe fejil %^op ■qra'op® ?M H^td4f «ft sff, ^tr sR^mop^% ■^ «ft sfe ^ opt ^fTl ^^rff^m^^R "foP^Tl afk "fTO ^?R «l3 Jit ^oR5f opt ^obdd I ^PT%WtilobR4*RTl 'oWoptf^TT-pJR-q^r Tl#1l %i 4Wj, ^

The text on this page is estimated to be only 1.34% accurate

?R» HgT«nl 15#g^ tf^Fr % wrk ^ «i3 Tin " 16"^nr mw (U1 HgTil," wmt,^ 3irerTf#Er 17^ cfqj cp? tI I, ^W *1H<=b* #?T ^RT} %T1, ' T)il 'qra Rff IR % 1w? 3 ?R ■5PTT #£T "f^TR =pt t! it? ^n g1* awl *rt ngT ■hh^ *\$\h °&\ wm\-eft&-^^si\m\h 18d^Kl sffsft, ■5FT1 ?R ^3 "=#TI^?t? cFsFlT '5FH f, '5M ?W TR R?f TI^? '5Pn ?Ft ^ "=#? 19Wt ^R TfNf ^ilR #nf % 1g$ 'mm fltM % zspi 1apq 0 3k ?pr ^% Pbdnl st5pft#Tf^stn«n?" "■5nr¥",^?R. cpmi 20"3k wi ^r w i^r % ivti mi Tffatf % ^ti^^HtdH^fedHlilobRiiTm'cFT^^ #?" 'W,^?R'5PWTl 21fcpT ^J ^ ^3R^ '5F?7, "=F?T cR 3M *ft Rff TR#?" 3$^P7.3M 221mr: ^ tcra^i ^ 3n^| ^f ^® ?fri ^faj % t^TT TTSp 3® '&5t o# sk ^TR "STTSTRT ^ f°P W ^■®^l 233"^3ia}"arivi5-5tnwiafq^i3ffr:^ ?fc % ^fT ^ 7pfl| -g^ d^obl 3TR3t IT 815PT 3^RWlSl^TrqT"TT33k 3TR MeSI, "d#l °bti ferfl ciw%-^ ^'^lom^tnT^^ni 38i|j< cb)|"?n^rfifEnft 3ftr MIM) Ml'fl^'^T";TR3TtT^H%

The text on this page is estimated to be only 0.97% accurate

1199 TR^T 9:1-24 wi fen of>t ^fen t#?t sn^n, # m *ft ^s% fer^Rfeni" % TT^T °b1 -HI-HS^f T#?T 3) HI ^d*^lO'«^ll??l5%^t^T1TOr^3TI3fr!" ^lrHI"^^^t^3IrTt^^ drobM?lf%^t TRte 1^l^8RHt'cR^T'qfT3fk^=tob

The text on this page is estimated to be only 0.92% accurate

W^ 9:25-50 1200 T# t, W^ ^IrHI c£r ?" 2Vl ^ %J 3 ^TCT cp?T, '%ft c^lrHI ■3I8RT % fiHIWT ^ff PiobMl ^T T45p?ft 8JTI" 3TCRt *Pj % WZ&t 3 % cRT cp«R 30itb< 3^ftcf? TSTFT^t? fell 3?t?:^3wt?T ft^J^^TTi ?THt^"=#':En5?TT?TT"T%'^^WTt, Wq%ft fwf sMft qcpfcMl 3IT^T1 3^^^ 1TR: ^ftl ^ *n3 % #1 fe «TT5 ^W ^t ^TTl" 32cR 3 ffl W°T?T H*TfT "=T#f ^T% 3Tk ^ ft f^ &\ 33fcpT^ obMrHgH 3TFTI 4Wl ^sI'ETT^f «TT,^T^ ^\ -^ d-w) M^I,"TR^TfrRfch'H=(lcl'qT'Hl^fc|^K'cR T?> «T?" 34cR^^qTtl °TTpP'cTTT? Wt-STOTf f^EfK =FT T!> £ % T^ *TfT ^pfa f I 35¥T^|3^FTTI 3^

The text on this page is estimated to be only 2.04% accurate

1201 W^Si 10:1-29 mm % ^ft 3 %j eft %sn 1 /"Y^ ^J ^ °^ ^8TR ^ ^^ ^ J. V^^R-Mi^sfa^'^'^^'qiT snwl 9flf^t % fqR ^l% -qig 3^ ^pff | 3J[R 3TOt 2-fqR -3^ -q^M ^s% to 3?i^ 3ffr: ^rcl wi, "=wife-Hl^r%&^ftdt"fe^3mt'qRt ^Wianl %^^f ^r ~fcn, "*Rn^'di| ^if^wfcri S it 5%T "^ ^3"=TC} ^?1, "^fTOT "^ TFfl^ 1%? ^ 3T15TT 3fk ^ft % "^ if T^n 1 1 ' 7 *^r)i^ t^ g?q 3^ ■Rrai-"fq?n ^ s?te ^r 3mt ^c=ft % wn tIttI 83TR 3 i =ti

The text on this page is estimated to be only 4.80% accurate

W^ 10:30-11:2 1202 ■qi^rjl-fsFrl *TlcHT % WTl 3Tfc 3Tlft cffft ^T ft 3T^rftt=Hi ^atrr^TftftftraTR^raftarfcR f, *I^ft ^Ifft ft ^#t, 3?k ^f?l ft ft ftt 3TH *raft ■qwft t , *raft 3TT%R it ^^ptft I " 32ffR MW\?\H ^ |it ^f ft ^Tlft ft ft ftt ftfej ^rft 3rft ^ th ^nift^ j^ft 3trrftr^% ftlil ^ it ft, ft ftt ■?} Jr ftfcr ft ^rft ^n, "cr ^ "^tct tftartft, ftt ft fttai i? ?ft -?m ^tt%ctt ■ftlft, ^rr ^qiftCTT ft ftft cFt f ? 40foRT ft} ^ift 3TTT ^ift iraft ^T ^f?TH 3^TT ftTT3Tf8T^7TT':Tiftl ft ^?TH ^#f ^?# % t%r I T5H% fftft ft cFTR t%ft "Tft i I " 41-3M ^T5f?t % ^F? %^Tf ft ^ ^HT ftt ft ^TT5^ atk^n^wtfsranri 42rft7!:ftr5Tft^i3Tqft qra ^ciwi 3Tk^=Tft^wT, "gq^HftiUft^^ftT q^taftf % ?ro^ ^nft ^ift I, ^=ran 3fk ^r% ^TpSRft -ftcn3Tf -5FT ^T -CR -R9q^ f| 43tR; -31^: ^TSTft^T^iftl gRft'ft^Tr ob1| 5(41 sIHHI ^llgdl i, ■^WHT'^'^n'Era'^fti 443trrftt'giTft'qsTH'^:T;Ti ^ifti i, ~?m ^ra ^n ft^^ ^ft 45=wl'fe wi ^n "35T ?T5R ft^T ^TTft "Rif 3TFTI t, ■#^ ft^T ^rft 3TMtl 3TTT wftf%^

The text on this page is estimated to be only 1.15% accurate

1203 W^{ 11:3-27 tj*# ^ % *gq ^^rf ^n: tI #? ' cTt ?r opf^i , ^■H opt W5^ ^l^obdl il "f^PI m "^ ^TfT Wt %t =t o^f^wqi 3rk IHI! 3If8PT^#ag%-^wqT3nTWI^! 10 SFqt'FTl^'fqcn^fS^-^nTTST #3flT¥ltl v&Hlfimn 8:25,26 "TOl ^T^ Wf 3TtT of»t ¥T ^g opt %®\ oTqPp ^dld^ls* opt^'WII 12m?\ Rh W«fot ^dln^ls* ^ftoP^Tt 0,^ ■^^^pftsftl 13«Mt ^ qr "3^ 3Mk cfitt°p o C\ es ^ ■qra qf^n 1% ^# '^ ^ft qr ^5 fi^i ^ l f^Fg ^sT o|f o|^[ q#Efl # 4 ^rt ^t: ^i" 26["fcp-cj iiRgir^Tf opt «rt ndT ^% 27iqR 0 -M-b^i^H ^fe 3^1 ^Wt ^ar rI^t t( ^l^i tit an ^t 5to ^Rop^ ^ii-m! 3^t fgqr q? 26 =p® mfcra? ^srt^ yfM if q^ 26 win tri ll

The text on this page is estimated to be only 2.69% accurate

W^ 11:28-12:19 1204 rf3"^rt^r%rtr3tt^i 28afkRt5t, "RfRRRRf R^1^3Tfl^JRnTi}RRRTt?3-t> :^r^^rt1r^t, "RRRiffRFRll'' ^TRT%JRff T^ R ^ s) 3-H&4 3R tjfe RR ^Rq| %cfR^RcfRJPlifR 13dR ^?ft R7® RRilM 3TR ^i\9M ^ S^ RlRf t[ RTRT^ % f^ ^R% R1R ^Tl 14^ ^R% RRT 3R^ 3Th: Rl^, "RTJ, fR ^^FRl f "fe R RWR ■^R^ f ak R^ R1R R?t ?TfRR7 Rt RTR1W Rff RRRTfe ^FlT'RrtRqTRlR^ll RRtfe R RR^TT '^ttfTRlRRT'^RT «RH R4 fslHIRR^RFfRft R5Rt1?T^n^ntl RT RRT RRR RTtRR RRT ?lRRt RT R#i? ^ ^ RR RRTT^' RT R RRTRt?" 15RT5T ^RR?t RTR TRTfT RRTl ^F> ^=# R^T, "RRR^RRfRTWtRT? "^ RTRR ■RT3TrRTT%^[^R ^RTOl" 16RT R RTRR ^ 3TTRI "TRR RT^T R ^RT^ R3T, "W RT "TRRT R7T ^Tt afk RTR 3TT%R f?" ^ffRR^T, "RRRR7TI" 17RR Rtg R ^% RRFTT, "^Tt RRR R7T I, ^S RRR RTtRT 3TR RtRRRTRT Rnl,^RRR^RT R?t ^T| " ?TR R R|R RT%R J^ I q^qf rr ^M 18JRR R7® RTOl, Rt RRRTRR R?t RfT RF#, ^R% RTR 3TT^ 3TTT ^ft ^T# R1R, 19"t RTi,

The text on this page is estimated to be only 1.70% accurate

1205 TR^T 12:20-43 TRn "^ w& "firp) "firrai i fe ^ f^rt ^n *nf tr *\ti 3TK. ^gsfft tFft % cf?ff -^En ^ ft ?Tt" ^S% *nf °fi '^fi& 1% ra? ^ ^qi? ^ afk f^R 3W^ m|%^T^l'^3T^| 20Ii^ -^k -^ft -^ra f % -?n?i *nf ?^l ^rat^^i ^"^"sn^i^T ark "f^TT"^f f^lW "f^IT, IT ^? *ft f^l "f^# ^TF! % # ^RT ?m\ I cfteR. *nf"^ *ft ^n ■# f^n 1 22wrf if ^ f^ft ■^FTfl 23*fta % ^R ^ ^ #q fq^; ^ ^q, Hi" WW 3rk ^ ^ qr^rc ^ 7n% ■spti f^ra # ^Fn^qwt cfHTW "Rff t "I^FFt cR *T2xfi ^ -^? 25cprff5R 3 O O (^ ^> if fflft % ^ if # ioT^T "TO t, "=# qsr? ^q ■qr^R "^ ttoi f4 ra^i an, '■r jmfa ^n ir^rc t, "?wra ■stn ■qr^r 1 3TF. ^ra«t ^n qr^rc f I'* 27^T^f 3ff^n^ff, =li^* ^Iftdl'^T q 3 4MWt '^R-'qpt % '?iff) ^ fan ^a t?t an % ■^nf'R'^ci'^n sfi^mti 42fq?T'3FiT^"riTk "ferai 3^3k^r^^iif^

The text on this page is estimated to be only 2.30% accurate

Hi$H 12:44-13:28 1206 R° ?T^ RR RRT ^H Tt fR fRSTR fRSM ^T :q?'5R cpsT R?R il 41ct4l'fi ^ftR # R7® ^3R% RIR rr?tr ?r,^rr'r ^ _L ,3 %RR 3RR 5|5|>T, "J?, ^3! RRcSR 3RT RRR~fR7RR 3^^111" ^ rt rI?t R ^rr orit, 'tt^r f^TM rrr! RR^T¥it?R^^RcSRRT^RTiRc8Rf2RR n^l'^'iil TT5f?-T!=F wm ^sr fen ^rirrti " *RR Rl ^RRR % R¥13 RT T=ri^T % RIRR ^31 ■^ -^ -^5 "qrr 'ift opt iVtt ^t ^t ^fr %^ ^j%^ 1TR?" ^ rt r^t rjfr wn "rjrsrr ! rr| rr> wr RRIRl ^RlRt}RlRR#R3RR^t 3RT ^ 4lrj ^ ^t.^f^R^IR^q^tH^^fTtl 185n«fRIoFft'f5F'qW TR ^>» •HRiil'R'Rlfl 19

The text on this page is estimated to be only 0.74% accurate

1207 W^{ 13:29-14:16 *ra 3777 rr I ^ ^tf Wet H^v^MUI Tqsqrq&Tftl -^1^(71 21:31 ^%J^^tt fo dgl H^1 frfl Wtk opt TT^t '°7iT 3rE7°7 ^l3Tq^^%STf^^lWcW5RT ^l, "^FTT if ^13Tt, ^n ^ T^j -srirf? ^T 'cFI '5157 t^p) "P#, ^?f% i© # ^ni 14fqR: ^fi opff *ft ^W 9|^TT ^TF> ^f -er: % ^FTt ^ ^f^r , 'rpj "^ -qsi I 97f3H ■=¥! %1 ■5TW ■EFTO "PIT t ^TWl ^[ 3T^F> ftMf % ^18? -q^r? ^i hhi 73i ¥#r 15fqR: ^w ^i# wqr -5P1 lisp -^t ¥3n-¥^Fn wm ■ofrti ft<2ii^ii, ^t'fRn: #p>^nft cpfri" 16?M 3¥% %^T ■STWl ¥ ¥JR -5Ft ^1 Hp> ^TWl ■q^iw ■sin T3Hi ■§%;: 1=mi 1 1

The text on this page is estimated to be only 1.05% accurate

Hi$H 14:17-41 1208 191^ 3 Tgs\ it wi to ^ft ^ ^f3 w\, opr

The text on this page is estimated to be only 1.07% accurate

1209 W^{ 14:42-70 f, T$ sfaS it WScnR °Wn ^fo> I " %cpr«[t '^1^1 W\ 3TFTT, ^oTTR ■%! % R1R ^TOT'sp^l "T^!"3Tk^R^H Rwil 46f^FT rRrT f^fR^rr^TORiR^isfi an 3w4l d H^l lo| ^> ' ^> Cs ^® f# -zsti ^wh wt, "vrf^raFfi ^pt! " snr TWW^T%^ptd<=bKHI 66qdTH 3^^ affiR^Tf «|3T anfe r^wn

The text on this page is estimated to be only 1.89% accurate

TR^T 14:71-15:29 1210 oTTI, "fa-H^ «||3 3 dH slid T?l ?> I" 4fq< Wl, "^RlcT^^TTRff ^1 i? ^s 3 ferft «n??f ^n ^tq ■pr tf wn t% 1 1 " 5f^Fd^T"^ 3M *ft "'fti} 3ITTWT aTTl ^wH^F5T >jtf>M\ ^TFT^ T-8TFT ^T ^ ^ (&-H

The text on this page is estimated to be only 1.38% accurate

"^-"^ oPT o) '5P1^, "3TT, offi?! TT oTlt 1 ^TJfe ^^T^TH^Ica'^'fq^-^T^^MT anl 303M ^TT'qTf^"^^^^ 3^3TFt^Ht^En^!" 31"?# TTT1 5TO ^TFTSpf sk Spfolfeprf "^ *ft %[ opf "ferft ^SI^I 3 3TTO Tf oR^ ^t(, "*tl 3ftcfo&Td^<*jl op>e|>» H^T«klWI

The text on this page is estimated to be only 1.10% accurate

^Tt, # "?Tlaf? 3 -g^, f^nq ^ fj, 'RFT 3 ?}, ^ TJ^ ^tit "^t ^ 'R^s s?3nl 133^ft ^te opr 3^rf -5F> «ft ITWt TT=H1 3t TIT ^?ft *fUnlf^<=IW Hg)'fa>4||| ^ T^% Tm3 qsps J3}1 3Th: W^ ^f ^=[% 3Tfe=nn aftr ^ opl T^n % %t tpu wapiti ^Ttfe i^P wftrr 3^r #p?t trii ^ ■qr^rc % ^ift^ ^3 Wl 203TI% %5?Tf ^ ^IWT ^I ^PT TM cp#f W ^PT% TCT

The text on this page is estimated to be only 1.23% accurate

1213 w* 1W3 t} #nf "R «rit ~*fa 'EPt wt ^n "®ki %^^iwR~ft^nl ^it^i^^^M WTT slcTFft ipff , #Flft ^f 5TT«1 3 it ^ ^3T an 3rh: # wihmk % y^K* t% «tl ^ iw< TIRS^ t 3T«3PR fen I ^\m_ ^ ^5 ^^ ^t^^^R^i^tf&FT'^nTFTsn^i! ^* *)^«a 'tMah -?afITof>^?rT «ITl ■#

The text on this page is estimated to be only 1.71% accurate

^°PT 1:23-52 1214 ^r tft «nl 23aftr ft* i^n jau 1% ^ ^ra ^-5F1 Rig WH ■g^H^TTl 33^3R^^TOTO^TO^%'SRF} "=T#f#TTl" 34^^RHR-MH^-W'kd^^WT,"^^CT^ it to?tt I? ^ftto $ nt 3i^ wsrrff fi " ?r^ 3mt wn t( ^ ^nti ^ ^jt ^ ^q ^ oimi qfei siMob lh^cr-of™ ob^i^iii 363frc ^ *ft *r % ?r it ^t ^ l?ftf?M % ^f 3 *ft 38hR-4H"^^?T, "^['H^'^^RTtil^n^'^ 1^ cF?T t, %T it it! " 3TK ?ra m wfe ^TO 'ro?^'E^n"rFnl 39^ifi^Tf Triw? wm iter -^1^1 ^pn % ■qfift^^1l«WTO"=FiT^w^tl 40fqR^ ^i ^n ^^pnl

The text on this page is estimated to be only 1.44% accurate

53 ^1^9q}i#ITf^t3T5Ejt^l3?f^ %rrm wk f^n 3ftr srI^M^!" 54 o|f 3[tR 'HIH;) 76 '%-sn^ 3w?cqT^'q8?H (4

The text on this page is estimated to be only 1.19% accurate

w* 2:4-32 1216 KIT, ^R-H)^ ^Wfa^ HRKd H'K ^ ^R^l^f On fowi^ ¥n snl %n|3TT"fe apft^^ci^fsfr, 3^ ■q# ^5t opt ^=q fenl opffisfj o|^f ^RPf % *ft?TT^:l#rff%i^'^tf '?atH':#ft^'ctM &n ■^#Hi ^S^ -3^ opqgf Tf ^ ^7T ^rr=ft 3 fcl fenl 8^ft^T^T^rTf^lfT'##Tf'5®715f^^ ^TTd % ^fFTT 3FT^ ^ff cpt W^ '5R' t| s)I %# ww ym ^mj^ -wbd ^t% ^hff) ^ps f 3TT 3fh: ^=T% Wf 3TTT W^PT ffa y^% WK Tf gtfl^ ^RSRcrf JPJ tr% ^Pl ^FR |3TI 1 1 12dj^'d^4^n^^ni%#n"fe'dqT^^i?i^ 133#*FR 3MH<=b ^ -W'Kd % *nSTW^T 3fk^'kd^\M\\ ^^S HIH d+)=)> ^ 22snr^MT^no(ft-siciTsn% 3™tt*i?t5r% fe "^ W 3fh: ?T^ "^ ^T ^FP7 3TM rfr ^ "%T ^ ^J^ ■HHf'Td oR^% ld*i •M^I^H ^^1 233«J ^t "sst^sn tJ %| 3gFm:, "it 1wt "rt ^rth ^^■HH^d HHl^l^lll"* 243TTT^^^raran ^j^rrf, "u ^il 4ld it cb«id< %^r «i^ oifa ^E^ ■srri%TT" ^t ^ oJ^^sn % 3™r ^t% ^ei?t^ ^ ^1 25jt^T#fT Tf -?TT?N ^m cPTTJcf) «pff 3Tk ¥Rj o#fj jsn^cn anl ^wiot^i%w-^'^'^ts %fnTWrnsfii'qt5i5r3fRqi"3?i%Tnsrsnl 26^fe sricrn wn ^ 'a^s t^n wn anf^^ra'd^'^w '5nj'^TRte'^

The text on this page is estimated to be only 1.28% accurate

1217 -^oPT 2:33-3:6 333^%tTl?n-i4dl 4Wj% &H £\ ipft^T^TcTf ^3TER^T^'-qf ^| 34jtR Tflrfa ^ ^t 3TmMk Tf sjfcff % TRff "En 3? SIR oRT opim ^FR 3tr T^P %fi 1%Ff ^stri ^th % #rq: ftsftRn f=Mi "to t &-Hra ftfci-is|ciHTTOoP7%-5t-n^i^f^L|^ hjk HI-tKd WZ 3TT^I 4%£R or? ^T?Top s^TTof-jpS-W flcn IPTII off sgcT 4&HH ?H 3TTT ^TO M^eR opi spjjf «ni «n^p%] 41ijsi? ■qof ^ wr ^rf^tep Trrdi-tw -4^1^ "IRI^ si I 42^ 'cTf 'sTKf WI 'opl f3Tl eft *K1 opt?m^'ciof'cR:ri^l 435R-qof^qra|3n3fh: ot W^feTl «T cTHl^ o|^T*HpSHelH t(t? jWI fep-cj ^rai-%T'opt^oPI lTa| TJTTOoP KfFl 23fk^f=TI cTSTT opi+)| Hf WM'^H^oHoPTo(^HL||i=(|| ■qiqf ■opf anrr % #r^ t^ fq^m % %g ^qfrirqi opi ■^oTTT'oPr^Wnl 4^fo|W|o|^M^||i||f %-oTERf-opt ■JRTop if ^TT t%M 5 : '1oP#oPT#T^T>'4oPKdlf3TT?TS;: *JPJ % t%^ Tfjif ?TTTT opft 3TTT ^f% f^ Tlf ^ftsft opftl 5 fT'srTJtm^^T^ft3TTTfT'qfT? 3TTT'qflft^qTSft^T^t ^st-T)^t 3TTT ^5T5Tf -MSTf Tit -HHdd op

The text on this page is estimated to be only 1.57% accurate

w* 3:7-27 1218 7^HI ?" x%?tt ^ ^tr ^=it} "^^n, "fen "ferr) % "qra ^r ^f if, ^i ^%, fen% to ^ if, ^=t% ttt?t ^fe ^fl 3ttt fen% to #^h it, ^ 41 t^tt il ^rrl" 12feT ^R ^3TO Wl '% trt ^f -spTT ^TRl :ETTfe>?" 13?Tt IT ^3TR ^TTt "5F1T, ""feRT ^Enfe> ^Tlt} 3rfs^ t^3 "ira ^rrrl" ^ETTfe>?" # ^tr ^% wm\, "^i wr "ferft t( 8R ^ra eftl ferft'qT $kl I l ^RTTTSWI < 3Ttt?t TT3TT tffel cftr ^TT% ^ ^?t T^^ft "%ftfe3TTTr % Tn«T ^TT% ^T TFSFSTf 3TTT ^TT% cfFTT ^T "5^% %j ^ra MricbKii 20?Tf ^ trfer ^ ^=tt ^t ^>ob43rk;%#PTri) ^TT5RT%l^t'smRlfHI 21"^3T13TT"fe^raTra#TT5(4id-WI^Tl ?T^ %T ^ 4t s|L|id4rHI "i^PTTl 3tk ^R ^Wj "SnSTRT "^T TIT ?TT, 'fT'HT 3TT^m ^?T Wl 223TTT "qfer 3TT?qT Tract,cJd "^T ^pf KfT I 24 T^ft ^?r Tj^rm "sfn, ■^^rr^T^^n, ^T?T^#^riT^T :JRT # :TTW^7T, 25 ^TTT^Hid^lg^T, HRlc4lf?^r3TWfTT^n, aTRTTT^Tl'RFT'^n, ^RlfT#3TO^ni^n, sra^ni^Tr^n^T, 26 Rfn^tTTd^n, Trra#TTt%feni^n, Hidr4IS^Tr"feRt^n, %ft^^lT^^n, #T^g^r^T331^T 27 ^Hl^^TR^T, %:TR^Trn"5fn, TTn^^^T^TfeT^T, ^TT^TfeT ^TT ?TT?TirI%T "^T,

The text on this page is estimated to be only 3.65% accurate

1219 -^cPT 3:28-4:8 ^F3r5^t "f^T "371, 36 37 38 ■$RH#3nTT^!^n, 3RTOR^rr7fa'37i, ftfc^tHf?d

The text on this page is estimated to be only 2.32% accurate

^T 4:9-35 1220 »cr oif -3$ nwkiH it "to afk wf ^ffe % 3flfll ^rn % ^ 3ft TSIT cf>f I '" ZFSRljfem 91:11 n3fk"firIMi|: 3 ■git 3qq^t Wt"^' T$ ^37 #t % flTT RT TT^ felt ^Ir^R ^t "R f^ I '" WR^fm 91:12 1:Mt5T 3 ^tTT ^ THT ^?T, "TOP? Tf -qf ^ff 1^31 ¥: ■qft^n t( h^T^mhi ^nt%3l '" TSjcim facnui 6:16 13¥T *T«r TOR ^?s??t ^ ^TT¥ T4 ■qft^T 3 ^ HT^fe:S^TT^%1W>^fisJte"5F?:^MITOl 14fe 3reqT ^ "?rt% 3 wi it ^r ^t ^rate W\\\ 15^ ^fe aW-^M3Tf Tf ^q^T ^ Will Wt d+)obl ysj'hHI wr *^

The text on this page is estimated to be only 1.41% accurate

1221 ^T 4:36-5:12 ■qs^ft^ 3TR ^ fiRl S^ Wft W^ Wf 3 ^ ^^Hiarf -afi 3TW ^n I 3TK 'e) wr f^f^\ 3n?fttl"37-3^^^f3tWTCTfT'^ff^q%'^Tf TWt # ^T ^ fetl ^(RI 38FTE! #?T ^TST=n TfflFJJT E# WlS ER ?mh % ■er wi m\\ ?mk ^ ^ra cj?r ^p ?nq ^37 anl ■^ftl 3*%t ^1% %fFi iafi |3n 3rk ^tf) ?nq Efrt^fell TTFI 3 ^ "®fe "fcqil ^f dc % EfTTTW ^ 3TTT ^1% Tmt T#prf ^t ^grf 3?er^t fttft arrl 10s^r % ■qsi ^nsra 3ttt ^iFaT e# *fr, # WFi % *n«ft ^, ^ JJEfTTT ^fFf 3TT?Epf f 3TT STTl # ~%Q "^ VI-HplH T^ 'Ef^/^^?f,-sr#sp3^^3^?f^FTSTf'E^-srJtTl ■EfHTTI!" "fqR 3 3TtR) TTisf %=iTT tr ^ 3TR TM fS r^TFT ER ^ % ii# ?t#T^I 12# "^FTI J3TT 1% ^T5! %J TTEff "RTR "^ an Tpfl ■^f^rs^qdd^TREfTO'sfrrsi^anl ^«(

The text on this page is estimated to be only 1.36% accurate

^°PT 5:13-37 1222 ?m =f^3 wi "®an, "-r ^ettwtti f , ^fe Wt *T1!" 3TTT dr^M ^5PT ^pt? "Sm\ tfm 14fq^ ^Wj R "5F% I ^rcl ^pti, "ri^p % 'qra ^n 3fk ^ 3tt3 3tfi ^rr f^n 3?tt rsi % 3tt3tt % ^TfR 3ttt 3wnl 41h iR -mi" ^ s^ki m^^i% TTR sn T# a^l 16f^Fd #g WT: WR1 ^P*R cP?T T^PRI'SRR' Wl^^PTTSPTdl ?ffl ^p3 % M "SRt ^T ^PTdT 17"^aT|3^"fe tiM T4 ^TW ^W^ Jit RlobWd ^T "gq ^T ■^m^ o(i# 3ttt 'qTM % *tra ojqf 7^-^ ft?" 3 %?TT Tf ^J ^ ^=T^ ~Sf%\ , "TSlTat #nf ^t "=#', 324 srmqf opr Rff, ^#sf T#Rf ^ ^t fq^TR % t%i^fH3Tffltl" 333^FR %T T^ ^WT, "q?=TT % %sq WT: »RT 77^1 3TTT'qT?RT^T^Il afk^TFt'q^tlM'% 3RTM Ml ^!J1 1 "f^Fd 3} 3R/TM'dtFTT4iPT ■^■qidTW^tl" 34%T^^R^lq?5T,''^TT^%%3Tfdfat^5j d=b 4t 3TT^t ^M ^FT ^=T^ ^R #M ^TT%TT I "fq^T ^R 1sp#RqT%TT5p^ob1|iob4|Tp|f ^T^^Rt q>llii

The text on this page is estimated to be only 0.91% accurate

1223 -^opT 5:38-6:25 Urst ^TT 3fk TRT# "^S fT*lPT>TTl 3S#1 ffcir ^Fff o cs o ^7TM?ftsJt3ffr:3^*ft^tsJt, #3s% *ira ?i? ^Mfe iJHobl' oFt^f 7=PT 3^T5fil TIHT f^ft % ^TScT % "f^T opt *ft"EPj%l" %J 5R7 W % fo TMt «t>T 3f^T felt «IHT *^ ^1 % f^l -fan f3Tt 1% ^f -q^t Spf *RT ^#=n fW iraM fan sni 7-si#f ^t s^itHl 3ttt -q^rMt ^f ^rt ^ ?rra 3 0 % w ^t % fe fe^ ^ ^ ^?T?n 1 1% ^#'1 ■aTfe ^ ^? ■qr ■5f?r^TFT?TT an,#^r^^r^n^wT'^^n%5^ ^i?T, "33 31TT ^M^WT^^ ft ^Tl I "'3?33[ 3ffr:'3f1f'*a3Tft"rFnl 9?ra%J'3#'Tf3^i?T, "'R dH+1 yeSdlif-^W^ Rh fi-Hl^T *ffiTobHI ^ Cs I ^TTSRTt^tfTft m|=IHI,'I5RTI^T^T5R'^eIFTI 3l^f^f5R#%#^^Ht*ictJM^T 4t u* «k1 qts «Sti ^nar^t'HH-d -m^R-mi, *i*»!(i ^t ^S ^f ^7T, ^TTS ^ ^1 23d^

The text on this page is estimated to be only 1.54% accurate

w* 6:26-49 1224 ?F| fijofoFK t, ^ 3M W it #, 26"tjj% ftofc(7TT i, *re ■gwt writ it ^ffl% ^T% Rtftrf 3 *ft ^ ^TtM % *H21 %3T eloign 27"3TT ^RR^ «f! R ?^ ^J^n f 3^ ^ R O o ^ o Rt ifa ^ftl *Tf RRR ^TT Wsl I, ^3R% Rl?l Rt Rtfl^'ERRl 283^^3wi^fe^t,^rgri?TFt^ ll TR% t^ Rt 3TTSTRT cfRt 0\ RR?R. R[?l 3T^R ^RIfRRif-5?RR| 29Rft's£fiRR?R.RI?TRT SRRf rr. rt ^ro ri?t Rt ^3R% 3tf) rr ^n Rfc -^ cf?rj RJte ^t ■?) RT ^r 3rri r?r[ Rt ^ ^(r ^ri 3(^Tt ofj$ RRR rr), ^3R ^1 Rfe tfii cFlRl ^5 w^^^R^RiTORcTRRft'l 31gir awn1 R^ ^m "srafTT c?FRf R Rl?^ it, R1! c?FRf % Rl?l RRT it °WKRRRiRiiiRl 32RfeRRRR^it'RR"^l ^ tlm ?ra "R :?I^?t, °WT&) ^1 ^l?l 3T^t TR1 ^U13TTK(Tl 49fe^^?ri)

The text on this page is estimated to be only 0.84% accurate

1225 w* 7:1-24 7%} oM cjrf # ^rhi ^nw?n an, ^ ^ ^ ^ ■qsi sni ^w ■&&; ^ra w?f far anl %thfw^ ^ ^tej % 1wr *f ^n ^t :3TR 7^5 ■qra ^n "fe ^w 3tt^tt ^i% ^^ % wi ^n ^1 "^■^n^l sTf ^ im ^rrn ll" 3TT%| 7^lldi) ^^ 'tTOI 3TR TO ^^#'#^1 f^F^^'^r'^w *rc^,'RTi^TOTSi^?t^TPkTl ^ ^wn f W Hl"^w wi ^n?n ■? 3?h: ^ ^ ^ ^WFnf afl'Ht^ 311^^1 ill 3rh:^ra'R3^cTO !M^T "^ ^ ^ TfTl eft" ^ ^T IT W3 ffll^R ?3TT I # ^H TR? ^TI% tf© ^E^n sn tit «n, ^T^t tiw 'tis 'Efn: %t ^ ^fi, "q ?pf ^?n?n t %n lttfq^: ^#^'$dl'M«i oiN-H'srT'qf^'rfti'sT^ ^t ^E^n ^Fnl ^n% %R 3rh: t^ ^ % ^g% mat ?ft| 12E|f ^t # "=^7-^ % "Pra^ 3MT ■??t ■E^f ^13^ "^ ~^?\ ^TM ^T TfT anl ^ 3W=ft i^SM^f'Efn ^'H-HHNK ^TM^Tntl 23S(W^n% SPT 21^i5j ^Hl^n-H^l

The text on this page is estimated to be only 1.49% accurate

-^°PT 7:25-49 1226 "?R fa<4|s|H « Tf opjl ^^ 71^ «fo opn ^T Tf T^sft^^cI^TOTlWJl'fe^T^ xptM % 0? cRT opt^ TOR 1^FR "^fcT 3rRcR5t TO^ ^f? ^5fjr gjpftl 383W TOI% i© TO!% TOWf 3 75ft ^'.^^TtT^UTlH o|W M^'laifk^H^IRf oUI sftl ^W ft "# sftl 31TO} 3%3ff T4 ^f? TOI% ^T -4I°h 3fl^f ,^#TR-¥wT'^it 41^ ^iirlti 26f^g 1rofR ^riti 1tot toh to opt 3irot wf f4 to^i ^custT g*r wi\ ^g^ "n^ ^? ^n ~s$\$ "=rtt? it, r aro to^^^^^ to "pt^f?T frail 393*i rF%^TMTf TSFir^T^^ait.oif tsr^I h41t4 TOfteft 3 ~fa*R %i opt 3r3 to ^iFn «n, r? opff 3?fe fi 2>raw o# I #ra% "faror t( %3j 5^ot)

''zri^z^TigKq^^nnl" o|f^lt'cl#ltTW^R^7TII' 403TO 3 %j t} ^3TOT ^RFT, "7PTR, ^ TJff 7> 28"R" ' IS ^i ^gf % T^^TO^^^n:^?TiThf4%n, '\^^t "FT^H^f^'^ft^Mt'qT ^^■^wf'fon'fsFRJI^'^'fc 3%3Tff4?TT rW^^I ^TT^I 3TITt%T ^ 3T^ wf 74^1 4srFt isFrtrRH^Tililr f,TOTOf^ft

The text on this page is estimated to be only 1.37% accurate

1227 w* 7:50-8:21 5Od«t0teT0^r^0t0'oWl, '0f fc^c|W00ft tstt opt |i T?#a % ^nsr «nl" 0fe] 3R0 %qf % ^TT«T oFiy-HHNK ?M'c#:?fn0|lTRrJT-RrR afc TffoT-'iTo) MH^ %0f 0 ^s0 wi, "^T c^jRl ^Sfl ofJi oTqiarfi?" 10Stt ^ Tf^T

The text on this page is estimated to be only 1.80% accurate

-^oPT 8:22-45 1228 22?Wt T^P fe T^Rl |3TT fop -51W 3iq^%STf% % ^T4 W ^fl" # ^€ft TW\ T3B $\ 233M ^ ^rawix! s^, ■q^r#"rFTTl "sftoT"qr 3M-cTtpR TTf ^1 24T4t" 3 ^H% W 3T1^ 3TR ^ WJJoFT ^?^ ^Ft, "ToTpft! ToTFTt! Wl ^ T% f !" fqR ^? T3%] |3n 3TR ^tr} 3tf aff cian wtf ^ sfeil^ 8RTF?f3fk ci^T^uPd'si^l 25fqR^TR} ^=^ wi, "^pfi w tpfri f^ra?" fop^r 3 st JIT if 3TR STER^T'cf ^1 a)| 3 3TTTO^f'^, "3TT%T ■jjf f-^h^-^T 3?r qui ^hI^^i^i 5dit 3tr 2*fqR 3 Pki^Ih-mT % ^ 3 ^ *ft wfa ^ftefopwR)TR^i'qR ani "^if^fop^R-qr ^3TR1, "RnT ^71 TTop ^t> ^ fwil ^mf ^IcHI^ WJ\i jf aft |i^ W ^nar ^ ^oM^ ■op) Hra?ft -opt tit anl ^j -qr ^g ^ ^t ^w ■op?^ |it ^fta i^n "1%, 39'"er ^n 3tr ^rf ^® ■qr^oK -^ ?r f^ fop^n f , ^ wn I " T^foT? dVoP

The text on this page is estimated to be only 1.50% accurate

1229 -^oPT 8:46-9:13 ^T*wt HHI WT,"3^,^ fe^^^^nfeqiil^i} *r5R % *rfen % -er: f4 mi w\$ 3?m 3rh: %n, "?fft it£\ -rt ^^ f! # t]? ^t 3^ 3rh: w*z. ^w Si" 51^m ^tej ^m^f 3TM # ^F^ 3^ 7TTS1 MdW, -HS— II, ^l°b«l 3TTT ^s^t % 'RFTT-fel ^t ^ff ^7T feft 3Tk ^t 3fe TTO S^TT "=# 3Tp} fell 52*W) #n ^H ?fpp) % fe ft T# 0 3Tk PkrIN ® W^^ fel >*i$l" S6^I ■qr ?ifspt % ^ra fei cpr ^ 3ter^ |3tt feg ^T3T "^ ^ 3T1^T fe % # ETJRT W^\ f, ^f4 3 % IRT «tR? %qf ^T ^H ^RT 9 fee ^T 3 ^Rff %5?Tf ^pt TYPHIS! ^IPtll 3|R ^%' ^d|rHI3Tf t ^ioblO fefT^ ^H 3TfsranT3TR?Tivl5^R^N-H^'i(lJI^T^T^ o|ft ?Tfe *ft ^t| 2itR; ^g^ ^% Mi^l^oK % TTST ^7T y-HHNK Wlti 3TR ftfef ^ WW ^T^ % ife ^1WT sfell 33^ ^=TT4 BRIT, "3FRt ~%ff\ % W$ 3TR "R ^ 3lirlRdi ^=Tl ^ fel fefft 'EtT %*te^3Tt, olgTd^'Tll 3TR^t(d=t) fej#,^ff ^T?tl 53fR^f^#f^H'?rn^Fra^'^: HT Wt cR -&$ "=FJT s$\ ^|st Ht ^=T% fe^5 "T^t % ~$R ^f 3FF^ TO ^ 8^1 ftlf ^Tl " ^sfRtril'D'obl^'ll °b'qaiwTFn#^'>|)^i%il#?r #l ^^^T^^prafen 3TR ■qr^r % ttst % fePT ^' ^%' ^TFTTI 3TR fel' ^qETR w) 3Hioiv-MohTii aft.^ifeifeni 12^ra fe ^fe ^m t?t an nt 3 ^irwf ^i% ■qra 3tf^ 3TR #^, "*te ^t fei -^rc ?nfe ^ 3?raqra % ^M 3tr tM ^f ^TRn: 3rrau 3ftr #^i ^n ^% oFJfUp -ft ^?f ^pr feiH ^stH t( fl 13feg ^F^ ^-RT4 ww\, "gT it 1=% ^ ^Pt ^?5 ^ri" ^ ^, "fin} w* qfe ftfef 3tr ^r HsMoptWlBoR 3?k^» ^^'il ?T^WHt ■=# "Efiwm t fe 'ft ^m, 3TR i^ ^ra % fe; #3H

The text on this page is estimated to be only 1.10% accurate

-^oPT 9:14-40 1230 f^Fg ^tWt ^ 3^ ftM 3 ^wi, "^%' wm wm fenl 16fer ^j^tfe flfeif ark ^ qsflmf ^ #R^cpfo^ 3ftr ^a?t ji^% fy'n m^dn opt spq^-fen 3rfr: "fer ^=t% "g^f ^pt3 jit ^%' 3^%5JTf^1^TTi%^#rff^TTrte^l 17#nf ^T^W^^T WTT 3rfc ^ w "S^f $ ^r% f?FTf ^ «ITTf ilobRiff *tff| 19nfei#5rci ^pto ^TcPTH ^n ^tt ?rro t "fe w w! tojt ^t Ht yiki m\ 29feT"^Fl]pTl"fe'R18Rl ^T^ Jit ^1% gg opi ^^q ^5 lira # ft n^T 3Tk ^H% -5R^ -dH-dH '5PT^ ^w! ft 1^1 3(^?lf ^1^ ^13 ^7T^ fir ^t gW '3^3 fl^l ^ '■TOT 3Tk T^pqiW ^1 31^Tt 3W^t ^f#RT % HSt 'R^S |^ 0 aftT -Mlyj,

The text on this page is estimated to be only 0.82% accurate

1231 ^Jcffi 9:41-62 "Rlff'oTrTTIofcl" 41?ra tWt ^ ^tt fen, "sir 3#^tTiM 3rh: *TSopi^^#>Tr,^f3ik PbdH fen d^l< TP1TIFJ1 sfa opsi ciop ^ tiwctt t#tt? 3^ ^ ^Pt ^sf 423mt^lf^l?SpT3TI#TWIsn'f5P^lrHI^^ ^T^ ^ 3^T 'RTfe 1^ I foTFg 'qWT "^ ^s 3n?RT op> LbiobW 3?tT ?|f% opt ftTtT ^PT% oTFW ^3T!% ftcTToptT?fq'feqTl 43otTfflt m^dn cpt^TT HSHdl T^^rfoPcT^t^l ■jft^T # of® ^7T TWT »n^ 5 I ^ w T^t wftgi «ftl#o) 3-^'*^ «(S| et>lnl7 47^T"^^H%n ■fsp^T%-jR^'ohmfJi^n^i# Wf W oPfT, "ToTPft, f^ fft "^m 'qr i^P ^rt% =pt ^irHii? In^Hd ^gi t 1 f^ "3^ ftsp^ opt w^ %ijij opffisp o|f IJFf'T} optf^fi.^t ctTT 3)jy

The text on this page is estimated to be only 1.47% accurate

-^cPT 10:1-24 1232 _L yj^ ^ ^t^ "f^1 ^ ^ fe-fe "^tttT aftrfsiFrf^rc^fow^Hi an,^-^r^r% "^WcT W^P t fefT, oPW =p^ c(# *PRT ^PR 1 1 ^1^ ^F^T op JPJ ^ ferft cpff fop o|f 3PTRt Lb-Hoil' ^f TfSKZ $&\ %# 3ffc ^ T#, ^R* Tp% Tl^^'feft^HR-toPK^ToPTraopftl Sfefeft ^R^f«H3Tt, +)«!+) Mg) <=Ml '^T'ER'^r ifllPd Ml' *rf? o^f opt| ^nPcm^f'sri%j#n?Tt'gwt?TTi% ^ Wti iWtl fen ^ ^? "sqfe ^llFdMuf "Rff fm ^ Ti opfr ark ^rat opft 'm^°h ^pi (H d^R fe^ 37Tqf=ntr 103TO *TW oP^ ?R feft T$ "RTO Tf ^TT3TT *1?T % c^T feg^? ^l«(ldTO'5RFTTrait3fr1oW^lcHli|d)HI^'oraTf f '#op 1^ tr; -g^ra Ft3Tt foP -gcfK "=TW wf ^f 3tfeftl" ■% ^t WT ftcfF ^ 'HTsfdT |3n 3rtr ^n, '% tor "tei t ^^f 3rtr sn^ft % foTFTtl'RrJd-kiid op^dltfefT^FT'STFTf'oPt'oMT 3TtT 'RfeToTH #rff ^ "gqT ■oPT T^ |^ *ft f^T3ff * % 1^ ^ ^ops opt; fe I % TOR "tel feoW it Tiik!T?topr=n^n??Ti8nl op feo||i| opi| H^l'^praT fop -q^f -0^13^351% ^idRdi^^'^TF^1:opfq?n'opbit,^T^t% fel f3^ ^51 1^ ^oPS -oFRT ^oTTif?n 1 1 " 23$b< Rl»4l' optTO^P^Rf

The text on this page is estimated to be only 1.23% accurate

25?ra ijdh ^m\m\ ^i|3Ti3Trc. ^^"qften 27<5^\\ #^l* *ft Wf 3MTI ^1^ ^ ^31 3TR ^5 *ft ^TiteoR- wtark wiwi 33l*-d ^ *mrn ^fift, 34# c|? ^S% -qra 31FH 3TR ^S% ^ ^ ?fa aUr

The text on this page is estimated to be only 0.91% accurate

-^°PT 11:7-31 1234 SW& wti 4^ =Ft =W *ft^#tl' 73fk i|||'ct:^R Spit, &H

The text on this page is estimated to be only 1.52% accurate

1235 ^T 11:32-54 #PT W tM % #rlf RT 3#P?FT (rl'll^'ll 3TR ^ ^tqt dg< \A>\\ ^rffe ^w sr^tI % ^fr ^tff 3 rr fwn ani 3rk ^r 3^ nt #n 3 *ft t^ %=T^PTWw«Rt f++il «ld~H % *foR HgT «sWI, «ff^P olf ^ ^te rt Ttm I ttt^ ^rr *t)rt amf gspm ^a ^%l 34^Kl%'5fn#ragjwt3iftil,#^3fRS I Rt fflfl % 3}£|3PRRR ft ^ffift 1 1 35RT «ztH tI fspcRfR 9ftrc oPT3opm3rasprc"R?Tll 3631R: ^rftd^Ki-HKi ^i(k;ran^RRRofi| 3tr"?r5pt opfif *ft 3R1 3iajobH^ Rff I Rt ^r? Rjft TRf i$ ^IH+'ll RF?t cptf ^tqsp RR RT 3FFR f^ff Tf 'ERSPTflftl" % 5TCT % ^R Wf cpt TRCT Hp^ 1%RT ^TRT ^Ef#q KTTl ■RI?TRT M# Rf 3T?^R1 Rgroiquf 3TOR :EnW^ ft afa ^WTRi R"TRqnf RR^^R % fecprc; fi ^rffe hr #qf w "^r %r ^n^ ft &^' op§ ^# ft ^Rfe ^ gjfl^-q^Tft ^#FffR^R5ptf?^ cptl 483*WTJR ^ fel^ft% cIR 3FIR R#3Tf % ^R ^TlRf ^7T ■RRKR 'SPT^ ftl opjfflp ^fR Ht ^%' RR7 3TR ^TR ^Rspt opf ^Rlf I 49^-Hl&i) 4#'te5pRt,'5P?PpgRR ?TR ^?t ^3ft ^ Ht# f I RT ^RR "R ?Tt tTRR ^ ■q^Tf^n 3TR ;3Tl"q^T ^TTR ^T ^IRR ^T T# $ ^R5Ft «ft HRR ^TSn Rf^l " 533tr fqR ^ra %j ^wt 'R ^n ipn # ^ sr~ ?TR4t 3TR RtM ^RR ^R 71^31 WR ^Ftl ^|rl Rt'^ff%'^R^'3Rit did y^H 4^H d'll 51oWlf+ 3 ^R ^R°Pl =Pfl 1=PRl «ira ^R R%TR =pl % Rf W\

The text on this page is estimated to be only 1.94% accurate

-^°PT 12:1-26 1236 t* 3H*IHI ngl'i f*)*HI Hsfl'felMKi'lll 33R#IR?TRf RlR'faR hrr ^ft r' o(^t i, ^^#f r' R/ft «nMl aftr T^ra RTRTf R' Rt RiS R) cRR RRRFI feft % ofr t( cf^i f, Hobul R?t "^rf rt r RtiRa fen Rwrrl rrlr^<=kr^ 4"f5FR R^ tRRt! R' RRR RifRl f ^3RR ^R?T ^R Rt rr r«fr ■rtr. RR rr wfti 1 3tr ^r% rr tRid^'fob-HRsHHMlli^l RR^%RR%tRRS}R'opl|^K4r1dlt,1%R[ RtRfe} 3n?tn^?tiH' "3^ 9q^ T^, ^ 3 3^ 3TFt opt ^T TSTtl ^Tffe 3^|o^i|of,dl ^ 3#5p w*fc\ #^ tr ^ #=r ^n snsp: ^^n 16feT ^f^ 3^ irsp ^ri 7=pan^Ri£ "Hp^ft SFft"3Tirp'opt8RHt'tRm1RTq5T1ffl %3^ Os o TR ^f #E^ ^ ^F^ Wn, ^ "oFn '5p#, "IR ^TOT ■?RM'5PtT^%i^:f8n=i?Ttl^#T 18fqR^r^ ■opfT, ^)op f R ^f ^#m 1op 3FR^ 3F1RT % ^M ^tRRl ^R ^t ^^ «Ho|l-S)Jll 3TR 3TTR^Rot Os 3Rn5T opt 3TR ^TRR op> ^f T^ sJtfml' 19JRR c\ -o ~3^m ^gif, ^ R ^TRf % firl^ ^ RR? Rf%?T f I ■Eran Rci, ^gi, Rt aftr ^ ^sti1 20feRj rtr^rt ^R^ %n, '3T^ R

The text on this page is estimated to be only 3.01% accurate

1237 w* 12:27-51 ^ *fi *t" *ft to *r T^to Hi" 7fa * "to "ton totolit? 27*HRIto"*toito lttotoT^*ll 28^&i)5HTO *t 'srra to # 3tr to 1 to 1^ *?r it «ns ^f tof> R^ii ton, q^to^^^'^Tf^icnttotft 3WQ faiMlRwl, ?f| "dto? 3TK fsfto, it tol* ^51 ^tolll 29to "ftol ^ tot % g*T -5FJT ^aito to *^i toto f^% tot ^r?t toftl 30 opjfUis ^ro % to *nt to f^ ^to * to $s t! I ^r g^in to ^ it ^t toft l 32"to toft to, to 1?T, tot* cTWT 'TTR toto^'to^Trtototodcqril 33#3mt ^nfttovE?*! 8R trW 3 % ^1 3to TO ^ olMl obl'H ^cpf t[ ^srafr ^gl ^l tJk *t ■qf^f ^ itl to ~H ^ to Wfe ^ *T tol 3tolT* to ■gc?rn tor f, to gr^rn ^=t *ft T%TTTl 35"to*rtonr-tKI d-MKTFTI 3?K 3toto* ^dlH <

The text on this page is estimated to be only 0.95% accurate

eJcCT 12:52-13:16 1238 if, 3rfc ^T cfft % f^ffa if ft ^Tpfr) I aftr "55T "fq?n % "fsffTsi "pf, Tfl-i^ikf^fteif, 3Tk ~sf£\ ttf % fsrffa if, Ft, '^n 3n T#t i' 3rh: f&i %rt # ?fai il 55-sk #e^ -^ #r% ^rqr yfteTtw % ^f 3 % ^r ^ 'm. ~sm\ ^n #^ ^t, ^ -m^mh if t?3 ^ ■^ wft °^Rti4l* 3 3Tfe 3TTnsft at? ^iff, r* TP% ^cTFTT # % ^ cTO R^ R fcR13Tfi cTt" D#sft^ff7t^F«ftKnl 123ftej"^^^ra^3Td> ^ 3PT^tTCf^Fn «k'5FfT, '%^t,^ 3R^fh TTKf T73 i^l 3fh: ^w ctttt ^sft ^aft 'ft fpftl ^w 14^t ^ ^ftito ^^sd % fe ^ f^frt f^n an, ■^#1^ ^t-'RTSRT-^M % %1 ^ Wt&t if W ^T #nf ^ ^n, "^tr ^rr^ % 1%q; "®: fe ^ f # -&=g\ ft€ if 3n3ft 3fh: 3r^ ft^ ^r ^^T3Tt m 153«J ^ ^R ^ JIT ^t ^fT, "3Tt

The text on this page is estimated to be only 1.10% accurate

1239 w* 13:17-14:6 ^n%^ an?" 17^m ^r^ ^ "sfwt # ^rra fstffa ^tt^ ^ ^wt ^Trt ^r^n ^ "qs "n^ I ^5 sr mt *te ^ 3WErf:'qnf opff^i^ 4f ■sfn ^r #n?" ^r^ ^^ ■^n, 24"fe^ 'sr i^'q^T ^rr^ ^t"?r ^F*ra wi ^??T'^'^T^t'qT^n H^l'4ii)Jll 25^i«i y,T *

The text on this page is estimated to be only 0.89% accurate

-^°PT 14:7-32 1240 7^FTtFP%[^^^1%3TFffa^3W^RFl ^3Rcpf cpt^ «^H^IT^[R#3TRis},#^RF] cptf "FFnf ^tR ^n% # "5tm isf^ft 3\\« 3rfsFP «ifi ^rfe ^h% un ^iFti w ftl *fer ?R #ff opt *pffR ^TFTl ^F?R TTOT 31FPT n 3TR # 3fir sm cpt R^iFFn, ^^eiifp^^^friii" 3HHI°blH) ^rr ?Ftl 'q?^ "R ^*F) cpfT, 'rr T^ ^RfafrFIlil, H$Nl3T 3 Ht ^R ^F^rf, 3Ft#3?f, mil 3TR 3?sjf ^t^nl 14fqR^rfFP^=T%'qFi^^FFf^F) sfi ^® ^#' f, # ^f ^ 1%ii 3?mFife ^i ^FVnl l^raT yirl^d ^ spff qM % ^ft ^J^ ^R "FFTT ^rrnil" ^#5T^pt^RT^p8?T 15ftR ^H% Wl #^1 ^R t| #rff t[ ^ tt^ ^ 16cFf Tftyi "^ ^?F} ^WT, "^ "5TF15 FfRTt ^f #^ opl ikRl ^R T^T «n, 3^F> s[|cl ^ #rff opt =%n i^nl 17fqR '5F^ % ^ffi f¥% ^%n i^n ^TT «n, ^TO op> «feR ^f ^HRI, '3TT3TT opjffsp 3ra #^i ^nr ir 18^ ^ irsp 4^ 25%T % ^Tat 3FIR ^R ^F[f ^1 RfT STTl W ^=rat?R^^f7 3lk'#n, 26"^^R 41-H 6p|£*ft sncnfsfR 3FF)fq?n,'RFfl,'qr=ft3fR'^5^f, 3ff1 m§^t 3TR W% 3TR ^ ?FP FP 3FF^ ^sfFRl ?FP ^FPcIT! 27# 3FR1 ■gRI ^^F> FRTT ^RR ii# 'ERFn f, WRRT'f?M";lffft'y tRl "R '5PT ^ ^, FF?ft ^3R> ?R5 ^R^ ^3T, m ^RFPt M ^§FF1 3TR o(j^| 30,3T^ ^# "^1 ^TFW ^ ^IFI ■RRTq tRl "Rff cPT ^FPTl' 31"^ ^lf RFH %FT fFIT ^t FfRTt ERR RFT1 % FRtSt^'^S"^ ^TFl 3TR ^ % '5PT ^f FfETR "=1 o(5^ FP 3FF> E?R l^R ^RFPt % ^I«t '5Ftl ^W 4kf f^R ^Fpf cfl^t 3FIR 1cRt?ft ■EPT ^RFRT '^PT ^^^fW^I^'I 323TR^^f RFTsf^€f#nT

The text on this page is estimated to be only 1.42% accurate

3Tf5pT 1SRM 3TOT ^T>f Tf ^ #H CPft cf? SFRT "5rirTpTfsiTfe^I^T-5pT"?rifrr-^f«I"5FTy+d|c| <=t»^J||| 33dtfar -^ wm giwf ^ op|^ #^r 3^ ^ ■hhM ^pt wi ^f cpt $m, %J %*T ^ff ft TTcpdTl 34'^TO^ ^tF? f tit Tfc ^W 3TO1 TSU5 # ^ fM # t^S 5^^t^ft?l^ 1M> T43R ^ si I TTT f^| "^ 3^ TT^ Tf^ft ^^ T#' T?t| 17faT T^Sf ^1% itTI Idobl^ 3TF> 5Tt m %n,^rfan%4i-H fed^itM^RTl#H% 4i-H ' o Tjf^'R'3fTTTspf%1:5TT^ Tm"F^nt,"^3M3fR sfem rFHTTT^f opg

The text on this page is estimated to be only 1.35% accurate

^T 15:25-16:17 1242 ^ftftfi it fFn i 1 ^w # fFn »n, ^r 3m ^w fei "w TJ^I 2*3^ 3^ T^R T^p opt jjtflotK Wl, ^W *ra =Rn it tit I?' 27^^ ^ ^h^ cpit, %t *nf 3TT "TF7T 1 3TR ?R fqdl "^ ^ TR^Sld 3TR T5Raj ■q^T qsfj Hldl^II *«l obiolWl^!' 28^fTqi^3TFT =RI?nit^T, ell *ft31 3 it ^M #^ "=# Ttftt^fSot SR%foFPTR'HR'cR'opbiqfRn ■oPTm? 123Tt 1=p# c?FR opj f z^ ?FT ^1% ftft fsRoira % -qra ^if Ti, ^ ^rr cpirt i, ^ 7$ ■opbr^m? 13"oPtf ^t^RT^r+o|lM^pl+lo|l H^T°b< -Hobdll ■oil ^T Ht TToP ^ -SRI ^RTJl 3?R c?FR ^ ^q ^T o|f "^%yid-HHi4d op^T, "gq^tit##Tf'5pt''1W^dHMI^dit fop HR ■sip 3Tal it foP^d ■qTR^oK H«1R RHf =PT ^TFRn^l

The text on this page is estimated to be only 1.05% accurate

1243 -^cpT 16:18-17:10 fe felfal % ^tcR oFT 31FR #it «nl 20s#' ^IRT"Rn'5FTi^^R5:^^I%5RTRTlfTTIfn snl ^wt wk 'srraf 3 *ro |3n «nl 21^ er\ TP STTI ^?T TT=P % f^ *ft 3T1?I 3TTC ^0% ^f ■°^^Wl#W'fd^^*nsbT^$5ll$'lH'5pt "'te^steil^nlfq^:'^ sRtg^r^'RT:rM3fk ^^FHT~fciiwl 23^^P^f?if^j^^H^ra 3M s&] op* ^m ^JTIT 3TTT cf?lT ^N l^ob sl4l tell^M ^ 7Ffttdlf* •M^T'^ -mR <=hl^^ m-H 3tHT^l|,'^f^II "=T *T% 3TTT WI f) °b1| -4gT aTT^TTcpl' 27

The text on this page is estimated to be only 1.27% accurate

-^cPT 17:11-18:4 1244 nfcR ■*& 4Wj, mw\M ^tii anHt^w -hihR-41 3Tkw)?I%#Ef^#RT%'TOr^P|cbdll 123M w to "nra i| :^ tit «n ^mt ^sft ^f? ^tft ## i ^ ^^■qr^ ^l "t^TSRifTORw?;-^ 14fqr ^ ^stf} ^% ^s\ ^t w ^t?n, "^nafr 3TK 3^ 3TO ^ -4M°bf cfft-feT3TN" 3 3?^ ^T #t# ^"fe^^te^wwt^l 15f5Fd^=iifft TO "^ Wt Tl ^31 % W '5T§ it "W i , c?t"31 wra ■?ftei 3fk ^ t-sr 3 ■qr^rc ^\ Tgfi wr^ wni 16oif tj? % -^r ^ % ^r$ ^' "Prc ■qsr sftr ^roi 3n^R ^ro "f^ni 3?h: ifcat, w to Timft arrl 174ki "^ ^nrt wr, "^n tw! ^a % ^f? ^te ft 'to "=#' it wf? tqr 3 "=ft ^fi it? 18^it ^rr Tdfd ^TT^ WW "=#' ?ftel" 19fqT :!fWT "3 ^3Tlft ^n, '1:?a37 Ft 3fh: wn ^, ^ f^ra "^ h^ 3T5e5t "fentl" 4TTi 26^-#)^^%HRfR'?3n »n,tFW%'g5t%pRf'fli lH#lll 27"3nfe?ra ^sra "=iw "^ "=fei if -g^T iwn, #t 731^-^ tI, ®Mlg Wlrl 3^T ftolllifl^T^Tll'fqT^iTl ycrl'M 3TRT afk ^TT^ TITOt ^S ^7T "feffl 28§TTt ■^TTT Hlcrl c^r),"^E?^ -Qdl \\ 3TR

The text on this page is estimated to be only 2.78% accurate

1245 -^opT 18:5-27 ^wt t, # ^' Mm "fe ^ ^m 1% ^ ?ni% "ft^ -r^ ^ -spfi, "Mr ^? ^ ^rrasfr^T 3 ^n ^?i anl 7^t crt m*te=K a^ ^ |^ #nf n »?H^ff^n"fe^i,^Tr^Trafe4ii, ^^|7«Hi1^n^pfaTr ^ wf % ^ 3#WRt t 15#^3FT^'^5^1"cra'^l':'f^T%'ctra^nTl $ -eft 3W^ tro ■g?n^n 3tr %^i i* sm, '^ ■£& ^s^f ^ ^ ■qra 3n^ 3r, i=f ft^t tra, ^rffe opt ii^ 3Mt&t ^ ^ ?m Tiwm ^#'^r?n, wf ^■^^'■qi^rjl!" 18fqR f^rt :qw^( "^n "^ ^ ^ ■qsr, "3ttr "n?, :Enft^?" ll 203"ara^an% 3^1^ff^Ht^iHdlt: ^#rETTT k, 3^ "te 3TR "RlcTT ^T 3TRT ^Tl'"* 21w '5iw^ "^n %n, "h fi ^^ ^wf =Pf 3^ ^\ 22%T ^ ^^ ^ ^TT ?Tt ^W ^S^ sfKTl, "3?*ft ift wt ^5 ^ %et '5M aftr f&i ^rr fq^, ^ "nfWf ^f ^fe^l ^ ^ -W'R ^rosn; -fq^ml fcR; 3^ 3^ ^^5^1311,

The text on this page is estimated to be only 1.83% accurate

w* 18:28-19:12 1246 28ft?T WTO "3 ^JFT, '%3, 5TRR" xtW «Tt ^7® If 29cR %J ^=# sjfaT, "n* •H^ll^ % *U«1 gt^ m& sm wi ^r fen #, 303ik ^ ^n ^tor ^T Tf o(^- o(^ Tjqi 3#37 "R 1*# sfk 3TT^ ^# %Tir^R#3^n 31ffR ^T^=I sIKWf ^tTO 3TtT ^ «IloR ^R^ #JTl ^'SlW'ftsjflSf oRt^|qi^l%TI,^?15fft#sft nta^ fe ^? %* *ft ^tii" 3Vwf ^ =Pl^ ^ STTl 354Wl *1s| ■4 ^ "^n^tTfii?" 37##>Tf^^ra^wi,''Hi-H(l4Wi qirn^TTfi ll" 38# 3isn ^ sf^{ |it tor ^37, "^F3^ % ^ "4t^T! "gff T?: c?TI "^T I " 393 ^t 3tf! w tI 0 ^?R ^?ra ^q Tin opt n ^sn wi, 41"n ^n :En??n t? n" fft f?R wn ^*h opgT, "I to n %r n ^am ^m?n f I " 433rh: -gr^ # ^ 3M "te ipff I ~?m wrFm 3fk %T ^ :J^)?r n' 9%T ^7T% ^R 19 TO "sqfe tft nl3R anl ^ ^7T ol-Hd^l Wt ^7T ^ ^ ^ ^?h ^7 tit an % 41 ^i obin 1,^1^15% "^rrr^r cnf^^'mTn an ■sprffe ^wt ^ ^tei snl 'Hgt ^w wt % 3?Ft ^te?n ?3n to i^it % ^3 m ^n TT^nit^T P)ob ^t aifk 'wt'^'ER 3n%fsr'^nn 8IV^ctct4^i!3n3?k'R'R:a'#n,'%TOi, afk ^ n"n feft ^n "es^t n ^f® «ft i^M t Ht ^ ^M^r%'^teifin!" 9'tWt n ^s^ ^wi, "^r 'er: nr str ^^r 3mt 3rh: ^rot tct % 1%it 3tm 1 1 " lTO3?fl3fa^#E^?}fe4

The text on this page is estimated to be only 1.04% accurate

1247 -^cpT 19:13-44 -fEptftcR^T^PtWl 13^t^^3qq^^^siSFf-SFt Cs g?^3TFC^R3f4fTTO^^^afetM3TR ^R*q opgj ^ c|cf> •% -#f fR^ opff ^[MT cpftl' 1TO^^7#RTC%^#^, ^ftPp tt f4 ^j?r ^wr, '3-h% '3^ 32fqR #f# ^n -rpqi an> ^ ^ 3^ ^j ^ ^rot ^n ^tfit «n, ^%' %i # "n^ni 33^r ^ra ^ ^i ^^ ^t :?#i t~t it «t, ^r% ^sfFft 3 ^=i^ 'qwt, "?r "^r ^t: ^f owl' tefM t| it?" 343^?H ^fT, "qf ^J-spt^nft^l" 35fqR ^ ^ "q^T % "qFH ^ 3TT%I wt *fte ^=i *mt 3^^ opraf % #A, # ^?r ^# at, ^ ^fsr r' wr^n %^Tat CR^=R ^7t^gi?t

The text on this page is estimated to be only 1.82% accurate

eJcCT 19:45-20:21 1248 ^■qstcpf^faPiHTl" 45to "jfkj "^ Tffe ~tf tj^t 1toi ark ^ t^wt ^obHg(lob sn*d Hi^=i R-mi ^to «*l %t}*t|M^PTiT5pjPR O /"v1^^1 ^ ^i"ITftto' ^' °^ ' nt Tmt to m w: wm sirrto I tofe 8fto toj "^ ^to ^^ "^ -r' *ft to to 4dl^Jll1tow°to^1to3#5PJTtopTT'li?" *to toj tot t} ^W ^RT ^»n cfto WJ1: ■^TT ^ ... 'HTsfaT'Jf #TI 'WIT. 56:7 ^® fe-Hul opr f^n^ ttt ^ i^n 3?k ^ ^ ^th# iwf ^fteii^nl 12?Tfqr

i T5Tt 3T? TlfSR TTT "frr^rn Zcpi-|cp| 1 1 "ft^FJ °t #iff T^ ^T^ ^ I 2(T^'stT?lcfS[Htt}^Tf'qT":^tTTT3^^l -i-il'^ ■^ TFFfER 9^ # |HH

The text on this page is estimated to be only 1.37% accurate

I oi^ ?im\ 1 3tr ^ ^n ^q^T ^n 1 3tr r fi Rf5tR^^RSf^Riii^fr^RRrRsnf^LKj^°K % ipf offt i^TSTT ^n fi 22rt ciri ^r cj?r nfi RR^HIdftdilRlRFTMcbHI?" ofwt, 24'"g^ ^ ^rr! ■ft^Tarr, ir rt rtr afo %31RS 1rri% |?" ^ffRR^l, "^R %|" 25?r RT ^3R^ ^=# R^Fl, "# fRR ^ RRR R71 26R ^3R% ^R RT ^RfsRR Ft RR ^q Rf RR 3TR ^r^ eTFtf % rir^ ^ rt® r^fi an, ^t rt ^ St^TRR5?«nRR?t H^THH^I d-gfi d*w) >-l«d W RH Rl^RT R1R 3TR ^3R% R?tf R5RlRFt" 3TR d-iA 4cHli>Rt^RRRRjf^lRSJRlRRT3ffcR?"faRl fSh-Hi'?irTTR%"#tTtTTFnl 3*fqR ^R Rlf R 3R »MI^I, 313TR"^'#^R Rlf Rl RR %Rm^^^J3fllRl^Tf ^t ^Tfel ^ ■^f3R^5iri^n#nl" O 1 ^ ^ 3^' :331 ^^ ^ ^ ^ ^*I ^ _L^r 'qra r' 3^rI 3^qRf ^fe ^m t! tl R)c&

The text on this page is estimated to be only 1.95% accurate

-^°PT 21:5-31 1250 Rgf aft, rtr 1rri an fRFd 3RR fifta ilR jit *ft tjr "q^arff sk rtrsrt rr sriRd ^ ^ RRlRt Rn^fR?t, "itr> ^rrirT ^rr rtIr % fRRR R :T3i\ %rf\ sfc ira; 7T5R ^ TJ3R % ftffa 3W>kH mI'1 afk HglHllWf ^I'lll 3T1RR9TR' RRlRRi t|dH|i?RM3Tfr:R?JRR%RRR7siiRI 12"lRFd ^r RTdf % R2R R x)# R rj%' Rift rri ^ft sk r*%' iiMHi^i ^ ^t^r1%r[ririjiI aklRRRTRRR? RRRTRd^'

The text on this page is estimated to be only 1.15% accurate

1251 -^cPT 21:32-22:22 32"^ "=T 311 ■qil 35forEtT^cwiT4Ti^8R^^T¥^otMf IT "^^ 3Tl"PnTlll 3%T OT ^ffi^ ^ff, 3^ Wfa\ ^ft% ^ Tmt "^Mt $, # ^r^ wt f, wti opl SlRh'SfRTltl 3TR 3HrR-ft^°ll-H%'?Il?l'R^T % "qpf % tift^ ^ 'ft *iopri" Wl ^TFTT aill 38TMt #T ^R % ?Tf% -&s% ^nfe Tffe ^' ^n% ^m ^Pr , ^ tf( I r^ r\ 3M lorn hih ^t Rhi

The text on this page is estimated to be only 2.03% accurate

w* 22:23-49 1252 "3R^ ^ ^ '3?R 'ft -HTt ^1 lN*5p

The text on this page is estimated to be only 3.49% accurate

1253 ^T 22:50-23:5 3TOTO % #rff ^ 15fT, '% 11, HI H 1?T1JT % 1JT15T'?" 503?tT 3^ t}"^^ 11*311115% ^1 tr oUT 15T% 3TH51 irftll 15R 1513 # 3M 1 S1flRJ lt?T ^ 1T1 15fl, "^ If *ft 15T^ 1TI " tl5T ifel "3 3TI% 1511 15t"® 15T in 15T 'fetTl 52i^<41^^T?'qT^'i||151 T1ini5T^1l15^i>?53*TflT^'fTlligrflT # tits? an, f^Fg 11^ ifr it ¥ii iff^M I it if TfRm^inii 3in5ir%wiii5ii5Ml" 54WT, "i? 3iKitir3n% 111 it «nl" 57t^iiri^Fi5i:i5Ti|^i5fi, "l^it,i ^rtlft'WRHl" 58?M ^T IK "^ ^ir ^rt% "^ 3Tt ^3T 3Th: 15fl, "ft *ft 3=ff ^f t} TTSp f i " 11^ 1T1TO Ifal, "l^t 31Rjft, 3 If Iff f I " 59<=bM dJlim{15 Hi\ HI «ft «nl opffdf* ^#-qf TMtei irat it i 1" 6(>f5F1 4d yT "^IFlltl 613Tk5W^^ ^TIcRTTIT^fe^ratl lit HT1 opT 11 ITT If HI IK 3TM It 3n3 3TtT4l5fl IT: "3111 1?% 111 ^ Tt 1f^ 1 ^ iti nr H5ir i%nl" 62n if nfT wi 3nn 3^T 1>H-1>3 15T"Ttl51l 6JfeoMi^4l'^lWT15tl15fTM1T^^1in 3qflTI15T^3ftT^it3^^Ft| 643TH?t3iWlT ■qzi\ -%& -% aftr 3nf4 if i5fi f? w^ #t % "sffil o|f oph I -fcn3 g^ TTITI?" 653^ft 3TH51 3PTOFT -sitt^ % 1%^ ^1T^ 3TtT *ft Ifl it iraf 15ffl 6%Mfe|3ni%i5!3 -4Hobl 3rtr spfrnferaf 1^1#nT%^f"^1T3ltcb1 HcbTTOTJ^I"fl5T'^ #q3T^^4HlHflTM^'^1^l 673=fT^1^T, "f^f "%T "^ ^R^ "^fT, "^ "^ rP# ^f # TFT "^TT 1l^1111ffl5fAl 683TtT1K^[lilHl3TTT^ff #f|| 6fl5;1 311 ^ ig>1 11 11 ■HofviRhHM 1T%1T 1?t Hfflt 3TtT 13M «n^Hl" 70t H 11^, "H it in 1 1T%1T 151 n f? 71t^ 3^ -5F5fl/'3T1 W^' tl5lt 3Tk 11M 15t 3H1?H51T oRf f ? flT^ Til W^5 311^ ^ ^ If iiitt^nf l" f^np sin ■% ^ i^ip /^ rj "feT 1ST, ' 'in 1 1fftlf 15T Tmt?" n>T ^ ^T4 ^1T "fen, '*1 ff It 15f Tfl t, 1 1ft f I" "^IIT Ptdld-H ^ y*H

The text on this page is estimated to be only 1.50% accurate

^T 23:6-33 1254 % ort tflfoi % m ^n ^rt ■^t t?" 7f^r ^ ^^rot ^ ■q?n ^E^n 1% ^w anl 8^tlf^FT'^^:JTteT'^^31Ht^?'3|?TW3 l^n ^ftPr ^rof ^ m ^ ^=n ^ t?i ani TiFrffo ^w ^h% twr if *r ^tn an 3rk ^ -afi$ a^ga opfwt j^^a^t 3tc?titwti ani *3^ ^%T^ 3TTO WR ^ "f^F^ ^ "^ ^ ^lf ~3tK ^4HH4"f °wk f^n 3rh: ® h^I'&i-mi t % ^IW *fa cfTl wft «Rl 16^-H&i) 3 -^ c?^ ^t *n?r ^rai ■% f^ ■s^ff to «r^ "®te^i ■qf?n anl"]* ^n3fn 'ftt^ t%^ ^3^1 ^ wte ^ri" 19c^T3iw ^w?3nani) ^ 17 20i4did-H ^frg ^ wte ^i ^Enw?n an, # ^?r 22|qdld^

The text on this page is estimated to be only 1.35% accurate

1255 w* 23:34-24:10 ^t^3Ttri 34^^^«ffai, ''I'qrR'fqciT.'fi? SRT WC*\ wrffo ^ "=TWf ^srt 1% ^ wn wr t! tl" Pw 3^R qWl &\ TT*fl din «ri d

The text on this page is estimated to be only 1.54% accurate

-^°PT 24:11-38 1256 opr 3R"df 3 op? Twf aft llcR ^=t% tts; tRrrf opt" 12|cM 4d =w q#f lfei| fen snl ft* 3^ ^t ■# tr ^r ^7® j3tt an, ^t m 3ter^t ^p^n J3TT °1W ^fT TWI I 13f 1^'EIS^'E^'8ff,^T'^'CR'^3TFRTTfWf#1 ^n: t# si l 15^ra 0 ^r wf ■qr ;?raf afa #et ftenT opn% 0 Tpft +o|ij #?J o|^i[ 3TT^#S|?TJ3TT 3fk ^% *n«i-wi w^ wni 16f^g ^ ^ qg^H^ ^# fer^l 17#g 0 ^# oRfi, "^i0 "E|?I0 TO c?FR 0 0 TTR f^R Wf ^ ^11 =pt t| Irr 0^ei?i0iit-?k=p:t0i0 «iifel1feif 0tI «ii 18^r0'0 fegqra hih % to ^?%0^i0 ■=¥?!, "^upVi^h if tf^ ^m ci ^ro?n if %n "5^ ifti 19%t 0 ^0 wi, "^h ^n «n0?" ^€ft ^wt opu, "^ ^rraft 0fcg % ^r 0 f | ^l to "^Fn ^n% an #ra0 ^rr 10^1 3?r cph 3^ q^=K 3fk^#rff%^w^^ fen fen 1%^? TO*nT^rat «ni 2O3irci'*'pr'3K'0'3i0 t=PTtI 0-fspfilR yy^l i|M iTR^T t?t an ?rt ^n 'ftk ppt % *nar 3tfi # "=# ^qs^ ^taft?" 1^1 ^Kd-^' '■MK^'yRdafR^FR^'UHiinai "?sp^ "P#, 343Tt'5pW tI 0, '% -qq, o[R?IoI if ^ ?37 1 1 ^^ ?mbi cpt ^f=r "fen 1 1 " 35jtpT ^1 %ff ^ TW if ^t ^31 an, ^I5P1 ^rtn "fen 3TR ^?tm % ^r ^r^ ftst % jspI "f^ a), rra^?ft%J3pt^M^H%n8nl" % ^PT m^ fwf % WT^ We #TT 363?*n ^^^-^f-^nwtTlal-fe^^ ^=t% #Ef 3n ^3fi |3n 3TR ^# %n, "g>% ?nRa ^ 0 opnf ■m ^3 7% if I 3sf%^d oil ^^ -ztm, "

The text on this page is estimated to be only 1.66% accurate

1257 "^FT 24:39-53 % feft Wfk mi m ^% 3dfn"iis mi ^wi^wjw afk rra^fsff,^«f'^3?^tgcfi^^i8t8ni'?T^iwwi ^r^si

The text on this page is estimated to be only 2.08% accurate

1258 ^^T 13nfe r' "?i5?* anl ■?i5? rtr?rt % Rra «ni "^ ^ rtr?rt snl *Rf t?ts; ^ anfe r' iR*}i(°K%RT«l«lTl 3|f=M^-^T^g^^^f3ftl an 3tr. r? ^h fl irrh % oW % ^ ^spm ^RR?T -WTmqii Nt^t rh rri |3}i tt^ iffl 3tm &4H^=l^ I ^?" ^ ^ ^> ^r^ ^?r fen "'Riftl " 22fi+,< 3^H d-H'tl 4^l,"?Tt?1R^7H#?f^-^n3ft rin% #F?lR 1R' ^n i, -3^ IR ^R ^ R%l ^R 3Rt^ Irrt R'^n^i^ ft?" 23^W=TTR^fT: "R -mcb\ 3TM3J ^^ WWf r' R^RTfTl: 'RR % "firlR Rtsn TIRn RRT3Tt'" 37WW 40:3

The text on this page is estimated to be only 1.47% accurate

1259 "W^ 1:24-2:3 21$n ^t^Riffl" 28^ ^^ ^Ft % m wfmiw 3 ^f ^if tw^\ wftmu "fen ^pttti an l 29srn^ "fer w=n 3 %t ^pt 3^ Trr^p snd %m\ 3fk ^wt, "tt^^t % '3*f1 opt ^§fr # ^Fra ■^wi'sptwT'^^rall 30r? ciit | #ra% ^ t[ ■q^ -^fT an, ^ -q^T -^ -q© 31T^ o[M f ^t ^gfl^ snl' 31*f ^ ^ ^if ^^fmi an fop^i 3 ^rf^ 31" 32fqF Tw=n ^ 3FRt ^w *nafi 3t, "^ ^3T % ob«fcK %-^qTf^if^-^ <4df3Fi iFff ^ ^^i cjrt «nd ^pt aft 3TF. %t % STII 4%?F> ^ 3FF> *n£ 7FTFI opt ^FPT 3^F> op?i, "w^ffRft?: ^sn^arMro*"^"1™?!" 4tg^ J+) ^% 3T3tr % % r# ^3Tl gq 31Ft "^F> «ft ^St Wf ^3CT>tr 51^F) ^?f) t^F ^51T, "'t ^>% W% WW TfT if^ cR ^opf opt ^# 3TR wfetf opt ^pFq % ^ W ■oWFITTffew 2W)^%-^pn^fHt?RRHfob-Hl%-M^Tfo|o||^ snl'3ft?T'opt'Itf*n'ITtesnl 2?n^'^:%T3fR o cs o ^^f^opt^wFn^rpnsni 3oiif^M

The text on this page is estimated to be only 2.50% accurate

^JpTT 2:4-3:4 1260 TSrR ft "W, eft ^T ^ ttf "^ ^?1, "^% TO 3M 3fk ^ 1'M^^ ^tf^^rif cFnt^cnj^sfFrai ani 3oi^T MrORH-Ml'^rr-qoF 3?!^ an&-H

The text on this page is estimated to be only 1.65% accurate

1261 ^jFTT 3:5-35 ^ff STRtft^Msk 3fi?qT^^PT";llt'^nHt^l LR^<=K % TFT ^' ^?T "=#' TJ\ T^^Tll 6m\ ?} %^I *fa it ^1 ifal I ; 3TR # 3WW 3 ^Rl it" ^1 3Il?qT II 7*H tFTCt # ^711 1"3T4 ^R 3II4M4 ■*ra ^ift, *^% "=# "JTR t} ^FR #TT it iW %^T t%SR ^EtH# I, ^3SR «H?ft 1 1 cR ^^?t 3T15tR *R T^?l it I t^Frl ?R Tl "=# ^ TI^ "fe ^1 ^ff ?} 3nTltl, 3TR-^ll-^^lTltil 3TlrRlT}^FiT13TT ir^Tf^T^i^nitil" I?" ^ittqR *ft^i Hgl'^iH^? "-qd^'-H^iil wm l.iH^t^iRi^f, «igl 4) 3^^HM'q5f^^i^n,?nfewT'^3n^^r wf fst^tra trj?ti I, ^s ^ it ^ «#5R ^rt 3RRT ^5R %T ^1 17^R^cR "^ 3F& ^ ^FJt ^Fra if $-H&3 ^lf ^T % ^1 ^RWl ^ swnsft ^l^SRltl 183lU*l4 faiMhH «*1ll^itcfcn^ ^ITPTl ^M ^R ^rr ^l3 f^W ^lf T*3?T1, ^it H^ "M^T ■5FH 3TT£fTT ^f 1 1% ^Ttj?t ^ ^FWT ^' 311 ^ I ^r ^rrf?t % sfsm #q 3isft ^ 3?fe "=rit^Ffl 21tR ■siw ^fr w% xr ^rai I, ^rtfa % f^s 3irai t ■mfe ^w ■g^s it ^ "fe ^i% ^4 ■qr%^T % wi ^ri^ ^ 1 1 22^%^15^T 3FFI 31H-MlM%^l?l ^^1 % fcTI% ^f Wl "fFH I ^?1 'TR% *P1 "31T ^R , ^W ^TRlfcFt^MJd-SrHI^QTnTl 23^1>II^H% 41-H M.HIH ■slJdHd t[ anl #q ^f 3T1^ 3TR ^L|ld-!-HI ^ atl 24(^?=^I ^ 31^ ?ra ^t =# sjHWI TFTT SHI ) 253M 11R1 % ^TS ftMf 3TR W ^t % ^Ef •w^di

The text on this page is estimated to be only 1.50% accurate

^pTT 3:36-4:27 1262 ^ff ft#Tll W^ ^TFT ^3Tf TIT W1 %J TTT^TT ■^n^fa^iTlml" %3f|TTWtT4 4^ #g ^ to w. % q^rtferf ^ t^tt t Tn i 3rtr ^% 1tft ^=n tit 1 2c?iwft ^ tspt «iqld-WI H^Tfl an«#N^ 4,1^ f$|bi| c(,< ■H^H^^tfT3WER|3n"fe^?T^T#t^ ■^Id^^TTWTtl'qTf^Tn"^ ^^^^5^7^ ^TT?ll?"

The text on this page is estimated to be only 1.29% accurate

28o|f ^t 3^ 'qPft *T?4 % 'Elf cf?t Wf fJtfSPT ■=FTT 4 ^TO ^# ipft 3T4 4i4f 4 Wl#, 29"3TT3Tf 3?h:^it,T3oR"^Fn'3wl"fer^,^ ^i^jf^n t , ^ wt ^® ^ w i^n l ^n 'Rrawcif4l 32tR4teT4 ^nsdi i 1 3844 # feT ll" 3%H"^4?si|d4-HiHRiil44WT4 fe^ra fen ^rffe ^t *jft % ^ ^f opt ^^ ^nsft tri an %, "*r *ra ^4t # ^® fen ^3Tt4 ^g4 ^s% ^ 3 *ra ^® ^j fenl " 4 -qsr «n| 484^T ^ ^1^ ^PWI, "3i\^ ^%?i 3rh: 3)1^4*4 ^st f^Ri wi Urn ftVolWl "Rff «Rftl" 4*TMfs^nft ^ ^^ ^wt, "Hg") ■ft^i ^ft ^sm i^n, "op^i ^tqwr t^p ^4 -swm WSR ^cTT "iRT STTl" 53^5^ % 1qcn ^t SIR 3TM % ^W "3^ ^ft ^fpt »n ^ra 4Wt 4 ^s4 ^fi an, '4n "gsr ^tfe "#nTl"fHTRf 3^^MRo|H%^I8to|f Pivoiml ft wl 54q? ^FRi3^Ri% sn^t%i4^M^Pt cs >o -J cs Tl4to3fl^'cR^?lfall ^Fnl 2-M^I

The text on this page is estimated to be only 1.09% accurate

^pTT 5:3-29 1264 % %r^ cjft •sfaein i[ $| %*ft c?^ -g^ ^n ^ ^dl^^^7TTTT37tr^'5f7r%nd7l wfcd% i^n ^r^ -qr 7, "cpn g*7 ^ftftn #n ^Enw^ it?" 7ftnt "3 ^rra i^n, '% ^rg, 'rt 'tot ^lf "=#t ^rr ^ % t%^ ■qr ^ ^tt?m 3 ^ttt ^l ^t ^ cTMra 3 *n3 cf?r ■fl?TT f , TT^l '^ 'SfFTt 3775R7 TT5T^ ^TW^ ^Ff '3T7T »< e\ O ^TMFf I" 8^Wj ^ ^3?7T7 ^fT, "^fT #, 37qRT f^TT ^337 37^ W ■qf I" *5IW 3TRHt dc& an, 3NHll4kK^37 37k: W?" 13qr ^ ^rt% *tt ^W |3tt an,^#'^praT an flR-5^-5ffo an ^ftPr ^h ^m «i|d 9% sft arh: ^JWI^^HN^rlHMI anl 3fk ^rct ^wt, "■§#, 3M Hq ^tcrt ft, sj-hM ■qiq ^trt ^5 ^n: ^r I "=# nt ^lf 3rh: ^57 ^^s gq ■qr an^f^^ntr'fqT!:^ °MRt> **rii jwii 153ttt -m^R-mT T7 3775PT ^TR '5RrT t% ^ "37^ ^7T^ ^T?n ^ anl ■^r?n, ^lld^^' *tt Pn

The text on this page is estimated to be only 1.15% accurate

1265 ^FH 5:30-6:14 30'"q* ^cpj 3FF> 31jqf TJ® "=#' -5f7T Tq5R?fl| 3 1 3?k ^n ^TFT ^fel I ^FTffe 3 3}q=ft ^*51 f ^® HgT d'Hobl $**SI ?} K. oR^tl 44+> ^ "^f^t l^ohHM Mi^cK ^ affiftil 45^ar t=ict #^t % 'r 'cRIt fq?n % sw\ w^ ^t ^irr^nl # tf! ^t Us ^n ^i Ht ^raT #n "^■qr gqq 3fr| 3Tm^iroT|if ii ^ftgir ■"fe l^tR ^ a#i«f> «i5t #3R % ^i ■qir ^E^n 'tftti 23fh: ^?i% it^-'q© ■g^H ^r^ ^ 3^gci 1%i ^@t ^l 3%t qn? qr ^E^n ^ftt a?k oisf 3?q^ 3^nPwf % ^nat % ^fitI %M ^Wj ^ 3fe ^q| afa ^3T % "^ I^TM *tfe 3^opi d

The text on this page is estimated to be only 1.72% accurate

^JpTT 6:15-44 1266 ^ ^mrc TMI sRHl ^1^ I, 3I%qT1 it 'TO ^R 16^m ?Tm jf ^g% %sq ^ffa tr ^ 17afR TT5P ^ t[ sfeop}; ^Fra -^ffa % -qR ^PTRIR opt TRxpwqfi af ski ^pfp) it wi anf^Fg^Wj 3}*?t «ft ^q% tjrt ^f ^ffei sjil 18d^nl i?n % oprw ^ter t( ^ % ift ^ift sffi 193R it opi^ ■qfe-"®: Pb op^T "qf 3 f , STt TRTl" 21ftR ^?ft dd^dl ^ ^ "^lof t[ ^BT 1%RTl 3TR "RJol ?fter it oTFI'qfEf"rFft^^%W:TT «nl ■zng-cTftfs 223R# fe #qf op) ^s «% "r # ^ttei % ^s WTWFft «ft, ^T'fe'oWl'RTOT^'Rra «ft 3TR 3^ %ff % Wl %J ^T ^R ^=TR "RfT |3TT an, slir* *4it^cWi *°IHIJi^l 23ldfaR-4W optcfceS H|cf ^n t ^? ■qr fe^ra 30#nf"^'q®T,"?icFh^^i^4ft^y ^ ^sn ti 39sk ^ ^3F> o(# -opt ^it ^sifliij-^^nohl qiH^oK^^iffqii.^Ff 3 foPHt 'opt «ft "R :#S 3TR 3TF?W fe ^1 ^MoPt i^nfi 40siil'R^'qTiii:qdToptf5E57|i:^-if7:^ ^n%^rrg5i opt^nt 3tr

The text on this page is estimated to be only 1.81% accurate

1267 w^ 6:45-7:4 ■R ^l % stfcm to ^ 4n4ftd ^wni 45^to 3 ton I, '3rk 3 *ra ^th^r % ■grn "feM^ |it #tl' ?r w^rfe ^ wi toi ^ 'fRdi ■? 3rh: ^1^ ^toil I ^ m\ 3M\ tl 46(tod -gi^R *f }Phk1H if ^raT Wll an ?Tt" *ft ^ TR ^1 soW(fe T^^TTl" 52to 'JI?^ eftT 3TFRT ^ ^ ^T^ ^ '3W*f os ^ ^M TT5R cR ffl % -q5t ^71 TTTft ■RfT M3fA 3rfr: d'Hobl 'tf)di Tim, 31-HMlcHdl?> SnTeT? OS 57tof?r ^t i\ ^ ^$f\ to ^ -^ ^n I 3ffc ■R 'cR7R to % "^TTT^T # ^ffe f, ^ft TTTf W ^Tt os 3iq^T#Rc[ft%§n t?" 61:^T ^ 3^ 3TFt # 'traT W fFIT «n "fe ^R^ %n, "^IT HR "^T 1?T^ t ^TTR Wt? 62Tft ^Ilt^tdHwf ^ ^ *fl I ^r "f^ra ■Rff ^T^ I" (^Wt ?t^ t ■# ^^rai an 1% ^ ^r I ^rt "f^RTt ?ra ^ ■Rwf an ^h^^t ^r ?ra iTRfqdi ^h ^ ■qra 3n^ ^?t 3Fwi?t "=#' ^ %nl " 67fe: %T 3 3^ ^Rf ftMf ^ ^¥1, "^n 'dR 6%ii[h TdTH ^ ^TT to, '% ■R'H, fR tol% ■TO? ^#t? ^ TO 'dl"d^ TTO? t ^ 3T=Fd ^sfto ^|i 693M,w^^wto^m^Tito|3fh:^H ito t % 'd i\ W 4ft^dH t"f3lt LRH^cR ^ 70%T 3 ^ ~SxR to, "^n 'dR ^TTff ^ ^ 71W^l4lH^

The text on this page is estimated to be only 1.35% accurate

^JpTT 7:5-32 1268 #>Tf3yR+&gldMlgdli 3WH" &;& *IR WF\ % *IFR 3FR =Ft'q5FS'cT7ftl" SC4tej% *n£?|ef> wf fecim ngl «sld a)l) 64WT"^^ra ^f^n w ij?ra ^n cjRcii il ^rffe $ ~m °w^i Cv *9 O ^3ft, ^ -jw\ «n tit ^rffe ^ %i 3w) ^cR *m !%ra ^sra% *nf ^r4 ^ ^ % ia?RT ^n "Rqq fen snl (^ iwr ^tot ^n ■^f sji ^sf -3^ ■q^rf ^ "tm su tit «n I ) ark ^5d% Rh Pb^l^TteldHI ^-hM Pb-41 midlife ■dn ^tt ^r fen? 215j id' ^-h! Rfeidl I, ^rt 3nsnr 25fqn: aupvi^Ih 4 tw^ ^ #nf ^f ^ ^ ^ ■*1T, "^n q# ^5 °^f> "=# t "W 'q #T "RTT SMHI^IKdf? 2(RJTT^t^W^ra#ITf%#Ef4' 284t^T ^W ife ^f ^J^F&T ^ JW\ an, ^H ^ ^R^f^fT,"^ 5^ ^iHd'?t3fh::'Wlt^F^'ft 4^f^ 3TFTT f I fqR #4 3^ 3TR^"=tef 3mTl 1^rh ^ ^sn t, ^w ^ct f, iRaTi' ?ian q^raqf ^ ^ ^t ^th % %q; iffe: %

The text on this page is estimated to be only 1.04% accurate

RraifNf opt ^R%3W(1Rh4i' % qw "n^i sn qw ^=t wtferf ^ ^ fi t^ stt 51"FiiTt ^ra^an ^n "f^sjH Hwft opt ?r ci=w ^t 523tTT t( ^ff^ 3^ oPfT, "cfqj Tl «ft Ht W)?I opr # "RlT i? "SIRcff opt Tia jTf g^ -q^j ^#rn % ^lcte ^ cfi$ ^ ^t "=#' snqini" [^S'm^^Rl^'9lfM:R^W^7:53-8:ll C(qf> qf,/ T^^fWl] 53 f^PT ^ :?M WI ^ 3FT^- 3FT^ 'er: ^ Tq I 83?k q^T ^31?R ^Rcl IT "E^TT "TFTTl 23^R3 ^ oif %t t#^ t[ ipni ^«ft ^i ^e% qra sn^l q^j ^?spT ^=% ^q^T ^ ww\ ^^ ■r' t^ ^ ■=# =M 1^5 ?TPh ak ^ #rft" % ^PT^ 73fT ^7T Ic^Tl 43Tk''f^3'^'^, "t^.^f ^nftq'l 3M ^?n ■dn wn -?%wm i?" 6(^t op|^jfNr^ % f^ ^ q? w t| ^ ?nfe ^% °$\i "^rt Wl fe ^ 1^R^ ^R% "f^S^lf 3Tft#q ^1™^^)! f^Frl q^T "Rt^ "^T 3Tk 3¥tt\ ^m\ ^r sr# -qr #ra3 ^ftti 7^rffe ^ rs^ # ^n t! ^ iRfeq ^Wt ^ftsn ?r ^n: Tgg\ f\ w 3rh: ^W «tefl, "RR Rl r 'R ^ RFft "Rff f =1#t 'R^ R?^ W 3fkR^Rf8T!:^l" 83fk ^15 ffX. Q

The text on this page is estimated to be only 0.68% accurate

^f=TT 8:10-37 1270 -» J =s ° ^FT^^W^3M^^?ftl 1,M^T:Qf7|3TT3fh: ^3UcR^I -J> Os ■^n wm t ^rr ^ i© ^^w ^^ gfsft ^ -^f f\ ^ ?p# ct^n 3n tit tl 2*ctrt} ^^ ^r 3rfr: 1^^wkrt^?it'#s?(, '^3^^afl3^ Trail" 3m^T¥Tt, ^fo^fftfTnsft^1^"R?f'§r 27^^^ff^H^"fe^WT^lTrRl:™% 143rTT^f:jfWT"^^^^fT, "Tfc 'R 31tR) 'Sisft WT'R'WTIT'tl 28f^T ^ ^ ^RT) ^?T, "^ c[R ^^4Hld-d dH ^ -i OS ^^^^^"^■dRH^ssiH^afa"^ sjin dl'll s^k'Hrq dj^'^TJ'5r#nTl" to^l^rftgiry^ssiH^ ^^-fq^^^T^H 33??? n ^?ft ^t ^ wh f^n, "yR ^i^Ih ^Tdl" % ^7T3T I' 3TlT f^ '5F'Tt 1%Tft WT ^sTO?n 20l#^: 'R' 3 4^1 ^ JIT, 9q[s--qRf% tn^v^^^ ^' ^1 fqTT ^R ^ ^f^ 'ft "fe ^R 'RIT5 'ift ^?TS;^| ^1 fi-tl fe-Hl "^ qt3^ sKl Hsfl' sIHWI «TT3^Tl" ^Tffe

The text on this page is estimated to be only 2.32% accurate

^lRRR^H* piiw r ~foR «tl 4^^TTt3MH^Hl^^RR^^,R>?RTt ^r wq "sf§t -3f^n f 1rt} ^tr m^R t} rr I, RTT 'RRR "ETIWFf itl "fWm R Ht %R Riff "f^RTl 41?jR 3RR Rdl % R?R R^TR itl " trtr ^r R?f jit 1 1 ^rjr hrrt^ fm i rk 42%t r ?rj ^tr -fen, 'Rft ■qr%^T cfuhj ftdlildl'dtgRy^K cb^cWlfi^Li^^c)^' RlftRMii 3fk3RRRij1ilR'3RRRR^R?f ^ cr tr^r ~s$ ri#? ^trti htjtr R?t f "fe ?r rr r^?t Rif rr?II 44?m rtr -fq^n -^h ^ RdR itl 3TR HR 3RR "Rdl R?t "f^EJT t?T RRRT Riwd^iR?.RTiRt}#T^'ifRrn8ni r^t^tr RR ^T TO ^R> RSf 1RR| cRffo Wf TW R71 ^FTtf 3T^T rT^J R#" %l R3 H? ~%& « ^ 1%R?^Ri^RR^^#nR^^[ 3WI 3TR^5R RT rr «n l ^tr it^ ^3T 3rh: 'gnR |3nl " 57fqR :q?^t Rdl3ff R ^5T# Ri?T, 'R 3TRt ■qRR 58R?TR?TTO t ■qr RRR % 1R^ Rl-^f 'qraR ^37 TR^ TRFTj R?T "gq^-t%qR R^ R RRI RR | ^FT T^ 31^ ^5t |ffe-^R 9 RR |ir^TR RRR R^T^^rfsRcFt^gil Vi ^ ^tir % 3rrPrt' r ^tr ■qsr, '% Tv$\, ~^~&&fi RtRR^R RSnRRTtR3R^ RRI-fqR %?" 3R5T R ^RT I^RT, "R TTt 1TR R^t f^ ? 3?^ R ■?T1% RRI-"RR R 'RTR; RW ^-H&i) RSn RRT f ■Rfe"^3T^5T^T%4

The text on this page is estimated to be only 1.59% accurate

^JpTT 9:5-30 1272 aM ftsst HHt ^ 3?^ o^ mH m -m fenl 73?r ^^ ^fi, "^n 3tr ferni % *ih 3 sft 3TTI 0?M?^H)^J3nl) 3?R "f^FT ^ 3® 3 TFianl" 8f^T ^h% listen 3?r 3 Hm H\^ *fft§ h\> mi ■^3^% 3TKt ^^, "'^T:'W^"STi%5"=#'t^Tt ^37|3TT ^te4'l|ob

frwjt, "H*ciF)fl" n °MRt> "RiRgt w^ ^r ■qft 3irat'cR 'R# ark ~M fag) *) < *I5f*ni?" 3*T cRf '3^ SITO *f ^ f^R^Hd'lll 17^ TT5R ^R ft* ^ 3}S} ^ ^ , "3*1% «JR Tf ^ wn ^m\ h ^fe w ^^ =Pt ^^rar f 1% 3*p}^3Mcf)i|l" era 3*1^ ^n, "^w "^ ? I " 18^w^ %T3ff ^ ^r ww m; ^r ^r fe^ra =lR -EPTf TfRfl "ETIW^f Ft? ^n ^R «ft ^H% 3Rfn^t ^Rfl :ETlFd Ft?" 2S1T4 TR ^Fft ^T^TT 3FRH fen 3TR ^FI, "?i^wt 3Ffn3ftf'qTFITTRn% aRpFntl 29fit ^^R# t "fe tttr^t ^ ^Rn i} m\ t£\ aft tR FR "RFT ^TF^'fe^ 3HKh1 obgT^ STRTF?" 303tR ^ F^^TI "Sqfrfi "R ^=1^ ^FI, "3WER ? gR "=# ^fi^ 1% ^ ^Ff ^ 3TFn f? w ^ ^r^

The text on this page is estimated to be only 1.32% accurate

1273 ^pTT 9:31-10:18 3W3t cfft ^Ttfrl ^ tl 3%R «IR^ t ft? ^R^R 32^*ft *pnn^T'iqi1of> ftRft ^ ft?# ^^=r 3 3$ ^rftj ^t 3iW ^ ^rrfrt ^ #l 33rfe ^w ^rft> M^oR ^ft 3TR ^ "=#' Ffal Hf ^ ^f® "=#' ^R ^isRctrsnl" 343rR'3U^tt^l,"?TT^TT}m4l {£ltl"3ft? I?" 3tr "^r to :q?^t %T3ff ^ ^ oi^f i} ^i?T 3#Rcfi 3TEJ1CR 35%T ^ TH1 % ^t %T3Tf ^ ^ 8J%eToRwr Ih$

The text on this page is estimated to be only 1.40% accurate

^JpTT 10:19-11:8 1274 19^?T^f% S ^=Mdl ¥ 3TTT 28R^| 3H-r1 -4I=H ^TT fl 3T^ ^n*f fell*)? I '3^3' 31*^ cMH % %t gir ^ ■qr 'qsrm ^rt ^eti^ ^?" 33qF3"Rdl3?f "R^3^TT 'fed, "FT'dlT'qT fe*tt ■^Tfls!" 34^T "3 ^f ^tTT fell, "=RIT"alW jjfft feSTR 3 "Rfft^raTi, ^ ^n ^ ^mt "^r #?'* 35^n ■MSKsjoK d-elVi)'?l%fe^ H^T°b^l '1-41 PH? WT ^FP^T'SFT^^acr fcHM< ^FT H* Rl^lN +lkllg M ^ *T=#stl ^ opfl ...i 15R. 82:6 fqai'^n'si^i'ffffi'tpiT't? 3?h: spf ^n^ i dsn ^^fT, '^4^cR ^Tq5ff '? 37^^ 3^-q^q %I%#o|>rf":#'5RTIlf #%lfeww ^ft 38f^3 ^ 'R 3^ tR7R ficll % ¥t ^TFT ^7T :?^t 3rk ^^h :?^t 1% ■q^R fqai ■g?r "R t sftr ^ ■qrRiw^l" 391^ ^ qffeif ^ ^r ^t ^tt^ ^n ■g^?R ^ ~m fix. fen l 'cr ^frg ^=t% ?raf ^ ^r "fc^n I 4,M^t fq^r '^kr % ■qir ^?r ^atH 'qr ^^m wn ^f ^ ^F3T siqid-wi fen ^?T?n «nl %i^f ^tt, 41^p ^ #n ^r% ■qra 3Ti^ 3rh: cp?3 wt, "^3T ^ ^ 3W^fef ^#'fe^ ^R ^ ^rt% % 42fer ^f W^#n^J^ffe^RTt#^l X «ni ^w^iwritt sji^ThR*)h sftr^is^ 'qT'^'gMsnafk 3iq^ilR%wf'^'q9j%^T Tffd ^1 ^R "RFT ^I ffnt 3# ^T mf sill) Vi ^f ^ %T % ■qW -HHNK ^1, '% WL ^ cl "ratlT ^T?n t , ^W ^tRR 1 1 " <3o|| Hgl'tl slir* 4

The text on this page is estimated to be only 1.11% accurate

1275 ^3pTT 11:9-42 9^T "^ ^tTT fen, "^n TO fel if -^Kf -sf^: -q^f ^ tl ^ ^tf ^rt% fei % totct ^' ^ hT m ^r ^ wn ^rffe m w ^Fra % totct cjrr f crto ^gif totct ^#' i ! " "^^^■^afafeT^H-t) 4lWT, "3n3Ttfq *ft'3'H%'Sra°l£Mi?H *n^TO*na[TTCTOT h?w\t if % 17W m% ^frg w fen 3rk ^f ^tsr ^r^ ■^M fe ?THT ^t 9^ if T*l "ETTT "Rr ft t|% #| 18(4dR^I£ -M^I^H ^WWl^fRT RbdlnW ^T anl) 19^^t^1T!:^TT8n3fkHR-MH^-HircHI Rl^TOJ^^HR^H^ii^Tf^NFf^TOT ■Riran "^ ^tej ^ ^wr, '% 'qy, ^ ^t^ifi ^fai eft ^n ^hwm^I'i 22qT^^™tt%3M^?m"^f^Roprisr3iH" ttpWti" ^■^^S^r^EfgH^if^ifenl 3rh:^T^ 3R^t 3M ^rqr ~s^ ^ -^n, "q^ fqdi A %r\ 8P^m ^TdT t ^rffe ?r^ ^ft ^^h # ll 42^'

The text on this page is estimated to be only 1.23% accurate

^JpTT 11:43-12:13 1276 #^"?5R t[ t^^KI "?TRT , WT 3fl ! " 4%> o^ # arrl *faj "^ orrnf 3 ^wt, "^ Tata ^r sk *n3 3ri " 46f^Fg ^=wf 3 -g?® i+>0IM % to ^ ark # 3TFfEri'1%~felT¥lil 48-mR^^t$#^t?I tf^ fen tit ¥T opt^ ^r ^ fecira o^ wtTi 49f^Fg^T^f%H^WMtf % f?Pt 'RT^ ^ T¥l t 52R T^Wtl 544Wl ^fefl'% 41^ [(+,< ^iftyobi !*)< -41ftd

The text on this page is estimated to be only 2.84% accurate

1277 ^FTT 12:14-38 offt ^#M ^7T ^3Tl4 to4 ^t 'qi I 4 ■gsFir t! 4, »73r4§?77 11 8:25-26 l1d«i 4Wj, obi n°b "nsnton 3t4 ^^n^TT tmjt 15 "R)«ilHo^'35ft*ST1?T! ^3! 4nTMTl^%^T ^ «t37 3TITWTijl" 1(4w44t^n% 37^141 ^TR^R^' tod W5t44^id,'^n%'34 4%gt jf sff-3^r #nf 4 ^n% ma? %ri ^raiR fen ani 4tej % fcW 4 #nf ^T ^«R 17^n% Tnai 4t 4te «ft ^tr ^w Tnsrt 3t 1% ^3TR ?TRT ^t ^ 4 goFTT 'oR RT f3ff 4 4 4n4to fenl 18#n ^n4 "toR ^#nr an4 0 % "^ "ft T!!R1 fl 'TT ^IWclf RT ^idi I 4t 3RPnd tor to ^fr to il" 25fto totocift^n 3toj^if 4ft 4=n '°R?n 1 4t WJl Rdl hm 4 4Wt 4 ERfi, "^ zmxwwit 4r 1%^ Rff ^to5 "rFflT 1%IT 4tl 313W "|T? WT^% ^TPT ^TTWT3T(^Frtll 3ra|TT^T?l%?Tra^^tH

The text on this page is estimated to be only 1.93% accurate

^JpTT 12:39-13:11 1278 ft mm 53:1 39i*ft ^tfjt 3 fe^ra ^wT ^tt ^%i ^tffe ^T^n -ppt ^jtr ^mi rtifsF 3 3mt 3frcsff ^ ^3 r *i% 3TR" ^fe ^ ^R?T "R W? ak ^ft 3TtT r ijji #rat ^ ^ ^ ■5R *i$ l" warn 6:io ^Tfen ^M aft 3?r" ^s% few if «n3 *ft cjft sff i 42fer *ft^??T at qgK d°b % -4^<51 ^diarf ^ *ft T$ 3RSR 0 fe?H Wf fec||.H ferqrl feFrl ^RI^o^t.oRnsiJ^tloR^tR"^ 3TT0SR1 ^trj 3 H ^^tf •grn fell 'WI-H^HH M^=K SHli^"n^^FRH^3#oF "^Rjani 44^t r tot ^n: -5f^T, "snj # ?p 3 feira ^rrn i, ^ ^?r 3 "=#, «jfep ^3*w' fecira ^r?n ifeiH'y^^nill 453fk^r^^nt,^?^ ^ntiSra^^^ntl 46q:wi^^f'^7m%"p; ^f 3TR1 rTTfe fT ^W ^ife # ■gir 3 fe^ra TWW ^''^^^■^■^^Fm *fUH»iloH| ^Id^^t^telcII'f , olf 3fa; J. ^^FRT^tfl^ 3TktR7R"te%'tTOr^H aiq^ a) aftr "f^% =if ^r sfnjn an, ^=r -qr ^h wi^tai'SFniNRyi'mi ^•W'R'Mld'l % xpt IW^I % ^T ^f If 3H "EI^FT an an % TT^q -fq^T "^ fM ^5 ^1% fTaff #1 "fen t 3fk m 'CR%^T ^ 3TM I, 3TtT ttt^t % mii\ WWSf\JW\i\ 4^#^^?M^T"^f^7T:Qf7# 3FR'Enfl'3TtT^s"f^Ml 5fq^i^'Er|'^^i^Tn 3fk 3^%^%^ STR WJ1 3TtT ^1 3FTl# ^ 6ftR ^wsiw vihIh Md w% Mm 4jM ■^■q?rw "^sm $ %T R ^Rt oRfT, "awt ct Rff ^^Hdl % ^ -5FJT oR- TfT f ^R sITC Tf ^h ^TT I " [ r ^?ra ^wt, "ci ^ ^fe ^*ft *ft Rff °Md ^n an, "grr ^f ^ ^"STS^'fl"

The text on this page is estimated to be only 1.60% accurate

^f ^"feRt ^RT ^W^t hpi ^Tcn f , R?Rft w wtsu f l 3?h: ^rt % oRT 0R8R: TiTcfl^ % M ^ c[^T xicfifcn^n 2% o(5^ % sTTC ^T «Tf?T °A|l*d 1 3TT 3R. TTOTt 3t, 'R* Riikil % ^ ^If^I =Pt fell 27^ ft ^f^I ^ ft^t^n dob^l Ri-MI 4\\ 29^5"^#En% T^Rf"5fft ^#^f^f% qra ^dlf^&H^J 3TR "SWTfTf "fo^'%1^ ^1^-4 ^> ^ ^ %"5f>fT ^,TRclff"Rff 3T(T^^,^fI^[^TfTf , ^n f\ 3^ ^[ rp# "55fm f I 34'R ^P% ^ "^ 3WT ^rn f % fR "TO 'ERT %tlH

The text on this page is estimated to be only 1.67% accurate

^JpTT 14:1-27 1280 U"d^R $, ^sst wtfadi^^fazn?;! ^tr;\ ^t =t)^dlt ^'ctTRl:qdl%'55FI'^rn^r 10cpn T# fa^Rf ^fT t fa t tTTR fad! t t 3TK tTTR OS fad! ^fT tf t? t ^ER # t clS #rff t ^?dl f , 3Wft 3TK t # "=#' ^Wdll 'CR7R fad! ^t ^ t f^ra^r?nt, 3^^m^7T?ntl "^raf ■sRfdi f fa; t* wi fadi t f 3tr ^r fadi sfr t f # tn fareis ^rt 3fk ^fa -jw\ tt ^ ^mf % ^tpto # f^ra ^fti 12^[ tp% wq f%m\ t, ^t 133rk ^ ^w ^ra ^7® ^r#n ^rr ■dq #n ^ "dw % TfprfA fast -q^t % un 'ttr fqdi hBhioih #l 4MH*(lJll 16S 4

The text on this page is estimated to be only 1.16% accurate

1281 w^ 14:28-15:25 :Enft^3ftTR#^R^TRl:Er#^l 28d,RH H$ <=Md ttri f -fe r ^t tit 1 3rh: ?ir?it -qra fq^ 3?wn l ■MR dRH R^ifafe'MI SldlHtHR y-Hd girl °wTfi ^ ■qr^ to % ■qw ^ tit 1 1 ■sprfe ■TrR fq?n Tff ^^RfFrtl 293rk ara^'srfsdift^Rif^t'ft^ tjr? ^cntot cnfe ^ra ^ ^rf&d ftHtcFl "fo^ra Fti 303fk 3rfe twt tm ^ Tffir wt «nd "Rwf ^R5f71 ^ «W Rff Wdl I f^Fd ^ ^Irf ^m, ^ iff ? ?nfe wi^wr ^ % ■r rtr fqdi i} ifa ^rrnfi ^aftrfqdTR^ETt^kii H$l^t,'^'^T'ft \ =wTi* ^^RRff^lHd Pl'H^ R^ ^ntl 22^^R^3Tldl 3rtr ^rt^ wf "R ^Tdi Ht ^ f^rt *ft "qiq % ^tqt "R # l rt 3ra 3iq^ Riq % 1%it ^r% rto ^ wtrt Rfftl 2^^R^^T'5R?nt'^RTRl:qdl:R^T ^RTTlill 24^^R^R%^tEf^-^FfRff^T?n^Tt ■^^ft f^TTt "R R#f f^ Ht ^ RIR % ^t R 1# RT 3ra ^ra ^ ^a "5% f wi *ft ^g^ sk ttt rtr fqdi ■^Rf^^TT^tl 25f^Fd^"|T#l^|3?Ti%^R% "5?raT;an-i:^SffR'^^Tti%M'?'^'Tra"iftTI%l ^?tR ■^IT ift ^RfT i} m %^T 1 1'

The text on this page is estimated to be only 4.67% accurate

^pTT 15:26-16:25 1282 1ftdl cfft 3TtT ft 3TFT1 i) gE?ft -qm 3TT%TT 1ftft ft Wl1ftdlwl3TKftft#Jl,'3Wftft3Tt7ft'Sl§ftft'JTl 273rk gq ft! ^t^ 3ft wftift? gq snift ft ftt ft} 7nsr7ftftN -i /^'ft^ftft^"^#ftHRft^t%'g^PO _L O'f^ra ^ :5WTT ^1 ^ I*ft aros^i *m ft ift^M ftft I w*?ra ft m ww an Tfi ft wt W\ ft ft foftt opt ftt ^ W7 W7 Wff TTlftiJl % W? m*^°K ^ftftsn^TTfltl ^ ftp 1*?^ W7ft % ft "R ftr wi ftftn wt ^pft I affc "=t ftt gftl ftftFaftftgiW^^ld^wmfTHW^t^Wl ww sift ftr gift ^R 7ft % ft^ ^% Hm ft ■"#? 31PIT ft? Wlft "snrf^ftftwfft^g1! H^Tsidi4l ftfwftfeft ?p^ft 7=TTar sni 5iftRi m ft ^oft? tw *n jw\ f 1ft?iftgft ftsnt-skTjiiftft^Tftobl^H^i'n^Jii, Tlwftf^Tflft?' "ftftfraft^TTiftft «TlftsI?nfttft, TJ?ftf^Tfr^ft m^lftll ftftFrlftgilft^q *rft ft "R ^ffs ftt TfM gi?ft 'to? "=#' anftTtl iftFa ^ ft wi ^rai f ftr ft ^ft ■a^ft -qra ft^r fijii 83TTT^M^3nftfnftr'qTq, sntifenafk^tpt ft^lftq^ftwigftift^?'^

The text on this page is estimated to be only 2.77% accurate

1283 ■*jpff 16:26-17:23 1^3'SlfacRTJR? stoR -qrq to % -qw ^i tit fl" 2!to% toff "R oR?T, 'to 3M TT tol toft £*iK1 % JltodR 3A

The text on this page is estimated to be only 1.75% accurate

^JpTT 17:24-18:24 1284 ^FM^ HgT*1Hdl IVtl^ft c$ *1H &-Mlll 3Th: ■^ %^ ^rt I % ^ ^ ^i i 1 26r %^ei ^ft %^t«P&«RFtI^RT 1 Q^ ^ct^ctK 3^%2Tf%WIt^ft ^TTTl anl \H^\'A -4^1 (\H\ RimlM ^??t t>1 1, 3TFt 3TM 3Tk ^3"=Rt sffal, "cR ^^r ^ ^ttt fen, "^Wt ^raft ^1 " %T 3 ^"=R ^Wl, "^W 'R tl" (TR ^3T4 sM T4 4=^=1^ oiMMgg ^tc^^i anl ) ^ cFfr" ■d> ynifuid ^tt 3rh: wfe ^fR'fn ^n an, snr 24fq^'F:TT^^Wj^#HSIiIM

The text on this page is estimated to be only 2.12% accurate

1285 ^pTT 18:25-19:7 Tww^%^t 45^1-^3 for F*?rc 25^t wfa -q?rra t^si |3n ™ wi tst «n # ^snt wi w "wn ^ tfrct f % ?r *ft ^-H°bi tj=p %*? I?" ^tir int i^ptt f%nl ^ %n, opn^ ^ ^tm^fl^Tf ngT Sysii an?" "ittotwtt^t?^ wi^F^f^il sfk 28fqR ^^t^^i% w t (141 * mwm % % 9^^-cf 37TqH£l'-dHMI£tj S^cf? cp^t 3[qfet* ^T^r^ipfl 3TR ^T^W^l ^f3H-RM^I 29cR fadld-H 3 -A TTO ^1WT 3TFIT 3TR im, "IT? ^Tfo %T3RT cTR^l^N > o c^ o ^tiwt it % 3 ITT *^iM % TMl' opT cFfTT #lt ^ wte ^t! " (^3T^nj^ wn an I ) 1 /"V ^ i4< ^Piobft

The text on this page is estimated to be only 2.04% accurate

^JpTT 19:8-30 1286 83^^? "foiRI R^T R "3R 3rt h^TR^m" 10Irr fenRRR^R^ rtr fqRi 'gjn r# fen rri ^)rti iRf^TR 1rr °i|i*i R RfT fft f^ 1R5RT t, TJfIR Rl R3T Ri RfafERil RtejR^T^RTRRSlRT^lRT ^Rd\?\>m\" r^3r|) 18R#[R^#q^R^r3FR%RTRRRT RT ^3TRT| TTRi f £R, 1RRJ ^8R 3fk RJR r' ^Wti 19(4(r1ld-H ^ l^'gRI1R:EI3Fn ■qznan,^fatH":FR%'ctra'?t8nl afR^T^TR WHt.^RPftaTR dldlnl^'i^M snl'd^yHtel n$$ ^dl i4dld-H^^^'?Ft-21A|^RAil'^nTFnTra^, "^fr^ ^Rft, "3^ ^WT an % ^ •M^Rill' ^T TWl fl'" 22i4

The text on this page is estimated to be only 1.63% accurate

31f? FFr? oift wet fh fe «nl f=f % fe ^F%^FTHF*F^%TlFFlFfiF5FFFF? fe ^ H^qu| sn-^1% fa u qffejf F ftdld-H F f^t% f? 3n^i^-fe dHobl dfil'cte 3h»nq; afa ^3F% VN ^T^fSI^^I 32F«tlFqi?t 3flF 3TF fff % f?^, 'q?^ F?t anr ff>K ^^ °*n%i F>t, Ft f fWt % to 3#, ^ff} %m % f? ^ Ft ft ffti h ~^m, ^€ft ~5w£\ ^Ff ff7 Ftff 3% FSTT FflFF dc ■g^i 12;^ff t^t ^n ?ra tm an ^fi ^f^ t^t oR5[ SJTFn F^, T?t -W'kd, TO RKfFl 3F(^Fn n^'A ^•H-tl q®i, "t^jft, ?i ohmI fenq =t>< t# t? ^F) ~Sx\l "f^n, "^ F^ Pq -^ ^^1 ^ "F^ t 3TF F^Fffl^'iip^^^^fTSnt?" 14?dFT ^^^F^Fft3fh:^F^^3T"feo|^f41^l l Tqwfq ^w ^snF "=#' fftI 1% ^w fWt an 1 15%T F ^FF ^WT, '% T$\, r\ W$ ft TW\ t? ?1 FFF #3T TFt f?" FW FFFFT 1% FW FFlt f, ^FF ^FF F^T, "»JtFR, Ff^ F^f FFF ^F ^^FTl

The text on this page is estimated to be only 1.13% accurate

^pTT 20:16-21:7 1288 t eft t# wn^i wti ^ ~^H wi t? ^[ ^ ^ 17%T 3 ^R} ^RWT, "t# w\ ~s ■sprffe 3 amt ?T^ WI "te % 'TO? ^RT "=#' "fFTT f I ^tr^ *ft *Tr§^TT % "TO ^ 3TTT ^% W, "*I 3TTO WI f^dl afkg^ LRH lMdlfTaTT3HL|^ 4^^=« 3TTTcPFT} 18hR^h h'k&hI ^t? ^??ft jf f?Mf % toi 3?t|, "^ to ~^f ^m t , 3rk ^?r ~r$ ^ wf wf ll" 193^fe?m'^,^Tr:frai?^n'q^nfe an, ?? «t\ cmt %t ^f swm ^a% ^f T3%] if w 3TV

The text on this page is estimated to be only 1.14% accurate

1289 ^FTT 21:8-25 3^ aimi «iig< ti?^ o|>t cm ^ fd'Mi C=raffe ^W%snl)3Th:THt^fobMf ^ 3TF1 ^i

The text on this page is estimated to be only 1.82% accurate

1290 ]*M%WT 1t%jto$R,^ft sr^ft'qi#'5RioiJTf'^T^w ^tftt" % ^ t( #pgr t%% w^ ^ # %J "^ ■f^n afk ^ to ?ra ^q^T to wt ^ ■qfe 3ncqT% un 3to^3 j^irto ^tto^to3^ %^^^>qT wf^':337";Ttol"rPnl 33Wt TJ^% ^15^1^ 3to ^N TF^ olft to ^ ?F?Tn ^m ^#' i, tof wi to ^ to 3to 3Tfe7R^rHR^dfi-Mltl 8«rito^t'qfe. 3n?*n cfto torn, d/i y\fo> jtratotol 3rh: ■M^k-ln 3, ^r# ^fei anr -hihR-mi t( 3?h: sto%"^tff ?r^ ?r ^ ^nsft ton I " 'ton oRf^ % sir ^to to} to} ^ erf if ^qr ^37 #ptt "tftti to "to "q°p ^m?r "^ ^to to! 3wH ^ 3rtof ^tt tol 1{to ^?^it?i an "dt ^ 3n^m 3 ^to to tol t%to a)i cmt 3?i ^ jii n3fh: -5Fn, '% wt^ft #nr, gir ^?! igi-igi 3n^m^f^^^^rf^Fn^'^?^f^n?} ■^nl" oTte 3TT^I 133TTT o|gK qj-cl ot,

The text on this page is estimated to be only 1.37% accurate

1291 3faTf%oPFT 1:20-2:18 q^i^ta ^nfM opt w^t ^n w trti 3*nfa3 ^Ropt sim^f h ^0% ft* 3 Hi szi{ oPI frt^ ^ra ^nafl Ffai ^rtf%^ | " 23^R-|a) ^?ft ^t ^n% Tgrtii Trof; w #r} «iw«ii op?j ^m\ an c^w ^pto ^m ^ *ft ^m ^^pnan) afk^ro^nrraifl 24fe'ot^'oP!?(w sisfar ^r^ #t, '% ym,

The text on this page is estimated to be only 1.71% accurate

3foTf%om*T 2:19-42 1292 19I? TSTR 3TR7m if 3^ja opif 3TR^SR?nTRfef fesll>*'ll W, 3TF1 3TR ST? % ^Rc TFTT% ^R fen I

The text on this page is estimated to be only 0.84% accurate

1293 3M%-5m*T 2:43-3:22 Pl!!<=llRwf^5TW#R 43wr ^fe w w\ "fafei fe*w ^n *nst wi tft 3?k ^ferf un 3iwf opjf aftr fe ^s fe^lTll 44*mt fe^wi t^r ^nsr wl 0 3tr ^=t% w # ^® an, ^ ^ wi ww t( ^fe ^ si 1 4%?ft sfrI *mt wp; 3tr ^Fqft ^ wt 3tr fet fert ^ ^i^cmi ?ft, ^"r 'sra 3 ^ w fen 46]qfe. ~% v^ w^ % ^q 3 3 wr fe fe^-*j^ ill ^ 3FF} "ETTt *f ft^t ^t fenfe cp^ 3tr ~s^r ir ^ 3TFF5 % wr, fet-^^ igi^l 4??mt #nf ~^\ *i^nsFn3Tf cpi 3irr ^ ^ ^ 5^ ^ ^ri?t ^r?II 3?r yidRn to^r, #1=% ^£R fel ^1?TI, ^% ^=T% ^^3^:^15 %nl #lt f*RIlft ^ 3TES1 fen ^RT 3%1?T ^15 #1 ^ ■3T8RT % ^fFwq^TTO 3Tk # ^FR ^ ~£\ #lfl «n, ^ ^TPn ^Tl T¥l Sffl ^ fT fe^^fe%:f^"=n^?R'qT4cS|fectKd £)l Tnfe ^w ife *f ^ ^ "^rrnf ^ *fte *f ^ tto? ~Rfa; *f ;fe ^pt^ Ft ^ t nt ^f) ^=tc} ^t ~^nfRT^9%Tpft #ftl ^f^ ^ "^r mi to fen l 19^n%^ ^ 3FRT ^^fen3Tt 3TR ■qr%^R ^t 3TR effe 3n3Tt ■aife^R'qiqg^^Ffl 20fni%'q^^?tTqR«ri?t t[ anfesp Tiifri ^t *fpt an ^% 3?k 'snj cf?r #1^ 1% opt ^ fe) o|f h^r #i^ ^ ^ I, ^FTt^WT^tl 21^%^t^T-HH-M dlfe^fe?f % TR5 ^ ^?n fen ml 22lRn "^ ofit «n, *jm TO^cR ^^ #pi, grfR 3FFi #nf ^f ^ li "^ ^^n"=#ttel^l o(,^J|||o|f rF#^toF^'5pt,?F{

The text on this page is estimated to be only 1.71% accurate

3foTf%om*T 3:23-4:22 1294 ~&$\ w: w^ttI 23ak *rf ~sft$ "sqfe ^ -qft sft fen sn^ni'* 24fi! ^iH^d sik h*>c«tft'oPT ^fETR'oPTTt «Tl ^^^^«ift«Hlf?M3Tfr: oTTtfe -i-H •*)*« -Hh?l ft xjcpt aft, $Hi

The text on this page is estimated to be only 1.25% accurate

1295 3faTf%opFT 4:23-5:10 sn ^ aftr ^rcr ^rr ^® 5ws ^n^^rf 3rfr: ^pf 1W^ Rdl3TT "^ ^Wl an, o|f wt ~S^ opf TRMl 2%M R13#?7TT fepjl? 26 £RRt%TM3Tf"^, SW& fe£ ^5 ^F?R ^FJt &?R fenl ^3R% *1T% %-fefa Tf TT^^f JTT| ' 2M, tf&H 3Tk 4fd^H fadld-H «ft 1*1 RTT *f siftfixfi fen an, ^i^ra t( TiEFjp ft ^ s) i 28^ ^7g JIT fjjfe 3ft ?n%5 3TT*fE©T% 3T^?TR ^TT if® ^ i\ Hf^d ^t^^SFT 8JI,o|f TJJltl 293TTT ^te^^f^rai^ ^ra fir ^er' trr cfft"?ift> ^3%Mfe4'll*^%i^^3^^RTWTat^3T^3Tk Hi? -aan 3KgF| cfR~ ^T tfe T^^f £T0 *faj % RR TT fe? *fl Tl iff I " 31^R ^3^R gi«RT t[ft cfft ^ 73R T-STR tr ^ TTcfTSf 8J, c|f H^I 3^1 3?fc ^T T^ Tf Rfe a^qf ■HHHMII 3?T*3'R*fcn%*ns|TlT%=TC%^R 32f^TiM ^n ^w fH ^n^p ^=t aftr t^ o|+d

The text on this page is estimated to be only 2.02% accurate

3faTf%oPFT 5:11-37 1296 f?R Tft 3Tk RT RRtl fRR RRR^ ~^F] R^R 3TF) 3rfc rr rt '5R ^r wi ^ r^ aftr ^3r% rIr % R1R it ^ cRRl fell 1]# RRcft °bH d'H"*) sRRlt'qfRl^l 16W?#lR'%3TOqiR%RRn'T} 3^#RTff3Th:^lrHI3ff^4li4d#R' "5Z%"5E#fT3?T^^Ftl 3?^ 3 RRt 3T^ Ft RM RRR«tl RfM R*t Jlfcrf cPt TW R*t ^R 17fqR H^WH* 3TR ^3R% RIRt, RJRt *Kfcb4f Rn^,^R%fttf*i3Taiit"n^i3'#stf3*iT;p $1 18Rt ^ift ^fe?f 3fjt s^t RRI firM 3?k ^% +)iof^p)ob^|T[f t[sm R*)il 1RRF?tTra-%RRR jpj % tt^ -^spfe -^ rrijj % w: ^ato fi&l ^3R^ ^ ^mr ^ ^m r*it, 20"Ri3it, Rfa: r' ^ ft ^cTTSTTI" 21^R ^ift Rf RRT Rt RR % cTSR* 3 lRR*TRHSKIM°b 3ftT^R%RlRtR?l'qj^Rr ^fft RS^t RR RRT ?RTPR % ~WWl cfft -qft RRT ^rpttI %r ^ift ^j? ^ tferf RJt r?irt rrtI 22f5FR rst 3#rr0 r^tjjs r' w^ nr r?t R^f i^Rifl^lR^^RRWR^RRR^3^ 235pn, "ir' r%? "srft rt§tt % rtr ?fi 11* 3ik 5Rf RT RTSTT-RTrT igi f*# ^ icFg ^M fTR IR % 3^ "R3?RHSI'4M°b7"R«1«r'^ 7135^^3 \\\" 25fqRf%RTt^ »flfR 3TRR ^% ^TM, "i^H#rff^^R^%i'R'^Mi^n an,^Rfe:R' n| #nf ofjt ^q^T ^ t% 1 1 " 26# R^R % ^sn°bPWl''3FTgf^I 3TR^ 3Tfsj I^tt ^j -g^rm %^ wra ^ 3mt oRffe ^% 5T an % opff Urn ■&% (Rfer % ^^i l RT, RRT iRRRH R«T #H 31RT RRR ^, ^3fl |3?T 3ffr 3TT^T ^t f% "^1 Rift ^T % "f^ R1WT ~^l "fel Rl^l 35fqRRW^R^Rt?n,"^'Wiy,

The text on this page is estimated to be only 1.05% accurate

1297 3M%om*T 5:38-7:4 Ml 383-HlfoiRT TRI I, ^t -RmW 3 Ml Ml 42fM: Tffe tr% | ^q^T Ml 3TK ^TETTT cPTRT ^R Ef^ Mf"®tell -4hh1 «iVi3 m{ 3rk pir) «S)qR 4\v\ h$?

The text on this page is estimated to be only 1.12% accurate

3faTf%opFT 7:5-32 1298 ^t?t cr *ra T? xt Tfl -^^t^r ^ ^T?T ^h dr| HgTl ^twfq sw& cpff t^tr ^#f sft flp^j tr%=r ^ ^T^ sffOT opf % ^f ^T m ~3§ ^-^XFqj%%T5q^'^TII 6qr^?oR^^R} ^W *ft cPfT, fft of?M cpff 1afeT Tf trM ftoR Xnsi ^ sjTl s^fa Hpqj ^np |' 7tR%cR ^ opgi, '■Era ^tt^ ^i# ^ ^rrirT eft ~r ?pg fm 3?k i^% ^15 o) ^ ^T ^ WT 371^311^) aftT^fSIR-q^ ^ft^n^r^r 84 ^ anfe'J^t^p^'^qfT^ sf| #^?H T'qT^%| 12^^«L||cfjsj-^ ^n-^iw Tj&n zzm «nl 133Rspf ^gft ^tra % 3t^r ■qr ^rto r srr ^n^rf opt smi rr^t ^ fen 3fk MMH-m

The text on this page is estimated to be only 2.51% accurate

1299 3ff^rf%opFT 7:33-53 m**^°k f , seisin oFi, pwiofi ^n ark ^rra^^n *nw*r";#'3R'qiT¥i ani 33rwfa9j^^^^fT, '3TO3 4ff ^ :EFq^f ^TR ^Ttfe #W **1R ^ rl ^JKT ^t tI fsfewiT ^ %Z3\ i, ^RM tl ^ ^% f^TFt ^rft Jit ^Rl || ^% Wfj ^RH % 1^ R* hW ddilfl 311, 3MRd^fH4l ^#JTl'* ~fcn an, 'c^wra 3?r -4w

The text on this page is estimated to be only 1.00% accurate

3faTf%opFT 7:54-8:21 1300 ^TT#FTT feg ^3Rt TR ^ "=# ! " fero^^twn 5%M ^?ft 1% wj\ ^\ 3 oFrrar 3 3^i«Hdi ^t ^ afk^I^^^fte^^Ftl 55f^Fr['qf5r5t3n?qT 3 ^Ilfe fcdq-H-H wf ^fft 3?R ^n T^TI ^3*R 5 =K ^ ^ftRl ^ 3?R ^RH^cR %^T%^ % wf^*^ ? 3n 1 3tr ww sr ^ ■qr^r % 57W ^R ^?R fiI4o1 ■HH'M'^^T^R^if^KdlHI 1**11 *

&iy+l%^PTo|f ^Iftc+idl ^ Tf^ WTT I ^R '■RWT^I^ft 3TR "fe^ ^T R% 3^Jd ^Flf ^t ^R ^T^ ^31, ?Tl"^W ^T RW WR I 143?R ^M1#R if ^ftrff ^ ^R ^W WU % ■hihRaii % #nf ^ mA^cR % ^ter ^ -w1'dn °b1|ftHlli, afRR'^^ffl^n'EPTffe M^V°R%

The text on this page is estimated to be only 2.73% accurate

1301 3M%WT 8:22-9:6 R"R3 rr "per ^te rwT il 22ir1%r sra^ W ^<5RT1 R R^ 1RR13 RR 3TRRRRRlRRTRR|-?r R5RRTi?ftR^R'RrlRRR ri,^r1rrr%1%rr spit rr fen Rini 23R f^Rrl1^! ^ 3TlrfTT R RTRT 1r#, "^R TR % R1R Rl 3TR R?f 3fT I " 30fq#T r^ # RR^3mi"rpr'sifcllR?]i! 33 t^ot^r^rir'rrrr ^rft ^ rIrr f^n W! RRffo RTR)RRR5fnRtaRRf'Rl?iRiRir *WMW 53:7-8 3%h #^ ^ fq#™ ^ oRfi, "3rjiw ^r% ^ ^cn % ^ri%5j^m ^ f^H% ^r t[ or? tit t? 3TR^^R^'^Ti^RTt 3TR %?" 35fqR ft>&"$H ■^ ^f^T ^ fen 3TR I^T ?TRot ^ ^R #5T % fqR ^?f -#^ "^ ^fl, "^3! W\ ^1 tl 3R ^ s^fd-wi ^ r' wn ^\m h" [37'1r#™ r ^rt i^n, *r^ r 3tr3 wm "pet r Ir^rri rrri I, rT ■R RRRn 1 1' ^RR ^RT i^T, *W1! R iR^RIR RRRt t 1%rWtrr)w m^c\< RnR5ttr"]* 38?ra^iR TR RR ftRTR R?t 3TM ^tl iRR iRrf^RR 3RT R? #31T RPRf Wt RIRt "^f ^RT RR 3TO "fqRRcqR R ^R RqffRRTl^Tl 39aklRRR^RRFftRRlWTiRR^ RTlRRRcqRRR5RRn3TlRTTR^f^^t'RRRTl 3TR ^R #R R iRR ^R RJRt Rff ^T I ^ 8R 7RFRT 3TFR5 RRIRI |31T 3RR RFT RT 3TFt R?T1 R^l 403RT iRrf^RR R 3RIR 3TFIRR 3WKl^ R' RIRI 3TR R^ R^R?RR#RIR#R|RR^,R^RRrfR'RRRlRR RH RRR RRR -^ R]RI RRRI TfT I 9 "RT3RT 3^ RR % 3TRRliR3Tf RR RR RMR W\ ml^Mi R-41

The text on this page is estimated to be only 0.83% accurate

^Tf%omrT 9:7-30 1302 wk -% «ni oi^ T^T^nff^l" ^ ■g5*[ '3*1% ^ITO-MMI «*, 3M^Tai 8fl ^fft 3T13R fist TqoRf oft 4h^ ^ iRI *#I fe t&> ^f "=T ■# ^5 ^3 'qpn, 3ftr "=T ft ^Tt^ °FS5 WtfSdlwl 10^troF n' f=TRtw ^m ^1 v°t %*? an l Tjq ^ T TfTfl 123Tt^ T^^H^'^aif %^H"4lg^W%T^^tfe^ ■^T ^ 3TRTT ^Tt TTT flKf Tt| f Ttlf% W "fer ^ ^ Tt%l" 13f;r^nf "^ '3tit fett, "tjr, n^ in "sqjvii % ■^IT^'^fcTn^nfnT^tl ■m %T7 ^ %Tl 3Tk i tj^eh Tspqj -sfRFn snl 29^f ^Rpft 97M-^ i)^fei)'% TUat^-f^n? 3TTT ^^[y ?TTTtTt TqfEn fed!

The text on this page is estimated to be only 0.68% accurate

1303 ^Tf%"5PFT 9:31-10:14 '^■gcpir *w^ qgfom, -mfa anr -hihR-mi% *mfcm m\ ^w twt Trifri t} #nl ^ ^tUtm 3nr 3rfsra viRt>viMl ^ wnl ■sprffo ^w ^ t} ■^^ afk arfe yUiited Hpn snTrr 4l'^^nq^^3nr?Fn=T"=nR%T^5^n% opt.^ttlcITTf^nob^Mli, ^1^=11^1 %wfe ^TFT % Tic^ wfolT %TnatTWTfTtl3TR51^T TnnT^i^nTti" ^ ■wkd^r^r^wT'cWT twt sji, ^r "E^n fpn nt ^t^ 3?q^ ^r t^^f anr 3^1^Tiwiqoi>fTf^T^'w%n^'5Ptf5ipn s3nr ^t f^ 'wfei |3n «n, ^ tm ws ^n^r :jnqn^TK'nl #on^ «i, 4d

The text on this page is estimated to be only 2.24% accurate

3foTf%-5m*T 10:15-42 1304 153*TRT'3^% ''TW^t % "HM? feRl ^RTT RTTd % lRt%%RTRcbl|4HH^WR[R[^R%RFTRTRT fstSJR % "f^5 1 fstFd fqR «ft m^°n ^ ^ ■S^TFIT ? % "R f^RTt *ft "5qj%5 ^5t 3^5 "m SFlfe ^Topf I 29^-Hl&Hy^^M^dWI'|i(l#^Rnii*-Hl 3TFTi%% 3TT"T^TTl ^ld^' Tp# T3?TT f % cPF} o ^ ^ ^> 30^ttr ^^Rw-H^^fi, ":EnTi^T'qf^"§# •yH4)RH%H°i'Ll^'!. (dlH=(^)'H'3W^'ERTf'!JT8f=TT cR TFT SHI 3MH°b ^H^HId oR^f t( tt^ oqfe ^T TTFT^ 3TT :QfT |3TTl 313Th: oRfT, '^T^TfH! ^rl ftHdlTfT^^taTR^T^fePTf^l^^ ■dT^RTTT^T^TTFT^^TRf^^ll 32^T#T^ ^TO steR -qdTTT =b^ ^Tt ^T# 'STm t 3TR "^5 ^TFT "5FTTTT t, W3T^ T^R^TdTtl 3*^ f 31 TT^T "tM ^TF^ ^ ^RT% % WTT "^ % TJFRRTR ^7T ^q^T ^ Jli jm^t % ^qT ^r "fen «ni w tt4 o^t 'snj ii 37?T5^TrH^H M ' ^tf^ :qfferf % "q^T 3tr ■M-b^l^H R' fER^T 8TTI 3^fTR ^ ft V^ Rf RT (r1d

The text on this page is estimated to be only 1.16% accurate

1305 3M%cm*T 10:43-11:22 ^3rnM 3?k rt |3?f oft ~4w°bdf *r3 ^ f=™> Tnsfi ^t I fop wf "fersnrr ^ft^ ^mt wt ^rfe ^n% "=tw % •grci wrf opt soti tot i 1 " ■qfsrsr 3n?Ri ^ttt 3tftt fa-^tt Trrfe?T tri ani 45oFqffe TJm 3T1?RT =FT oTT5R "TT ^fefi ^R *ft t^n^TT^T an, TTTqaTTt% Tnaj 3^^ sn 'qjt I t% ^t ~^w ^■HR-Mlt^^TTFnanl 123n?qi-^H;?|-tU-ATn8l 133TT^ irf -^TFn % ira; ^rfe opt 3^ ^R if Tat ^n^ ^ ^3T an l # sf% t?t an ~%m ^t ^t ■q?TTT? obgtfl^ ofl^ ?FTbl ofJt ^RT ^1 14^W ^ oTEH ^HI^M -f31T# ^TT 3?k ^T TTRT3TTT ^T ^5R#TII 1^^'3^ER3?TTl:^fenHtTTfe 3)lrHI -iHTR^lT 3TFT1I "3^ ^ # ^ ^JIT^R ^f ■fttr^scri ani 16fqR'g^^^n'^fT:jw^R ^15 Ft 3MT, '^iT «^I Tt «mldfHI ^n an f^Fg tjs? Trfe anrfn t^ sjqid-wi "fen «n%nl' 17ir? ■q^TT t# tTT^T ^ ^ *ft ^ sIT5R "fen tM ^tt^ t^ ^ Tjq %j ^rt% if Pivoim fe^n an, tr i^f fen an, ■#" fefte "^rT^ ~$m "r ^N ?tai an?" WZ "^T "fen 1 3 tTT^T opt ^RfeTT "SPT^ fir oRf^ Wt, "3T25I, # qr^T "^ "fsTSlPW TT5p "5P> TR "ferra "oFI "oTW 3T5TTR"fent,T3Tr^5FT=pt3TtT^ Tsnar?!" 3lrllMl ^ §5RHR cPI 31FFR 1^#nT3TrRd^H-H%TFWif^^^rli|MH|3ff % ^te"fern*n3tk"cprTjTRT5nT h^'^hi^ ati 20^f "fefoTTiM if T^ f3 Tn?3T? 3TR "oPTR % at I TTT ^R 55J%^I TjTRMT TfTT^ Wtl 21"q9J offt ?rfe ^=T% Tnai sft| TTT T^cp ft7M ^H TW5PT "fefcTJTt SJRTI =PT% 5«J opt 3TR ^ TWl 22?TI5PT -HHNK ^ «M-!?VI

The text on this page is estimated to be only 0.57% accurate

3HfaTf%cm*T 11:23-12:17 1306 % 3hjiw ^t Tranr?i ?lrt %m\ nt ^w ^|?t wra ^f^Wl^Tf^^U^llidf^ll 21

The text on this page is estimated to be only 1.00% accurate

1307 3*faTf%oPFT 12:18-13:15 ^ torn if wn ^nl" ah wt ^ ~&$ ^ajn ^t it 3ter^t if ■qf #et t# $ 1% ^ttoh % ^ra ^n |3TI#nl 19l^ ^T5 %fl^R ^ ^o^opt Isfe #1 m?m opt artr ^ rk ^ra^ opt snfn ^tl td*& %r Jiffen 3 *n 'oft cWiR-hi 3 tf^ WU\ o(gf ^ HdT^tn^ni" d

The text on this page is estimated to be only 1.49% accurate

3foTf%oPFT 13:16-40 1308 w*ii ^pt w ^pt "z&d % «rr? -m^s wfa\ twftr 16^T IT T%Ft T3?T J3T1 3TO 3TTO WTO felTd Jli %T^ WW, '% lOTT^T % oTTTt 3TR q^cR 3 TT^^"ijT qifer.TJff: 17fR "lOT^T % #>Tf % #n 1% if ^?T Jli a), ^TR ^ twt^^tm an 3TK 3TTOA TWH ?n%5 t} f\ -^ V, # to^cr ^ ^hIhh % % % ijsf oj#j ^^ % ^ Wf^ ^ Wfe TTO % ~f^ ^13 fell 22fe( ?TT3r^ opt -^SI oR ^IH S^cR TFH ^TS^-5p> 5RFTI fsRTcp fepqifW^HTSft^ «ft, 'TO fet % ^ ^T3>^ -5P> TJcfi T$ oqft; % "^q if "crFTT't,^Tr^ T=FT% 3H°b'FTlT IdUM'il &)'4ltl^ni:Ep^^H-Hlidl%^FlT9q5H ^f#RsH«ft7PTli: c['TOTPr't, 4^ ^ 3TM "ft ^FR fef f f »^3RW)fi7T2:7 343rh: ^tr ^r to jaff if i^ fen w: ^hi ?Tn% aw^^i^^fer^H^Ti^qll^rR "irTTJSpR^PfTan: "3 r[^"%"qfel 3TO 3TS?T 3Tm)^T fri fel^'cpT'cfER'iW'^raj^'cptfeir WIHI& 55:3 3S^ vr^K ttep 3T^r ^q^H if -5^ oR^n |: It 3TTO ^T4 TTfe ^^R ^Pt SPfcfiT 3Tyqcf Hgl' gin ^itH' V^FJfifwm 16:10 3*fe ^F35c; 3TTO ^T if TORW% #H % 3FMT 3TCRT T^T-^fe TOT ^PT% fe-fej if # -rW\, ^ ^1% ■qsf3?f % ^I8( cfTRT fen^FTT 3TO ^rqsfn ^w J3nl 37fed fe> tort^r "R TO J3rf % ■^Ef^fefl'SPT^^FTI.^rEPT W=T?T|3TII 38_ 39TTTt 9lT|^jd^'^H^T:Enfe"fsp^WT'%IRT ^'qTqTo|ft^RI'5PT'3^?ig^fel'IPnil 3fR"|Tfl %'grofT^^fe^t,^RTOf:R"fSSPTTT'tTI TTSp?n i, fe# eft ^WT W\ ^TS17-an tiiobHI "=#' fenTrsp?n «fti 40TTrTflcraH-^, ob^T hW^ ■=P® =PfT 5, ?TR TO "R 'srS ^:

The text on this page is estimated to be only 0.60% accurate

1309 3M%"5m*T 13:41-14:12 41 *Pki w^ ^i#, ^gf, =P*ft'SRffirMg'TglH"'5pV" 42q%T3fR^HMW^^^TlN^r#,Tf "3 ^# 3TH^ ^«ft % fe "CJrrt ft 3?h: Wt W^ °T>t ■o -o o, 3?r "tt ^ ^-^t^ 3tr ^Rram^T 3RW? Til ^71 ■5TER ff^ % f^ ^Tf t^STI 45W f^M *H ^ f%r #pt op?!, "^f sira^ra an % ■qrfocR' cFT cTER 4£q% cfSR cprsfctR ^ ©s o ■gnriftFnTfTl 5%sr q?fejf ^ ^se? ok?t cpt %^f> T#?n3Tf 3TR RTT % wm onR()4f °Ft ^4°bWI ■?fan T%pr 3TR skhmw % f^s s^imk er3 3THT^-Ef7Tlc^3fR^|o|^M^T^3^^^ s!I^Hrnanl'5^;^fT'^'##i37an,^ "sra^ -qff ■qr ^tsn h?t ~ii ^nl" # ^w ^qi ^5^T 3TR 'Et^-'fcFr^ WHI Ul%Ff ^ # 5j5® foMi sn.^^^^^^gifftdl'i cjobMpH^i opt «IM Tf -gcPR cR -cfif^ wt, "^fTR 41^ Hj1^!' ■ECT T^t STTTnT ^FT%, ^n ^TT 3TT^ fl" 12^ «KHI«IW opt "^3TH"* 3TR -qW opt "%%?"* i^v=IMU|^=ldl 8JII

The text on this page is estimated to be only 1.89% accurate

3ff^Tf%om*T 14:13-15:8 1310 ■^waw^m sn i) 1j^tt'%"3^w:'^%3^? % Rfe; our t^^sf rtr ^r: q^ ^ff afk Ri^iarf ef\ ^3R an q#Efil ^w *ftf % ^ra qtera ark ^=Mra%1^^f%^sHi^i??n8?Tl 14fed^«r 3Rd 'EF!>'EFT qtTTT fen "l^f «lft -MldHli? #1 EFT M^!(oH % TTR t( -R^T EFTRl I," 3 R+kKI, IJHgT afk 3TdTfell ^H a[R| 23?T

The text on this page is estimated to be only 1.24% accurate

1311 3M%WT 15:9-33 ■ftTl!" 4p^yH^TTAl£R^'%4H 4^cK ^1% Tf^NHctH 3^H

The text on this page is estimated to be only 1.24% accurate

3ff^rf%om*T 15:34-16:16 1312 ^ *fcn snl 34* [f^Fgiwra^^ff^T^ ^fTnST^ 3^ Tns? ^ ^f #ra^ 4"+>&-4i if ^ran Tns? ^te "fen an 3nr Csrg % ) ^ppf if #ra^ ^^pt Tns? ^t?T f^RMl 3^'4T^^ii^1:5lfteTW"?t"rFnl -

The text on this page is estimated to be only 0.73% accurate

1313 3HfaTf%cm*T 16:17-17:2 m'A •wiM'^^^t sr q| -CRf^T o^T ^TTToTT fe 3TK 3W1 $ % j-t> qUi «n^l 233^ -qr «n?r ^tt ■qs ^pp^ % «m; ^fft ^> ^fa Tf ^ffi fen 3TK %T % 3TfeoFTTt ^5t 3TM ^t % ^ TTT 'opST WO '337 fen ^Ml 24t*St 3TTffT tn°PT 3TT^ 3^ ^3t 3if TRTl «*l 26?mt oTST STcTRop Ijob i^-HI *P[FT5p ^^3TMfe%ToFt":MfeT3'3cfl 3TTT'dTT'^T % t^S^ Tp Ml IT "fsRTTt o(ft ^64 dWl it °FT f?R T^f I 27%I % 3Tf^5FTft ^ "W] °FT ^M ^3T % ^T%-CRTS5p^17|lHt^T^^4Hld

The text on this page is estimated to be only 0.96% accurate

3faTf%oPFT 17:3-25 1314 T^rra % 3TjFm: altera ^=t% to ^n affc #t TWTI 33TTT wf 3 ^PT ^% -HH^Ir) |^ ^TS TTRg ■5R?n tit % ^rt% ^Pf <4kHii< #Rt # sff afh: fcpT ^ *TT jaff 3 t} ^t ^3R1 an I ^ opfcn, "qf il" %=f( tt ■ep® ^rt ttpw it ^ «r, %TTT sfk "few % ^R?T 3 -HpJHlelrl if T^l M % #nf t} cpfTfn 3ttt it fe 7ir# cpf t?t^ ■q^a ^w ^fN^ tI % t%?t r ^t «ns( ~m$\ I, ^n ^ w*\ fl 12mRuiih-w*m ^^t ^ ii^Rifi' aftr ^iv^to ^RH^-1^^ ^tftVoll'HWT 1^111 131%^ ^rafsTPggft% % -m^R-mT opt ^ ^rar^ni% twt I # ^ ~m *n 3tt sm% I afk wi *n ^t ■e^rt 9^T|^f "=t ^rf t%^ ^JT '^IFTT rTS TR *\fi ^t ^3T fel l^gfew sftr iirgf?™ ■5# ^ tIi 15(ll^ "cfTf ^ ^ ^ #rfl' "=t ^ ii?fe ■q#En "feT ark R)«riKH rian irmfsro % 1^ ^f 3n^T "^T -#! ^^WR^-Ef"TTTf^39TO'?3}l$tem*Ft# Wl ld

The text on this page is estimated to be only 0.83% accurate

1315 3M%"5m*T 17:26-18:13 opT ^ftoR, *n?f a?fc spj *nft ^s fen ^TTTn ll 26iT5p # iffl ^ ^tr wi o^ qtfi ^nM ^pi ^ft^#rff^n-HH-M fnfWi

The text on this page is estimated to be only 0.89% accurate

3ff^Tf%om*T 18:14-19:9 1316 Nl^3^3iq^^Tg)^3p^sn%J|RrW) SRtFT^T^TwIh: 3TqTW5FT?fal#^lO«lldyHHI ^RW-MH-HJIdSldl lsPb^Jow1'Pb-qf P|b|ij 915-f, T^3TF; d/^l(|3WHl^*sn%g^t}TF^F*ra ^qrai^n^T«mMKdil" 163ffc %r ^tt3 ^? 17# ^fft ^Tsf=TT TWFTTT % %I TTtfT-SF^n cfjf fenl *lT?*jf T} fe ^T ^TS ^ % TTT?I TTtfr^T opt ^^1 ■qjftl ^n%Tnat1M^rn?'an 3riwn *ft ^l t%h ^ rSbRel-MI t( 3^ %ti TdT^F) ^FTffsp ^TT^ irep T&R ^THI sftl 19f^FT 3 "fjtRra -qf^ 3^ -q^ ^ IM* ^T^ eFTTl 24^?lf^4 tj»j % TFf ^ ^an *ft fo# sftl w ^i 3 ^m? 9tt tspt 'a^H ^7T?n ?isn %i % iwr 3 ~m\ TirasiFft t> ^q^T ^n snl ^sira ^ %sra ^q^ai % ^4id^|-^-^^Ranl26^STifTWTTf'5|?1%m it ^?t %t^ rrml t^ fyRotxrxrii a?k 3rra^n^ ^^I^TfTTHt^^TjopaTtT^Traafh: 3rfsra^ «nO ~m HHlI"W ^T^ |ii % ^Wj # ^RT% I, |^7iR5n«f^fwifTsnl 1 (^ T^f3fl1^^3WM\ sn?" ^ft ^tr "Frai, "wti nt f^n cra^ "Rff I f* ^^f «cM, "^hit^ ^m sjqfd-wi Uraii?" ^ft^n, 'raf^^nsjqfd-i-HH" "fer 'qW^'spfl, "qf?T5ptcmld'WlffrHHfi+>d ftdl ^r^'^if'^m'5'Trai si i 8f^PT 'qteTT ^W^t 'RTSFn TWFTTT ^f "ET?n "TTT 3Th: #1 T#F^ risp f=T5T #PT ^Rrai T5TI ^W Htfefii % Tns? ^?n Sfrtst Jii ^% m^oH % TFT % fa'ra3'HHijii'4i°b

The text on this page is estimated to be only 1.97% accurate

1317 3faTf%oPFT 19:10-33 sk d) M RR THRRf % R1R R ^TFTT RFT1 ah ^3R R?l 4lHlRiiT^T ft RlRf RR1 ^IrHli? TRR' R fTOR rfirTi rri Irri ~^r% r| r? ^rr^ rj) % 1rr #nf r' ^IrHli? -HHl4i Rf,^RR?:RRRtR%RFTOlR%l ■^rr^ rti r?r rrr 3k rjsf^, "r cf! ^sr rIr, % R1HRT &-H ^ ^?n i^n I ^=t 4-ki=bT^T H^M Wl-H ^K 4<51% factcbf ^cRraT ^?n^Fnl 2Vf5I^TT'a^'^n^R3Tfe^M^IMl ■# f^ ^T ^ ?T^ ^F> WW\ 2%# i^rf ^? i«t ^ #r -$wi ^fT ^q^ J3TTI 21c(gf5Hi?l^-HHIH^nti\i\M\ ^\ M a

The text on this page is estimated to be only 1.09% accurate

-&farf%oPFT 19:34-20:16 1318 anl Rl°b-Tf% TO TO T5tT if ferdld |^ ^f?l tI, "ffejfM 35fq7?: ^FTT #rfw 3 % opt ?M ^PT% W, '% i$b^\ % )£ ^1 °MRt> t^T ^ H^'^Hdl"fe^fi+i'H-H^FTT^fHM^^? tit ^naii 1 10q%R ^M 7dn ark ^ra g^l I ^ 317=^ ^l?t if ^ Wl ^T^ ^?1, ' '^MT13Tl' ^Td oRffsp ^g% 5FI 31^ ^ if ill" "ft^T ^W ^sqr^idi J i-m 1 3fk^r^ft^^tHl?'37Tl:5raifei f^ii 3rk ^ tifh i -^ ^=i% wi ^|?i ^r , 4-^ cl^ s(ld41d ^T?n Till "fTO ^T^ ^=1^ "fe ^1 1 %n ^ffe ^ra^ ^ ^ ■sit ^ 3n^ l "^ ^f W3 ^=ift?nl t%T ^Pl ^t^RI 3?k ^1H ^HT ^V/t%R"^^Wl'%1:^Tf ^?t "g^TFTT 3fk I^-H ^1fd

The text on this page is estimated to be only 0.67% accurate

1319 3*faTf%oFFT 20:17-21:6 sptTJ^Fl ^T^T 3H4^i qra geTFTTl 183^%3TT^-qT % sIK^irl RdT^^TTR^d/^TITKfdV)} i$\ 1 193rrc <5lHdNcfn 2^R43k^niM'^r^TRH9ira^TRitFrn^ % lkh>°k spt ^p ^ opt sf^n j%\ f afa ^HK'q'H^Tfi feoHTfip yfd 3^ 4H-3d cMdITWT f I 223fk 3RT#H 3fl?qi% 3?8J^T#PT^['M^I ■^T'3Mf'^n'^lf'R^r":#'tl'R?Tt'^r^T4^te sjq 3ttt ^r? t^h opt trt spt^t ^nw?n f #f4 ^ w ^ Cs ^> ■H-HHNK cfft TITSft ^TTl 25"3TK 3ra^Hdlt1% cW^'aptf *ft, &-A #ct 3 -qr^r % ttst opt -^tr ^pt?ti fqrn, 3n *jp3TPT^pMtdgRtel Ml^lll 2*?T#I^3TT3rH'cFt?TT T^ #¥TT ^T?n f % TFWt T^ f^ft % *ftT^T oPT^M^f ^f f I 27sprPp R m^dn opt TTRnf "?^57 opt cTJ% ^Tld" R' WR\ ^#f ff^fe^Ftl f I 283mt 3TTT 3^ TPT?PT cfTt UsMm) oprft TWtl ■qfe 3tt?ri "^ ^mf t} cf| ^ ■qr |fe tt3^ ^mt «RPTI i "rnfsff giT iRH^cK sp) ^3Tt Tf % Tnat #f! ^fe f^n ^ "5^n t, ■gcifpn ^nfsrenr "fen Tw?n li 33^ ■^^ft foP# % T4t^-:EiKt ^ ^f ^?t 3#l^IM "=#' ^Ttl 34cRT^;^Fl?t'ft1%'3T Fl IfT^f "^ # ^qft sftr ^f T#prf ^?t 3rra^ra?n3ff ^t in %^n 1 1 3^ 3^ WT cpif f4 git ^f "fejRT t % ^7f3^ iftsW ^PT?t Jli ^ 1MW "Sift WTO1 %€ ■q^TT ob

The text on this page is estimated to be only 1.33% accurate

3ff^Tf%om*T 21:7-31 1320 ■^R^^id HI'Uw -MMI *if "3 ^4^^T^n^dHITT qffejf ■spl W^ i, FT^ ^% TTcP xpj ^ %g rl? % 7^, "T^TT "^te "^TT "^ w 26in wm ^%R ^ ^=i #nf opt 3^ Tnar #rt aTR^R^nf^Hiai 3^ 31Ft ^t *ft 3R# "fct ^5 ^ 1?M ^■3^Tffe:^f^§ &*tll 4-^fl «%TfTt*ftoTF?f^Pt ^4°bi R-41 siRi%?t'^tLiob4 &-4H 28fqR^i^tt f #fi cp^I'^hkI «ndi%, m\(\ °M=i-tan% 3tr FRR W TaiH % "fsRte if #rff ^Pt feslldl f7R?n fl 3TR 3M^^fep|4Jl'cplTife:Tf^3MI'tl 3TR ^ W a^PR "?T4 Ttfm ^aiH opt ^ ^s -spr fentl" 29(^?ft %n ^-hM '5PWT anf^P A^ "TW% irep -#R# 'spt "=FR ^f ^ft ^1% mat ^fe|ob< ^1 +)H*I att% "%+) d*l H'R< t[ ^iRlt) 30TTt TIRT "=FR fsRtS? if ^^ TIfT J3TT I #7 %%^PT^3 3^3^RT%?T3ptTIoPf #pn|%T^ ^ ERtfe^ J^ Tffe T^^lfT ^^ 31[k dr

The text on this page is estimated to be only 2.42% accurate

1321 ^Tf%"5pFT 21:32-22:13 #tf 0 % ttr) ^ft % -blHHWch % 'qw ^f 323TR ?RR R/® RHMlfS-Mil" RR RR % Rfl| n did yi!;i^^Kf afk^fer^Mi 7$ srhI 'qr ^ 'qfT I Tml ^h t^; 3^rr ^ft ^ 'gfi^ oPf T# Ml, "1W, 3Tt?n5^I! ?J^oRfWITIT t?' ^ ^R ^RT R' opfT, *qq, ^ R^T i?' Rf RSlt RlRI, ^ R# RTOR %I f 1r^ -d Rdl TWT 1 1 ' ^R^ RW ^, ^?R RtR5 yobliil ^tell Rt>-^ d+) NRR^lR?rRR^RJRtiRdiRRI SfT, R R^ RJT ■qp>| 1(RR-qSI, % ^R R^TRRS?' "^1 TR 'q^^ r^r^t, IgsTit, 3ftr

The text on this page is estimated to be only 1.34% accurate

-&faTf%opFT 22:14-23:6 1322 £R-T5rcsq ^^3fo^T^^ft^PtTj3l 15^ffe TT^ # ^31 | 3TTT # TH1 I , ^3TI% %% TWt #>TT' % mti TT ^W%\ TWt fWU 16TTt 3Wd fe-HT is^ tstt 3 ■q^TTT ^PT "I^tTI ^, "^ ~H^Q t} STTHt ^Pt ^rfj ■^I^^Ttf^TF^^^^ft!" 233^rat%^n T? at 3rfc 3Tq^ opqsf 7=pT ^TJT ^TJT ^PT ^pcP T? at-aan 3Tram^ s^t^r? at, 24fwt^n-^FT^"^ % ^li wn wn ^r ^rtrt w-?n® ^ ^ crrt%> ■q?n ^ 1% ^rt tit #qf % ?rt wit ~f^?n^ ^pi ^pjtt^ifi 25f^^3^f}-5Piiwjj3%1^ #tt? atcmtc|gfTT'q%TT^cpfT, '1ftr#T>ftHiJiR

The text on this page is estimated to be only 0.84% accurate

1323 3M%of>FT 23:7-30 to fe^ ^3 tsst isn 3rh: *m % ^te t^ ^is ipftl 8(W&j4 =PT cF^TTi|%'CR??21R HSfgldl ^ -wkd ift i 3rh: ^ it 3tfrt^i f^Fg MjOIW o|JI^l%3lfew^fl5Ro(Rf||) 95IFI^f?nIUJ]cr1 cMt«l£-H ctiirj^obg^il,''^ oMRn^f^H cti]| 13te Hgl'mdll -4R fe-Hl 3n?RT"3*?T f=Mt) wkd "^ 1^ wt =fit i # ^i^ cpn?" 10^rffe ^ fera #gcp -$q ^ ^opj «n, wf ^^^I#^^faqife4^3n^feiifop-o* 1IM«( dop tftejST o|-i| HK H^T S Md 5, rRTO";Tl3' op?T 'oRffop ^f gft^ -5W -5PFTT ^HNid^^topIWTafqoPfiark^T^ 3TtT ^^T5PT Wl, "^T^^fT^'oM TTl'^t3M^ft3T3iTf?tcptwtyT ■^'ot^tTT^ll" 22fq^ +)nmld ^ g5?=P opt^ 3^ ^r ^t fen, "rl ^1 "!%# opt T^ ^THT "1% rl3 T# W^t ffERT^'^t'?!" &\ t%T cpl oklfttl $5ff ^Rt 23fi+i< ^HNid^a^^r^TT-^Ftopf opt^

The text on this page is estimated to be only 0.61% accurate

3ff^Tf%om*T 23:31-24:23 1324 3fl^?T 3 "fell I % 3 W^ f^g ^FJl^ Wt 3l#1r^qnM^I^3n^3Tr^TOfen-3ftT^ 3F1^ fe ^f-^Mff ^ ^H% Tnaj 3Ft ^F> % 1^ Wfe ^T 3 E4|o|Hl ^ft ^ffe 3TT^I 33^R 3 ■%h ^1 ^t} Tffq ~fcni 31 t^r

The text on this page is estimated to be only 0.68% accurate

1325 ^Tf%oPFT 24:24-25:19 24ws UrT «if; lkI^ckh 3?q^ ■q?^ gfern % *naj -^ 3mn ci? t^ ^t ttH^t afti %fee ^ t^ -5^ -g?M ^n 3?k ^Wj ^% ^' "f^IW % fwifdW^HII 25fe-rM«l qVl-H ^ t%ft s$i «f^|? if ■# 77^ fen I /^ ^ fqn: 4tW-h "^ ^? ■g^T ^' ■q^T f^n ^«J) affrdlHRH^^^-HR-Ml^^krlH Hfewiarf "3 t^fft % f^g wtf) "^ 3#ftft ^tt fen, '%ra ■qW ^ oFfT, "?Tt ^IT 'd ^Ml^FT ^TFTT "EnWdl f ^11% ^f ^f 'pf ^ WTT^'T^'fR 3TfipM ^71 =^FT ^#?" 10q%Ff "^ ^WT, "l^f ■giPT ^f '%^T ^ 3RI?m % ^^PT^ig^Tf I ^TT^FT^ffft^n^M'Enft^l ^ft ^^id 3TR ^? ■qr w\ti wt 3Ti^PTF?f ^ ^ ^n^ ^n 3^^R "R 3 fen ^, ^ ^05 % 1%^, #11 ^P)f 17# ^ ^TFt ^m ^ ^iat ^f 31F> ■dt ^F) frlT ^T WTl^ 3F1^ # fel ^FTCH ■qT ^3 ^7T ^1 ^TRp ^ ^T f^ ^F> ^?t 3n^n ^l 18^M ^r m ^tq ^ttf> ^ %r^ ^ HTHt^ft^TTT!: i^-HI

The text on this page is estimated to be only 0.52% accurate

^Tf%oPFT 25:20-26:14 1326 ^^ i , ^trr =R5 "r?^ kit I 'RwfR r%r ^n ^n t %-^^tfeil 20R[^R5r"R?fRTT¥i sn%"Ft M f£\ WF#1 ^FR ^R *T1R, ^R^p) ^RR ^TO Wt -fe -5PH 7=^ 31RR ^r 3#IRPTf ^?n ^ift ^?rr % #ir ?m\rn ^ ^ rrr i? 21f5F?i r%r "r *ra stsrt ^r 1% ^r wrc % ^m ~k f*f) ^ wi T*31 ^, Rl" *R 3R^T "FiRl, "fe 'R ^M RER ^ ^trt % Rra -^ fipM f ^ R?fTM 'stlRl" 4rk|-H "R 'ERR, "RR^R'5fi?T'RR#RTl" 23#3Fl^fe3TfjFqT3Tk PhP-A sJf^^TSFT % Rl?l 3RR 3TF: ^#R ^RT-HI-4°bl' R?F RRT % yH4f%Rra:R'R['R5R3y^l PcMllRWRR ■q 3Rfn^ 3fcRVTR^RcifT^3RRT"RRTl 24f-r lWh «?mi, "h^kni 3Tfjrcqi^an^qfera-H^iHl! rr ^r "stItp ^ ^3 t! wt #ra% iwt 'r' '?WEn fern ^T TIFT ^TTRT T¥l I % "# 3M 3RT ^ffe R?fTTR^RT:RTftRl 25f^Fg ^ ^fNf %n f % fFR "CJR1 ^R5 "=#' "fsfTRl ffcft ^ 1J5_^DS "f^T ^1 3TTT ^Tffe ^RR ^ WIS t 4Hf$=IK ^R ■gi?f=n'5Ftt'^P>^fR"^^FI ^R3R^RfRIRT ti 26f^g ?r% fsm t[ wis % Rra %3 ^^ ^^ Rra^tf Hp^d «nR^#'i|l R"# ^tilfa*) 3m #Rf % ^RFTR, 3TF: fRTfa W\ ~& I H^KMI 3#cqi! RJ^F; ^RFTR ?FR1 t Rife ?R #R RSRM f^Rt ^t opt ^R5?R 3rfRRtR-RR -^ f^ f^n 'RlR'R3T^R13FRRR;RRRfRTi|l" TftpTM3#tqT%WFt ZJ\J 3TtT3%F^3T3Ri?ltf'W'qT1%?T ^ 3T^RT fTat ^3W 3Tk 3^ ^Erra 'R' ^RT 3TOWT f^n, 2'% th 3#cqi! ^[ 3^ 3m o^t jfwi ■HH^di f % -m^R-mT "^ ~m ^ ^rr 3nftq wtf) t, t\ ^ o ~3~^ Wt ^FTt % ^Tra 'R, TT ^ ■?tFTR %T^ ^TT TfT tl Wt^r "p; ^ ~m ~$$fcti WQ 1 1% ?# ^R*ft TBTR 'RTSRT ^T?n t % ^f % ^RTS? ^RTt ^13 ^Ht I^M'll ^h^) «(^d'?fR'T'^;3iF#t 3rh::Tft'^:Enl ^R' Tit JIJ ^ ^R ^EH ^7T Wt ^TTteT f # TTTR^T fRTTt ^R?f ^TTl^rqT fe T1?I d -R^ 3Tf^R ■RM STTl 3fk ^

The text on this page is estimated to be only 1.06% accurate

1327 3faTf%-5PFT 26:15-27:6 ^? ~S& W "=#' 1 1 ' 15fqR tIr wt, % ^TR, cl ^r ib'Tw^^^l^^^iff^cMkHiu^TWi % T?q Tf ferfj ^rf 3TR ^ft oF® TR ^ fom *f ^3l|3TR#oW ^ ?#R<2ll-*J|l,^WTa^TSft ill 17^#h n&ift 3TR fstajpraf %ttot 18-q^TO'opT^st^T^| oi|o|^K foFJTI 3TR ^ ^T3% iM -^r ^oTFra ^r

The text on this page is estimated to be only 0.58% accurate

3*foTf%om*T 27:7-31 1328 !Ff'3*JTR:E|3T'fG7nl ^ffe cFF fq Sfft sfft 3TFt ^3^ jTIT ^ft fotT f^f 3FF^ "RF1 tR "=#' ^ TF^ ^ Tft sff, # sR ?ml sg?ta % %^-%^ ^ft °b Id hi| 3 ^ra c#3TFt^Sl^HTFfTTi^^f«tH'tR: Msp &-H\\,^ =b=ld HM 3ra^lW3^T^WM % lelH sjfi-ob gHl} Wlf %1?F> *ftl" "fsFgt^TO ■^ # ^5i an, ~$q ■qr ^tr gh % ~wwt ^ ^Nt TTF^-^^TWR%HlId=b sfa obklH ^Ft^IFff ^FT 3#5F fe^ra f^i 123fh: ^rffoH m wzum Slid ^.jJ'oF 3) jobd HfT STT; ^fcm, 3#F*kTC #iff "^T^fTfloF rftfa-ifHoW 4f ^ 'oFl y-MH ob^oft ft "si^ftl affc ^ oiff fiFTH ^n Ihsm-h Hp^n fi+ifHoHH 9FF1 offi T^F %n sHU'llg I PtHobl *F3 ^R-'t#EW 3Tk ^TT-yf^lH 3Nf % ft WH *%F4 ^f§F>ft 'qoR f^t-ft^ W^ WIT TTT ^1 Tf I, T^l-^FFl^ ^fjs ^i ^cnr ffi 3%9fl ^11-^fff ^ 4gra 3 oFfT, "qfe ^ #n ^?r tt;: ^ff ^% nt ?ra *ft ^ff

The text on this page is estimated to be only 0.71% accurate

1329 ^Tf%ofJFT 27:32-28:12 «r tj\$p\\" 32rrr ^Piobi' ^ Tfefprf ^t c?ns ^pt TSTl':TWl3Tf^r':TR Pki fc-411 339%T?RT} stel4£ 3 H^ 3TTW ^ff^Tflif'^-d 41^-H^d-H HIJl^31FT^f'ft •^ttrtI $ "fe m *n nt tr ^^F>n ^n frx ■^T^I SRHt ■qT "FR ^T ^T ^FWl f^Fd «I|?T ^T awTsnrni "^q t} ^5 *ft -q^f j^n t, Tfe-d^ m fwt 3ira9nd sfnsn jw\\ *q#ro ^n fqdi %dT if ?ffl ^fgR 3TR ^%T^T# ?ftl 't%FI d-H-bl ftd^ 'HkK 'I'MllfqR'qiSFIT^T^^ «IK

The text on this page is estimated to be only 2.55% accurate

3foTf%om*T 28:13-31 1330 133jff ^ ^r un i*r Ttwr w^ 3rfc frx m3 it fe ?5m\ wn w 'qft l ttT 3fi^ fe i*r grcppn wt fe ^i?ft 'cFt cfii 3rh: j$ im i*r fn 3tt ■o si o, 3TfoTO^n^MT 3rh: #i ttcpt' m; i*# 1*r?ft 3rftl T%pf"^ ^^ ^3TT3TFTt !%M l*T TFT 'qft # f^f t%wt of»t ^g^g if T%R opt 3Fft 3TR 3FF1 f} Tl^ ^ 3FFTt% ^ ^t 17cfft fe ^k ''rtero ft lift ftdiftf ^t ^tftt 3FT TR% T^vst sft W^ TT ^ ^3"=f3 ft^n, '% *[T§ft, 'Etll Fft 3FFF ^TTtrT IT 3Fft T^f % foTfST"foTSTH%yldT^ ^^ ^ sftr ■?FT?Fnl 'oTJ ^W ^ TTFt rra 1# t| :wn TWTl 243^ ^t fs ^n an, ^^ ^® Hi ^iFra it ^"foT^'^S^'fe^ra H^ffoh-411 25t%T 3TFWTf TJofi^^3W$Hc1lftw'cT'cT?T^T«n^WtlTra Tt%T^i^^^raatk'owt,''^TPni'#^ioran 26 "^noR ^t #nf t oi>w ^ cR ^i '^g^ it ^g^ Tift ■qr^'^Tft'oP^n^n! 27 oWtfel^oFI-pPT^faTT^m^FTI oFHl^% % ^ft #n ^nft^ t% ■qr^oTT °fi ii ^grc 1%sniFTr% ira ^ri^n^Mii ^"^ T^ftl" 29["^ra '4%r ^ ^ft 'on ^tt Ht 3nqn if foToTR oFT3 1^ H^t ^lf T} ^f "fft I ' '] * 305T1I foFTft % 3Fft TT°FR if -qfew IT 3t T4T?I ?T5F ^ITTl # oFlf ^ ^T^ ft^ft 3TI?n, oil ^TI5Ft 4ro(|J|d

The text on this page is estimated to be only 1.81% accurate

1331 OM 1r%r ^r Rtg *iRti ^?R ^1R 1, #1^ rt%rt ^ tftR itR % "f^ «J?RRT, "fM rt%rt % ^R TJRRTRJT % ^TRJT % frfq; 'RRT TFTT 2&-H1TT #R itt , RR TO ^RT % 1R7RTR 3 1R rttrt yldHiiid if l 13mi#, r ^rtirt i fR} r^I RRT IT 1% 'RR cFHT RRf 3THI ^TT-^K "ETUI 1 dlfi 4-HI i+xrlTTR-iT!: ^R4TfRMl,^nitfWR TRif^mt^TSF^ll 15?#^Tf^ftR5TjiM^ 9fl ^RRRTETTT ^T TR^T ^R o^t WfK f | 16R WfRTEnT % 1%? TTfifel -RfT 1 oRpF ^hr' Rl^ ^t afa f&l RT Rl^t-^ *?t ^fcf f^TO T*3R1 1-^R% ^5R % "f^R RTR^T ^R ^RIR^f tl 17^Rffe ■H-HRMK Rf Rf tf %-^T 'R?R ^R 3T8W 'R c^lR f, ^ ■^Rf aftr IT 'jnf RT TSR 'R RTR^T ^R ^RR ■R^SltRII 193RT^RIltTni^RffeRTTt^T% «J1T Rf ^ -qft RT1 ^RIRR 1 ^Rffe RT%^ "R ^ ^%^R1RI1I 20^M T^ TIRK ^R TRRT if ^R^t 3^R-ft^lNdliT ^H-ri^lRti 3RT RT%^^_X4FF TRR^ 1^^ ^ 1 ^Rtfe ^R ■RTRSTf ^R -R RTt RT1 ^RFR ^RI TI^Rt 1, ^RT RT%RT "R T^f I ~^f^ #Rt %4l-H=bl|^HH^'l 21RWfR^RT%RT-RR^lTRR ti^FR^^4^^o(

The text on this page is estimated to be only 0.85% accurate

ftM 1:24-2:17 1332 twaff ark #t^ fn ^ % -war «ft opif ^r^ wti ^ 283ffr

The text on this page is estimated to be only 2.55% accurate

1333 TtM 2:18-3:17 ■g^ 3#frr i 183?h: ^wt ^®r ^t ^irai i f# %arai m\ i, 19a ^n ^Rrai I % ^ aisjf ^n 1, 2%t#y#rff^lWsl^ o(|

The text on this page is estimated to be only 0.92% accurate

TtfMf 3:18-4:11 1334 18 "dHohl aiffaf t[ ti^ ofi m^'il" »VWW u'/irf/ 36:1 sM ctlfoi'ST'gSobl sKfoMI^'^aftT-HRM'ld q^oR%^%-qeq^i 20sra^n % oFiqf ^=p?nl oRffsp ^ra^n 3 ^r ^s "ft^n i, oif i 21~foP=c[ 3M ■5TTC?T5t *f JHEl % Unj -qf ^ifqj •H$)=Wt «Rraril rn^-M#^^an3?h:^M^ ^ppVorMIi 22*mt fe^M% &i) 4Wj Htite 3 fe^ra % 'srn ttt^t opt s#fen s^ps cp) ^fFftti^TTioTrHt^qra^l 233PTt% ^mt "^ -qiq foi^l aftr wft q^?on oFtT#cn^Mt^|i 24i=b^41y JH-hI^^'-HMtI foby,^3T^JIW%^

The text on this page is estimated to be only 1.17% accurate

1335 Ttfolf 4:12-5:11 IVdf^cii-Hlill C^#fq;^ 4 snfRi^iijJl) u^ ^ ^ m?\ wz "feri an, 3tor^ ^pt?I 1 1 ^f yifH*di^%n an^rf^w%-5rn^?Ti ^ftill 14^rfe *rt ^ra^sn op) tif# I, 3 wra % dr|l%-tWH fe^ra «sld f|o|f IJT^WoPT'fetltl 17^ll-b|5(dldlt,"^^ (laiwta) 3^°b

The text on this page is estimated to be only 2.25% accurate

TtfMf 5:12-6:15 1336 12?T4ttM -qcf? ^rt%v (aiRT) % 'gjn 3$ sttr RTRq rtr RR-qrqRRRg aftr ^tt srjjt *jr R^RW%lRq;3TTR'5RTt%RRtRRqftR $l 13ara ^# °q^«n % rh R ^ir rtr r' Rq an f^g ^ ^? r^ ^rtstt R#f flft feft r^i RtRqRf'RRRTR 14t%R rkr r r^ft rr % TFR f&5 RR m -ZR TFT RRR T#t I RR ^3R m Rt rs ft itr Tft &-ftt Rq Rff f^R 0 R^tRKR^Tl 3TRR RFWlft sit 4hi 33 Rt (TRit?) rtr rirt sn I 15t%R rtr^tt r^t rtrr rkr % srqrra % r*tt Rff an Rq-Rtw R?t 3tr r rtr l, rrr RqRsrf % r? RTR STTl 17R?T: ^fe RR ^RR Rft ^3R 3Tqn8? % R^TTR RRT R^T R1TR ft RR R RT 4

The text on this page is estimated to be only 1.11% accurate

1337 T)M 6:16-7:13 % ^ cR f^ft ^ 3^fJ -qp^ % %r 3^ 3flq ■^tcTO % T^q ^ ' ^ fAd "#r err ■gi=r c^rt "#ri "fer ^^iobiRdi%,^^ snftfen^'dTqr^^^'ftl ?ftf[!q^a}| 18dJ%qiqfiW+>4# "^wf l srf^t? "qiq ^Tf ^w % ■grn ^r "^tq; ^jg ^n ^t^an%1%8JH% UTl

The text on this page is estimated to be only 1.02% accurate

TtfMf 7:14-8:15 1338 l1=wTfi fR ^^JR?t 1 1% ^o^sn ?Tt 3?li?RoP 1 afk 'R ^1S-"RW ^H «ftf?IcP tpTsq f ^TT -qFt ^ft ■^r tit t ^ffe ^ ^rr ^ftt ^nw?n t , ^#' ^r?n, ^PT^'oW ^BT^n -opt 3nc^zR^ni| ■qft opt ^n ^ i 55Wtfopot#3WR*llldobRHo(^9^%3TOm: ^f, 3 Robl ^fe RIRol ^cTRlcl cptf&WI3Tf1T!:i%5pt Ti?ft f ■qr=g 3 ^t wa "rwT^pt ^spal foTFa ?1R #T 4l?top TITR5T ^91157 % 3[8}tR ^#-ft,^fr5P 3nrRTop 3TcftRft ^R o||+do| Tf'gRRf q^R?oR-opt3nrRT'^T"pHrail'fe;g^%#^ ^ffel "R#> ^ 3?lrRT "Rff ¥ eft ^W TTO^f ^T "Rff s> I Wt % tg W ^\ i ■qfe 3TlrRT, TTR^cTT % ^TKT ^ 8#fop d^l

The text on this page is estimated to be only 1.13% accurate

1339 TtM 8:16-9:1 3?^, t ft?n! " 16^ ■qfe 3TFRT ^ 'FTTft 3TFRT % WT %T '5PT *HSft ^ft | fop fR TTT^T ^ ^STdHill 173fk opffisp ^R ^TRopi ^TH I, ?r *ft ^rnfsranftl, 4^^=)

The text on this page is estimated to be only 2.81% accurate

flM 9:2-26 1340 f, ^ "3W Ak\ ^T§ft M t ^ ^ ^TfTl 3*3 t 3fk^:*R3PH^K'q)?ii|l %wi^f^ ^^f^u % 3^ ^nf «Rf art? ^Rjrrat sfsrfeprf ■% #nr ^[ ■"TO)w^n?TR sfr^rt ^#n 3rtr ^r 3^ft ?t ^wu\ "sfr ^m,

The text on this page is estimated to be only 5.23% accurate

1341 TtM 9:27-10:17 I: "RRiR ^RH3^[ ~^\ RRTH RRS '5?f) RI^% "^Toff % RRIR 3RR5T t Rf R) 3RR' ^ %RR STlt R # RR "qFf^l 2Mffe RR R«Ri rt rr^ ^rir cpt "qrt rt? ^ 3rk r^^rr otA'IH"* 29rk rrHr; q^mn R RfR*\\ opt RfT RTRff R Rt M(H^<=K R ir^ft f RfcRRxpftftsjliHcbdlR^WXRIR^TRrTRRRR 4irJ% -^ sz^sm R7T 3T3 Icpqi ?nfe IT rM Rt 1r?RIR RRR1 f, RTR!?RT % 1%IT RTJR5F ft| 5SllfH cbKUHlftd i^'lll"* 6IVdfe=ll-HRlRRR rir! yiWobdi % Irrt r' rtkr r? r^rt f "^ RqR R R? Rd R® , *wf R' ^R ^R=T R1RTT?' * " (RIRt, "RR^RRrTrRRRRT WRI") 7'RT, 'RtR RIRM R'RfoRlRTl?'*" (RFfl, "RR)WRR RRR% r]r r ^m ?hri" rir) rr)w R?t r^ jarf r' r R1RR?I1R|") ^TR^IRW ob^dlt, "RRR^RlRt, R^ 3Mr?: t 3Th: R^ RR R't I"* RRtlRTRRfRH o|f RRRl^RRnfRRRRRRRtl RRJR^R 3R[R 1% ^ op^, "%T ^rafe W t" sfk rT 3^ TTH ^f v3 ' o o o, rw fewra r^: Ir? rtr^rt r ^r r^ |3?f r' r RTfRdfR^RTRR^R^RFRTll 10RRti% 3RIR ■ppr% fe^Rj^-sjfe sjlWob 6$i\H\ RIRli 3Jk 3RtR^R RR RIRR? 3RT Irr rrt RR RR7 RR| ^f ^R^T ^R RCT R #, R RR> RR RRRt? 153Th:^R^TR7R^RR7^R^TRR^^RIRR R^ RR7 ^f RRI R RRI #? ^Rl "iR7 RIRRf R' R^T t; "RRRIRR ^nRRMfR^RRJllR^RR^Il"* 16JRFdR^RRRRrRR RR^RRRRff I RR1RIW RJfRI t, '% RR, ¥R1^ ^R^l R^t 1RRR> -wUk %RI?"* 17RrTq^l%RR^RlR7RlR^RRRlt 3Tk^R^R^RRIRlRltR^RR|RRlW'^iR^R^' ^R^l^Rltl ... R^RF ^RTPTT? 10:22-23 Rft ... RI^ MWimt! 1:9 >% ... T^RT 'HoJI. 18:5 \3{^ ...^RRIR^T ^T^?n. 30:12 RRlf ... RIIR "^WF«TI. 30: 12 RRR ...^ ^M?«TI. 30:14 Rt ... R|Rr R5TT. 28:16 ?T ... RIR^T %3^I2:32 ■RRRIRR ...t R5TT. 52:7 %RR, ...1RRTI 1W. 53:1

The text on this page is estimated to be only 2.33% accurate

TtM 10:18-11:15 1342 ndT ^n i?" if, InsM*) #1 ~m% cppn t: ark ^t% -^er wra % -q^ #( ^ V^HWim! 19:4 rsi ■splint: '%^ 'R ?R ^Ti^ft^ TR Tf "^ #rfl"% ■g^9f^R; % "cf 3^ #qf Tf *ft ^qsrf WTT ^# 3?k ^$ % ■Ef®^i^^R^r#l 15owlT* -qfc qr^cR^sin

The text on this page is estimated to be only 3.42% accurate

1343 TtM 11:16-12:1 "!?Tfo oFT %*H ef^ Wt 18dt g^ ^T 2#Plf % T%l ^-H&i) ^IWld T#t| ^ ^ % oFFfS 263fh:"^f'dTW-H^^iiJ,

The text on this page is estimated to be only 1.21% accurate

TtM 12:2-13:7 1344 Tf 3H 4,<=P %"%T^q'ci ft" ^ 1 1 "^f ^cPR WT V^ ^FT IT ^R 3F1 i} ^g? ^TFTT tl *dt f^FT ^n% 3Tgjr? % 3FTOJT ^' ^ d-H^b TO &dHI ft^=(l-Ht^TI% 3FTOR ^ft^|o(|U|l ^fEnTT['Tf ^ 3TOf ^f # 3T5SI ft ^ ^ -$n3 ~S$\ #^T I !%itT ?r^ '^ 'qi tm TRsrf % Tnat ?itfrt ^ "#1 19f^ft ^ 3^ 3?Ft ^?n tra #1 ^T Ir^f, ^i^ # ttt^t % wrsr -qr "sif ^r ^Pf? ?nT5f ^f f^MT 5: "5t^ "^ ^fT 5 ^?TT ^=T1 ^TT ^FT tl yld^H^ffim"* 20"^i^7?i'dt^'dn?Pi¥R3T t^^^iWH ^TT,^^? 13tMtcTt'3^ q^ obi ^1 ^rffe -Jfe ■#V M

The text on this page is estimated to be only 1.28% accurate

1345 TtM 13:8-14:15 ltT^ft't,"^t'^ER'R'-HRMIdl't, "g^ SR^TIlsfl cpt T$ Wt "ratTT -5FR1 ^T%^, 4r ^ 3FTR 3?Ft eft tl T? TWt'St, ^WRlWTl'§,^t}^t"5JTfYl7'^ #1 H^'-HR^HMlli^^fS cH^H^Iclll ^ftt #^^^'3Tdq;"R?fWTli,^t-tH ^7^ ^ eft TO ^H ^¥R1 :ETT%^I ^Tffe TOR^TT "R ^^raRit^M?! 4af^Ttc?a^'EiT'%'5TO'cR'^r wjtr ^m ^r fm h ^ran 3MRkn ^i ^r o#fEnT ...TT3 (H'IrH 20:13-15,17

The text on this page is estimated to be only 1.73% accurate

TtM 14:16-15:16 1346 SRcTfR ^#'^1 Till -dtfT 3FFt ^^R^^R^TT W\ -qfen oRffsp tr% ^ ^f ^=p % -f%ir *ft 3^ ■RFT^I 16Hr^Tr^i%lT3?5E5l|^^HlA|Tra sRT^I 173prffe qrfocR l^TTSTsITIT^Hl-'qfal 3Tl?tn'^'3Fa3TFF5'll 18#tRT)W'^1^cm'^T cfRcUit, 4-H-t) m^oHSFRTTIrnt 3TR^^ 1955#ht, ^=t ^raf t[ wf ^r "?iifci cpr «™t I ferattl 20#^T% fa*) Mi^oK %opiJT optiw 3?r *n^ cFf wi % wl 'qr ^ ^l 2MFf "=#' ^HT!^3t,?TTM":#''cfFfl3T^Tt STRUTS *ft 223FFt fe^ra opT M^oR 3TR 3FFt «fa it a^cpt^ n^Twl 23feFg^fe^lf"^^g ^Ftl3Ifnt,#ra%131^'%'5rirI'51W 3TI7S|FI"RSff S!lkril t,^ "=#'?l'fR'^I3W^3TTWl"?t'gFa":T'^l ^T? T^WTT^^lff ^t ^^>I^T%1%lT"^f iqmi% TJT8T % "S^raft 31 lf?H olsldO it, ^> '5RT3 cPTl ^W\ Tf^J % tr% ^ qf TSPT -opt -g^ra "=# "fsFT^TT "^™3wi)H fo-iWfrci3w*HH Pb-4it,^r^ an-qfiti"* % ci? ^m ^ T\mS *f ^ #nsft ^pft, ?3 ftrsn ^ % 1%^ «ft ^nfe ^ sjr^t 3tr *hi Tii^f t} frq?rai I, m ^^ 3^n siri wi i 53?R TFT^ STR^T 3TR s|3l3 ^Pl #3 M^oR rFi ^T5R ^ 1°P cFt #T TJ37 s?FR % TH?1 :%1 1R% % ^R offf TT%rrt % f%li opffl ^ rm #nf op> ^?n?n i % ^ "3^^ ^r^ opt % TTR^SR H^oRRflf f TR% TRTsff oTftf^TUT LRij^oR % ofER opt^S-oPT^-oPfT^ qffeff'cpT +)o|obRT^-MKRdlH % "fM T?q ops fomf % -sTR Tf TIFF TIFF %3T 1 1 4*H '•KHWcpT^targjIf y^ ftdlt, d+)c)) ohl ^

The text on this page is estimated to be only 1.46% accurate

1347 TtM 15:17-16:11 zn^ra % -^q if -^iti ^ ^nfe ">r w$i tr%=r 17# TR% ^5J if TT^ o!#p % "^q if tR^^; d^T =lldT opt opg^ oPT •HK'H «sldl f W H^ ^ "tr qffMoPt m^c\{ -aft 3tm *[h^ oft Ti^n 3TR 3^ja ofiirff oft Tift) 3?R TRT^R oft 3TFRT %w^3,^mTwfspqii#*re^*n^lspT ^R*H%wf3TRTRT)w%y^WK%^q^T obi c|->|H HH" Millob'MII 20^K HHTf^TCRW 3?fWM Tl%'^T^FT^cW^ff^FraT,'fflfcW^f1cF#^R ^qJW^^fe1T!:i%RFl^^r#l 21fi-^i VlhW °bgdl I: '13R> ^3R# ^R Tf HgT olclI'MI 'K)l t, a?k I^hP yni d=b n^l'i, ^TF#fi" 3?WW 32:15 %*r ^ fta w\ w\ #5rt 22ift ^ oRjfe ^ gft W 3Tl3 i «JR «JR ftop^Tttl «TE(T t 3TR ^p sRTJf 3 TJ c[r|i ir^m ^IWcIT 7WT #, 24#^twra^T>»ii*|ii^tafnwoPT?ii'f gi# cF?R t^ -^5 fcr -g^ oft 3TFF5 #^ % -^R ^ 3wnt%'^f'^t^pn% Rdy. -h^) d^ifl ^

The text on this page is estimated to be only 1.25% accurate

TtM 16:12-27 1348 H*W«bl1 ^> O Cs ^> Cs % c[R ■^ % #p) |Hrr «tr T?r afa s& % ■j^3wr^T^ti 20^ife ■^ #a ■qr^r Titer # wh ^ ■g'^iT 3TRJI5?fl 21FRTT TTTsft ^frpfcrf cfajfspjS 3TTT ^T ^tTnsft etfera, wR-asn -hII^-h ctf 3ttt t) 23^T 3TTT TFT^t ob «fsj -ERrnro cjn c[R TM% WKT T%l 3FTTRI"]* lkh. w ^ t#tt 2%R^T#cri^^-gR?iTi:^Rf% 3TOTR~m\ ^TTJ *T#? % TT%1 % #W ■H-HRNK^T^R dM^l^r)l?'3T-r% 3TRTTR-cTJ%TKS'^RT^"R'TR8f f3Tlsnl 2

The text on this page is estimated to be only 1.14% accurate

1349 l"5^ftf^f II^R. ^R)t%ariRS% Rial x^ -5(3 3TTTR M^ilMC^ 3w4l s^h-hk 41y *r1s ^n ■stirrr ~*h^ % 1%?; rr 23FTR3!RiflRJR 4J 11% t[ qfe Pb3"T^,fo-t( 4<4^cKR qfe

fT trr) wm R RatfciRRRT rr) rk rroi *ir r RRifi-MHWlill S%%TR, rr RK cFRR t%>R afk RST TTof; #Itl 11^:*3Rrq;%RR^%Rr>TfR'qRR?ni| McT^R^ RFR)"fRltl 1:R*^R^Rflt t% cR if r rM r^ti i, "if r?rr^i #" cTt rM ■^w?n t, "^f 3to#h ^n 1 1 " f^ft ^n ^ra I, "^w wm r^i I" ?rt rM r^wr t, 'r? r*% r?t il" 1:rr r#? fs w i? r?r r ?r^ #r 9FR ■cr -qff ^37 am -^n -^ ^ft an? ^% t%?i % RR'^^4id^l^R#'t%T^FtTl^TI3Tr^tTi^T Tpn an? l14tt ^t ^ra t, rt "g^ '^ir Rff t% r^ t%# ^rt 3lk ^t ■^ sjL|fd4-Hi i^n ■?tl) 17^Tffe R^R ^ ■sjLlid-S-HI ^% &M, H^f, ■^ira ^Fft % t%# cra-"Rfra % fiRT pHK ■^n ■g^nr ^tir % 1%^ ^n an ?rn% r#> ^n 5fR ^f ll-STaf-^^n^TRI TRR^T^?Ti%ll 197n^fif%3Tf: "^TJR^f % ?TR ^ if R^S ^7T f^ll; ^^11^/^ 29:14 2(Wf f ?riR "5qi%? ^#f f "RgR? 3tk "^t ~m cjrt Rrfm Rff TRJ5 t%^T? 21"|RtfrI^

The text on this page is estimated to be only 1.64% accurate

lfft£«Rf 1:22-2:14 1350 LRJ^cK opt ^ff -q^ETR WW ^ 1R ^H^l ^pf Tianspfaffi J^m Tfi] -g^iT ■oPT^ ll 22T?^t #T fTt ^%opk4u[ w&3 'opt ~m ■opt^ I arh: -tr ^t foT^p-spt#3TRll 23t^lR?ftW9p*TO,oT3T^ ^ *rctte ■opi it ^q^T ^ ll tjop %fi ^q^T # q#qf% &i) ftd^^n^nnit ark'TT q#qf'op id*) Hdwnl 24fop=d ^% &i) &-g«irnfirPn tr% i ^t ■qr%oK -5p) T?Tft? i, afk -qr^r -spr fi^p fi 25sprffe -qr^oTT op) ^an^rfwr '*R§b' 4^^o« oft ^anspfara ^fen' wq ^ Tjjfo ^ 2(% m^qt, 3w ?ri%op #^r fop ^m ■qr^oTT ^ d^' ejdWI an^wf^'STI^^^r-Hi-HlRoP op sn?RT -5T0 f^n^Tp>-^f^Sn?RT-Spf-5^3tf^?tc=A||te4|oP

The text on this page is estimated to be only 1.80% accurate

1351 l^ftfcrif 2:15-3:23 ^s% 1%q; 3 snsf Pft\ wi ftft I, ^ ~&% wm ^qffqicn ■sprffe 3 3?i?rt % 3nsnr qr ft qr^t ^n WSfoPSmt: 16 "^q%TR^fi4H^HI?

The text on this page is estimated to be only 1.92% accurate

l^ftfcrif 4:1-5:4 1352 4ir} =n^R'"ra# ^riw ^tw ^raiTRRR "Erri%% % m rr Rnti % R*ra 1 1 rrjrt ^frf 3?k ^-t-WIRRRrail 2RKRRlRif^ tw* rn t, ^ nr ^? ^ifer r) I % ^ fe^ra %Rifi ^ iter ?rf=ra nllR>nR§fi|rafR 0 ^11 H^wif <=bl RR R=T R=^i|l1cf^^R^RJTR*^SR^iRRTl'Srg W^i TTO? ^3n fi oif pq t( feiti Rn fe tjcr^cii-h ■gnR7TtR-q5[-||^TR%-cf-^ ^N^uH'-^-s^ d^'ilKRdlil'lll &H+IRRlT'^lf,lT ^rllW-MI 18sfS ^ 3israR r' "?T ^sfR: w 3§ f ^r aMT^^H^TR^^STRtltRin 193TR3^fe 41^ TR 3TfS^T"fe^T3?h: ■5PR^ 3nRTRia?T'^Tt? *

The text on this page is estimated to be only 1.05% accurate

1353 l^ftfcrif 5:5-6:13 rr ^ Rra ~^k ^3 ^tWj % "rwr' 'Rft 3TirRT afk ^TJW opt ^R% RTRRof Tqpra T^pqra opt ttss ^PT ^T?TR% M v\lH ^Pt #1 R-41 ^il^ll dlPb 5^% ^PtsTt^TTRft'ST^t, "sfclTTTTaifa; 3n^%^^fe^ SFTkiR °M^il" 7y/IHy*Hk^tf % 'rtr % "^t t( -5#r ^st fen Trail g$Mfc\A 3?i3ft ?r strrt ipaf -era ^tt| 3^ ^n 7} Tjjp ttttr T^jftr cpt 0\il % "R?f srf^p iwi 3Ttr tt^t ^ grfj fen 751% cpt ft^t ^ rriri 93TRR fe^t TT5T 3 RT> %^l SIJ % 7TT8}t % TJjai ■^"fn?T'ft^'cR 4

The text on this page is estimated to be only 1.48% accurate

lfft£«Rf 6:14-7:17 1354 % &4 H£7t'^N7'R'H'^'^i'%firi^-tl arfr;-^ W$ tfi ¥t 4 H-41ftd ■RWf f^T ^f^7 SFRt Tift? 3 H^f *1Hd % cF5T^ ?Tfk w4 4Wj H-Hlg ^ ^ I? 3FlsHI$HMlli4? 16rH^-4Wt^#'l arSM-spHcR 3mt^-a^^wMTt,^pft 3Ti?tn^f"q^RnT^ ^ 3fl?RlcF?Tn 3H4HI HgTt 20sPTtfe 4 =W 3TrFTft^ra?nt I T^Tt~feriM3 fi-Hl jh-h)^1

The text on this page is estimated to be only 0.80% accurate

1355 l"^ftf^Rf 7:18-40 ■grn 'g?TM w, wt ^rft ^ wrt w an ?rt ^ ^JT^MdWI W^ifclf RlHI \n\h\m

The text on this page is estimated to be only 1.49% accurate

l"^ftf^Rf 8:1-9:12 1356 ^|ST^cPI#SR 83M^Tf'qT,E^T|^^%i^PT 3: FT ■^^siFT^f , 'FITPTt *RtF' "W? ril'if t^ ^n1^

The text on this page is estimated to be only 0.87% accurate

1357 lfftfspff 9:13-10:10 ?TjfcF^^RT%%WHRMK%wf3'cFfi«irai^ SM^'l 13*NH H£7^Hd^^#rl'Rf5T'R''cTnR fRzrfRcT ~$R T} ^t =Ft ^T ~^st t , ^t % "Erf ^f % =Pt£ ■gfT'^^t W^#"Sfafl Pi-H=til ^"n^ii it? t) ^ Tf tr ^thi # ^ -h^iii ^5SI t} ^PTdl f eft ^f ^fcFl -cp^ -qj^ %JT f, fcTFtT ^Tft 3W4I 3^>l 3 HgT slirob Pb^l P^ldi % T^JTT cf>Tl ^M^^W^MK^'g^'EF^fsHl =bl| JHcr-M f^'gt^T) cpT?l rUfe -H-HRWK %'^EtJT Tf # ■&& -qfi ^7T "^TT 3#^R "I, "R ^°bl "TO 19^lft "R feft *ft "sqfe % ^8}R Tf "=#'#, fcFT TO ~ZW& $m ^Rl, rllfe 'R Iffejf opt ^fa TT=%I "RWTfl'qf ^1?#^ i=MI'fsF?3'5qsiT8n%'fsrcTR % 3}sfTRf cFT^TOl 21'RTO"^RT"3TiYfi *ft^Rl % 318ftR f I -31% ^R ^TT ^5TC«n % foTSJH ■=Ft ^#' o o cs 1c# ^R IT f=PT?t % *iTrT 'STR1 cnfe fT Tl^RST ^IFT t}^R5F[^5R'5RTl#l 23^Tr5TO®*f -H-HRMK % "R# ^FTdl f ^1% ^TO ^T=rf t[ ^RTl *ft =W 245Tn 'dR #T ^ "RfT ^ % ^ % "R5H "R' %^c?tTmtcira^t%^3TT^iTlcp#T^'cpr #%raf|TT^^fti:oT7^HR?Tft'#'ft! 25fcTTRt ^ yld-4lPidi t( -y?^? yid^'il ^t fr wm ~^\ 3HrRWl ■=FT;TT ^T tl ^ "^ HI^IRH WFM ~$ aifcHRit g^s cjrr 'qA % 1^ ^f ■cPTft tl 26?Tf ■y=FR ^R ^Tt ^Tfe % TIRH %dl f ~fcn% T4FTR "q^rta^tlTffoTTTi^ H^'RKdll27aTiTO^R'#' 3W^"mk'=pr'cp3tT 3^?TRRTfcW=PT,^3^ 'ora'R'oh'l.dl'f I dll* cb^TiklR'ifNN f°h

The text on this page is estimated to be only 1.93% accurate

lfft£«Rf 10:11-11:3 1358 ^% #ra "F?n w fe fRi^; 1%q;#R'qT ^rft "^rr 3RT ^TO |3TT t, ^dl=Hl T%l 12^t firP> ^ m "=#', ^fir^ j|KS 3TlrRT3ff%i%^'EI3T^tl 3Tk:RH^'^^dl"fe'gEI^IrH|3ff%-HI^K^fn 21cR JP| % oRHft 3TR- ^IrHISTf % ^Ffjft 3 ^ "0^7 WI "=# ''ft ^7?l I cR SR % 9^R ^t "sfNft fe«IH£7^i|-H, "q? ^?n tt;: ^ecttt ^fFn ^e^m I" ^ #ra^ ■^tt^ ^r ^ra ^arri 29q ^^ 3f?w=t tfim t nt %T 3T8f ■d'?R" 3T^lf=T^ R#f di^t* ^f ^ oqjw % 3F?W=T^tl y, ^p> :ETTft^l 4 ^7^ ^m\ 11 TRflW^T 3HH-H

The text on this page is estimated to be only 0.82% accurate

1359 lfftl^f 11:4-31 %r %fi y?q ^ Hr 337 ^n: sttafat -^run t ^ ■qr^r ^ 3Ttr ^^idil,^ ttt^t ^t smn ^TcTT'l^tSFRTilR'll ^ ¥T %5ft ~P$\ ^ f^tl %^%W?f=TT^T#t^T^:raTTi'qT^T'^3TtT 3WHiftu£fe°iiR'!-iii|l 6aiR ^^y?q^:P^F5ri|3Tk^ ^■q^q^^l 12^rffe^'q?q^^3TFft,'^'5t ^"^■q^q^^^Ri^nl f^Fd^ % yi^R #Ef t[ yRSTTO^'TO^^^Tt^y^Sty'Efn'^^ ^R?l "jft eft jJRif ^ WT ^lf 3TFt -^3 -^n: 3^ # ^ I ^M ^7^t -^q OS ° 1^ fq3Tt cT*ft 'R^ :^K ^7T^ % 1%^ T^Fl ^Tftl" 26^rf% #i?Rt ^r *ft ^t "^t ft^t ^ wl ¥t afk ^TTrfT, 'dR Sty ^ '■Jfg ^1 ■qETR ^T^ "fl" I 273W: ^?r -^if ^ ay ^ fi^t ^t sty % "^ ^r 3Hftd

The text on this page is estimated to be only 1.03% accurate

l^ftfcrif 11:32-12:26 1360 325rgfR' ^j'diRw "K-l ^ fob fop ^ ?1R faeFlf 0 cR rp% TTpft ^s -q$q\ opt 3Ttr ^ ^iobwi ^rra an, t %! 6opPT-'opM'# wt ^ ^n^ M ? "fop^j wft % ^Nf ^ra 'opr! opt ■^T^-^n-^-qrit^T^T^'fttl 7wt1op#t( 3Tlrf[Tfen";Tfeft"^Tf 31^52 ffaTf^ttR'^op ^>t*i?nf %1^?fcntl 8fop# ■opt anpRi % ?rt ^ttTTfeft cpr^CT3Tl?qi SRI Roi| ?1H%53fER ^■^fnl 93TRi^n^^3n?RT'5rnft^=(i-H ^pt ^rh i^n tit I ?rr fen ^r ^ftt ^ptr ^ft §totq; ^ft 3tt?rt % irn ^ Tit tl 103tr Hp# 3i^'sn%^3n^rf"?T%^f'^iFftt^r"fen ^R opt TTT^T opt 3TR ^ %TR ^PT W[s4 1tTT "n3TT%l 3|r feft °b1 faeil t 9^ft^t3TTrRT3Tf% 3m ■5P> WEfH^ cp) ^n% I feft 'SPt 3^FT-3^FT ■5ff1 o^lte^l ^R% ^TcPl 3T«f PiobM^I opl "?rt% I n"fe^ ^W cT^ "0^7 3?Trin I «ft I^Rf-i^RI MilobWltl TR%^% 124£i 3H3 ^IT y,°b °P1 VR'l'l 5Tt"^°P'?,xR'3?Ff 3FT3T^f| 3TR:!raft3TITf% 3^5PTf^|IT^ fR W% Tl # , "Efll ^TT ''re^t , ^5?5P T% iff II '?5FF5f I T^Tt^5"% W*ra 3TT «IH ^il^% RdM, ^-H -Hsl obi TT5P# 3HlcHI 5R1 smld+^l R-41 JWI 3TR ^l-H pH^ op) $H Wi °hl U,°b # SIlrRT'SRR'oTil "ipftl 143M^#, HHo| ?Rk fob^l W,otA||^-HlobKU| '^'oW?Rh:'opl"=#T^lll 173Ti%T^ 3fe#'RRl ?Rk itai cTt '§^1 'opff ^ ^^rai? ?jfc 'opH ■ft wn ?rr fm ~3i #n 'opff ^ «nfnl 18fop^i oik^oi -cf Mi^oR -^^m dloh •HH^I,fT3RT'5pf"?RkTf'akl fl^IFffetll 19^r:^ft?RR'op'?IR 3RT^op^?I ^

The text on this page is estimated to be only 0.75% accurate

1361 lfftfspff 12:27-14:5 3F1 ^1 *[R slfdl I ?Tt" ~3wfi\ y-H^dl Tf ^ 3F1 27l*t wit ?r ^mt #n *rc% ^n Trftr # afk 3^F1-3^F1 ^q *f ^1% 3Tq #| 28^?H1 # "Rff w^\, fqn: "#tt ^rr^ ^ Triw ^ wf> °4Rm1 ^, f^n f, %* 3fm| ^tt^ w^\ ^t 3rk fqn: ^=t ww % ^ ^i^4

The text on this page is estimated to be only 1.02% accurate

l^ftf^Rf 14:6-27 1362 ^sf rloF % cT^ 1^ ^ cfTtf T^PT ^# rpm: ^pbr irtTi? *3# SPPTC %*ft ^ cpt «IM Tf ^ l oWllob T$ t( cR ■#" ^T '5^T *f ■^ItH^ °ll

The text on this page is estimated to be only 1.07% accurate

1363 lfffi^Rf 14:28-15:15 «firRi ^rfw^-^Rt-^Rt, v^-v^ ^t%i art? *?t 28i|R c^ot(|tei(| cp^ o(MI obl^-Rit^N"!^ =(lt *mt o^lM TfifctTfl 34fe|Rt opt 'RlftR % ^ WR13Tf Tf ^q Tf R^flfe d-^ sikrlRoptdldHfcl dittl =(R^> ^•Hlfop'SRolSSn 35^rf5 ^ ^ t^trri "Eriwcft I' ■at ^#' ■er: rt 3^-3^ ■qi?t ^ ■qs^T ^Enip ^rffe w ^t % Hir r? "STfaT "Rif ^ai % ^? wn t[ -^i 36^n 4

The text on this page is estimated to be only 1.41% accurate

l^ftfcrif 15:16-42 1364 1^1% cpYfo*^jfPl?l H^'fi-MMWlt,"^^ ?fiiti fe^ra itf^rsfe i artr tfT} 3#^3Wt ll jaff^f^ RkHKII'wtl =11 *£ jatfcfft'tRlf cPT ■qw^TT^tl 21^rffe ^^ "q^ wq % 'grn ^ 3TFTt ?Tt T3=P Wl % 3JT1 ft Tjg 3 4H-41ftd it ^3^T^3?MI 22^Tffe"3fe^lt^3Kq% 7=pqf % ^PIT"! ^ %gt % %r TJ5 3TFft, ^ it *rc% %'gjnTWoprltpT ^PwiddWMi^n 23f^g IT TT5P opt ^3T!% 3^ oRlf % 3T5FR TJsIT} iq# *ratw cpt, ^ ■q^^T ^pt - 71TC5T ^Pldl t, TJJJ ^"'&pr'3T1%3rafa'opT 1=7(1 "wtl^tfsTC^"^ ^®" ^pt ^n% w[f % arsfft Hpn f, =i? t*r oR l^n W 1, cTT "q^T tTop fop TSPT ^ eft "$ '3*T 4^^oK%3T8f^ot,< R-HMI^IlpK^W^Wt T|T%%3TSfft'5R fejTtnfoPirlopTftTT TTt'dTl Pi-lfi sC-lid4rHI firM i, ^ oRI op^l ^ ttt |^ ^P*tt 4H4ffo|d ift it ^H < M^oH^MI^dl 1, '5TTn T^t ^ ^dl 11 TT #^ 'opt '°T! ^TIoPT 3W:n?TftT'??H'oPTdltl 39TWt;3tlfoM'aTM:% ?TftTT^^H^'^d|TRSTf'oPI^l(l

The text on this page is estimated to be only 1.39% accurate

i#?TFl'3F ofiWI f^ 8T^ft'^":rTlf7":rM'?,^I? -flFct^ °hl"4l M 4-wlftd fi-MI 'Wit, ^lld^llrll Fl 44l^f ^JFTT cfJT £TT?ft t[ "^fRPd" TRI t, ^ yi^idN'%TF[R3FT R°M 4*>N ^wil-M Fl 49*TM-t) FH <4-H"fogtt}

The text on this page is estimated to be only 3.91% accurate

l^ftfcrif 16:13-24 1366 ^ff sft % o|f 3T^ gcjtf ■qra 3TOTI # 3T^R Wl ■#^3n^iii)j|ii T%q%T^o[ft^i#cT 4

The text on this page is estimated to be only 0.77% accurate

1367 2^ftP«rcf Ilk^ck ^"^5t^trt)w^j% 3Rd qftejq ^ft 3TtT ^ ^% 3T^J|f aft? ?nirt "ft^ | %R^^^JTRT)W^T 4 gH -*iHc)i|fe^ ^■dWTRFlill «n} t[ ^trt ^ ■%% j$m\ ~$ "^Rt ^ sff i wi ■ft, 'Fnft w=t ?Tfe ^ft ^fai 3 or^T arte? %r % c#t c^ "ipf ^ I T?l cT37 % FR *fft tT3? ^ ~^\$ ^ft widi an ^ fr' ^-cfis "fen ^n ^^tt f TrfeFR sra^ snq-qr arh: arfsra; 9qftai"=Tw ^FT ^f TTT^T ^ ^FTteT ^ ^t ^ Jtr oFt «ft fe^fen^dlill 10FR'3*? H4HTf "EFT FRlfl 3TtT^ SRt^K ^ ^Fl td fer 12^fW^T^tfe'FT^n? slid -HILhTR^^W T&kI t fe 'FT^ "^f WW % 'fflai-aTk ^l-H=F< ^T #nf % 'fflai 4

The text on this page is estimated to be only 0.86% accurate

2^ftfcrif 1:19-3:1 1368 3riT't^,'SHTT'fen's,'3w"in" ark 'rt" #fed^i} yld^rrRTiifcnl^feRi RlF^'t,cR$'bl"*1HR37t'l ^U^Td^^tSWT^T 5l*-d qft Pb-Hl R ^ ohll^:^ 4J-M R 1 1 ■d>^ r^ ■# Riff, ^fiN? feft r feft rhi r' tr ~m ^t f^ftt'fe'giT d-Hi yid 3Tq^-giT'^^ft3Tri **!¥ ^ dii'q?"%3^'% Id^l ldr^ swi f^n? (-Hi^

The text on this page is estimated to be only 1.10% accurate

1369 2-^ft^qf 3:2-4:8 cp^ fi?#^i tw£\ mR^-^^^ smwsm f? ^IT fe 'J® -^F] ~^Hst f I f^EW# Rgf 2FTTC1 #t ^tr?I I afk to5! 1 33?h: gjq ^ft #^n # qRuiwil^^F^Tf^Rf'sri^^^sfteqi^cK HgTs|lr°b'*RST%$ ^ 3TTO1 ^?1 TJaT 'qsi ^TTrTT f #" ■qs# ^Mf % TR 'qT ^W 'TO TTfT ■#) TfTTT tl 16f^Fd ^ra f^rt ^i f^r -g^j-^ft 3TTT ^g??n I # ■^■q^f-^Zllc^tl^lldltl 17^#l #WR^^ft 3TtT 'R"#ra'^TTflt,'^3TlrRltl afk^'R^I'^ 3Tl?Rlt, ■# *icbKI ill 18¥fFT^ 3T^R^ ^ ■% ~$W WT t( ■g'JJ % ffa ^1 ^M STH ^?T^ I ^Tt'FT ^ ^ ft -fH Wl^ I 3?k ■FTlTt'd^ Wd WSTl 1 1 ^Tpft 3T1?R1 # I T$i\ % 9#f Tf 31Sqi?*T ^T ER jf I, ^MfM Wl "RTW1 Rff -£&\ ^tR^t ^^iNUiTTca-^f-^r-^i^nll^cf^qsTff ■5R?t alk ^T ft 'FT 4

The text on this page is estimated to be only 2.45% accurate

2-ff 4 wi?ft ^

The text on this page is estimated to be only 2.90% accurate

1371 2fftfc*qf 5:18-7:1 TTTw T' fera f "fen f, 3T ozrsf tt ^HT 3t| '^dfid^ilTT'dftTT'^, 3rkT^gR%1cH 2RT7W 49:8 ^gtl"$ % fan

The text on this page is estimated to be only 1.18% accurate

2-^fT^Rf 7:2-8:7 1372 ark sfldrt^mt ■ep^I 73?h: ^ fe cr wr ^id t( t^ fe^ra t[, ofpftTf, ^iHTf, 3H^ ycpR ^

The text on this page is estimated to be only 0.90% accurate

1373 2^ft^«PTf 8:8-9:5 ^rararaT % tr t[ ^cfi^ -foq; ^ ifarn t , ^ ita ctf ws-raqqfTf ark'^^ 31^^-^ -^cr |i arh: 3ra^g^#ra^Ff^rr3#>T'ra^rat, Traill 23^ era? 1?™ ^t Ufa ■§, ?rt ^w g1^: #et WWdl^rarTq:^n^T?^3|h:^TSl^Tai^FT^!R oiwi i^itl aftT^i^Td* ^R^sjarf *i y^H'l,'^ ?Tt* -^ -^f -^ -cf -sqef %g tt #1 aftr "^rjf^ra ^ % -?R -^n: Twt, ^n % ■% ffiwn airaiti 'NwT ^^iw *1| ^feln-Mi °m\ ift Tjty gi^ rr 3Ti%m ark ^ w Rff-qrarn nt ^TT^TJ. ft^=H-H% °bKU| &^ giR ^1} yid ^irai I, (rll^d#tl (afk'dTT'd>3Tk ^ 3Tfe?

The text on this page is estimated to be only 2.72% accurate

2^ftfcrif 9:6-10:13 1374 ^■cEJNofob d-MK i^MI^TfoP^IR'opTraTRT wtrt ipft feft ^g % "^ t' i ^4KJ||| 7IT it ^ f%dn ^tr tt t' tri il oRf^p ttt^ OTi-'^TTTit'JR'oPTTTTii 83ftr qrT?ojTff'op ap^opt T^fopMl 12^R'5ptfT 4fe ^I^TT ^oH qf£|5| #nf opt 3HioivR HgT fop^^Tf'dcfK #5i i\3,j\ 4^\ fe^ra%-^woMt iwidT "fegR ■opr ^gtr ^ ^ra ^ra si^ri 4at fop ^fo^nT^'^^3^#"ff%foT^f^Ht?tnl ^#51^tfoPliTTToPTR?Kt^toH^ttl 3sPTffoP ^Hfq 'FT «ft W TRTT t( # T^ I foP^d IT TRTTt #rffopt-dT¥ RFfrff^'tl 1owl'fob &H ^1-bJI'TIT ^4 dSd f, 'ot •HWlRop Tff f, '#5p #Tlh#op 3TISTlffT^fTTFT'op## "feni ^^Topf^Trrf^TdRlfllTaTqTTT P+wi ^#nfop arqr'q^f'op'srnnii T^rrtd'oPTT ^%-p;Ti^f^f| i^foTTTfsPTf'oPI-oPlRTl, '%R % T^ T?1 TTtt TToPT 3TV 'RTToFR II^ 1 1 foP=TjTn^fKoT|#r, altT'oIMt 3T#Rfl" "foP^J ^Top^^ odod oi|fdv -opt 4H^ -rlHMlBilfop-d'HT ■^R T TI^ H3; ~^( IT 3T^R Tf^f -cf -^g foT'a^ 6 # ^TR' 3TTT TRflT #=T TI^ I?; IT ^TT 'OPT ■oPTJt I 3 HT' obl| 3FdT Rlf II 12lR^T^5#nf'opTiai arqrt'drRi'oPTT'opi TfHT Rlf ■oPT^ ^Tt 3TTT 3TFR7T cf^ Hgromuf TTR^ "I I f^xT ^M "^ 3R^ "^t TO "^ "^ ~W& t afkTTTTT 3TqTt'd?RI-oPT^I'dt'ot^I^TBl fop-otRlf^lR^fop^feRTRgll 13#Ttlf,IT ^fer Ttnaff t ^ht ^s ^ ■opt -^id Rif w^\, sli^ob 4

The text on this page is estimated to be only 3.27% accurate

1375 2-f 3Tqft'°W:ft¥Pie ^^^,3ftF^^'d/Ff gT TIFT ^nft F 3TTO gdcbft % #RT fti&T ^ft d^ JJFI lob'HI?, 'STTftlfta loWA ftttftdi| IVd 3

The text on this page is estimated to be only 0.90% accurate

2^ft^qf 11:22-12:13 1376 ST35TT % TTT«T =(«[ TIT if , jRWI T-'dTR ■^\il -*1Er cT^ "=# 'cTra 1 1 ■rm aftr "^im twt f l w\-. ^ ^Pd^^tHgl'fHd qraril ftni*44i'%^5^f fordTTfTifl 283TTT are arh: arfej-^rT^f?^ m TWl *^%^Rf3TrT 3*T% <41 ^H'ttj; ^'■^T^'flTf'nl ^TRTTfTf feld V^ "^"STirf) ^t ^iHdl f #T^^te5 TTM Tffer ^ % t%t ^ftar Tot1? t[ 3BT fen "n^n stti 33ttt ^ ^^FraT f % -^ ^rfe o(jr (t[ Tiff T^rai, ■^TT 'qTR^T ¥l ^^TRdT I) "f^TT ?Tfk % ^TT "^TTTT T#?T 'Midi* ^f ~531 "frPTT ^FTT ^TTl 3TTT ^TTR 3Tf=REFTk ?T^ TTR "T%% %F> tft 3FWT% WI ■^T^Tffll ¥t,^TFFT'cR^3T8HRH*^lli*-^ T^T aTTRTT!:, ^4Hl ^r *ft ^f tri ■rwT A ■sprfe ?r ^f ^^ -^w jm "fl^TT I "f^RT ?TJ% ^R "^ ^EndT t 'dfe ^tf ^ ^■Hl ^T TJSFR -Sfft ^TfRT "## 1 1 ^lS-HidWt,^l$*l|^R^K^T ^|^4*Rri3dR fe^frR'tTT fob'Hl y

The text on this page is estimated to be only 1.43% accurate

1377 2^f^«Rf 12:14-13:14 1'^4^l}4W3TT^R^3TRR?trRfiRRRRR f I tR A RR RT "iRRTt RTW RJT Rl^T RlfT RRm I R?T Rrt str^ Ridr fen% irf^ RJtf rrr rtt^ r^ 3H|o|V-Mohdl R?t' FRl Rfr3? 3RT^ R^gf % ^ RTdT-l4d|cb)F«Hd cMHl^dltl 15-Ji^fd*i)(l RTdF^RTR^R^FR^R &u,y-Hddi%RiR SHli)RR?T21Rl^ d^' 3TTRI ■=IMI°bl^ MWHI Ri«4ll 17=WI &H ^TfopT'^g^R im »lf stei fen? r#' rrt ft ^ft fafcobMi STlrRl^ HgT^FT RTR^ 3TTR1 RST W 7% 1 1 1R5RJ FT Rt 4viMl rrt^ % t%ij; ll 20RRffR? R^ RR t 1% R5ff ^IR R RJ^t} RTR 3TTS Tit tp% rrt r rts , rrt rtri rtftt f ark rr r| R^^RRTartRRiR^RTRiRiFl'iFt'l 'g^'^'l t% R>f} ^ET R^ opff 3TFRT) ^Flf, "^TT, sFtSjqof R^T-RRT, °A|Rt7J|d R5RR, 3TRRTR, RJTRT-R5RT, t^m 3?V 3tsr5rrtr1r^i 21r^^t-|1r7rr Rl>M dR^ fH+v

The text on this page is estimated to be only 0.48% accurate

1378 MllcWf 1t%F? sft 3TtT ^,^t TJo?7 3CTTTT I, #W^ TJo?7 ^Fdfsnt afk^T fe-Hl i?op hh^i gm fen wi, 4lui •H-wl^ ^'■^faff'ci^fq^^PicriiRiii an, "fen 23Tk ^ 'fflar ^f mf f , "^=T ira =Wt 3{lT ^ 'Mlid-41* $R°ft ob^R4-MI3Tf-%^FT: %Rl} TTTR %I tTT^T 3HX JPJ %J *TC% ^ 3TtT^cFl 3?^jif 3?k?iti?ti^ii 4ft^f*n} T^qf%i^q;3^3TFf^-HHi4d*< l^-ndil*"^ 4iwf ii ^, fro^ Fl T? it 1, ^f 1^ tiiobKI fccrll -H^l fRl} 4\n\ ^ffR-^wHl

The text on this page is estimated to be only 1.52% accurate

1379 'krllRwf 1:18-2:16 18kpr #=t m\ % «n? wfl ^ "fer^ % Hut ^ ^T^T^R TjNl 3TK ^S% *na? TJ=P TRgsnf 31TTI 19f^g ^f 3 553 % *n£ ^tepsj ^pr "ste ^pt Hp# WW#P cPScTT f % # ^P® ff f^ra TWT f ^fff 'g^fl"cf"rFTtl 22kp^T q?fen % *TCTf? ^FtJHH^ °ll yRci %^q ff ^^T5Ran%'k!8TR'EPt4lK"I H^I^^|H'Hteffk;!MI'H%<=bKul d<=b dgiWMIdltl ^JH^l ffll &i) 41?J^R%'cPT'fecfra STRTTI fen f -dTkp ^T fecfra % -EPRTTT ft? ^P ^10^ ^TPf, ^T "kp ^TS^an % "k!8TR % WR %

The text on this page is estimated to be only 3.64% accurate

'MlM 2:17-3:16 1380 cpttwI ^Rfi%^RT?TR:R'dr5Pff *rt wi apff-^f itafl 17fe=r[ ^f? ir ^f ^1 *TC% Tf 3w4t ferfd % ^PKT ST4d^HMHMI£d'l,IR^feTi*tRf% ■HHH MIMl MKl «(|4f^t^oFI 3I«f oFH-qf-^ft fe ^RRflRTR'^PtsrSM^dTII fdiWSt"^!" 18R^ M-H=t)l ^f cRTR ^T ^EI^R I, ^3Tt fttd ^T it fer Tt ^R^^^^^3TW^3?#TRcPTRc(M arRnsft^R^^RTl 19°BTtfe ^^n % I^sttr % grn »4°R«rT%#rR ^f^irr ^i diPb m^or % f?TR "R feT Tt ^ 3H#TRJ^ % -^ISl ^ gfi?r XR ^dlR^ltl 20^Tt^ 3M 3nR^f-4lfad Rlt'lfe=g TR?I? gff Tf -4lftd fl TTfffl TTTtT t( 3WR feR ^ft^FT cpf ^ft TIT f , oil "5Tt fe^Tfl RT "fespT II qr^T%3^"^r%"5it%'fe^ra"qT^rgfT^^iT ^H^ ^, 3T^#1T^ 3TR^ 3TFt'^r'RT'T%IT 3TT%"^T fe?T I 21^f 4

The text on this page is estimated to be only 0.90% accurate

1381 'krlllcMf 3:17-4:13 ^H ^m\ , " a?k ^i% ^Tsrf ^ft" ^rfe %ft ^tdi ?fT slgdl obi 3TtT •H^id gldl fob-d VHW^'kob ob=H °bl \stcft ? l ttrsi ^fti f " affc ift ^r ^ft" ^ft *rc% ll) 17^3#raPT^r?i|l:5F &-H ob4o|+«n-%-fsi8JHTR;-(3oRT IfTt'f^T^'ofEH'qT H^l'ii^'lll fob-^LK^oR^ ^TTTfsranT^R% gm %t) isq^ssiigfo -option STTl °bl oi^H^^te fciii j|i|i an?ni%#w%i^Ti3;'^EH R-41 'Ftl «JT,^T'oTOR'%3n^rIoT?'oTf 7^1 oq^SSfl oft flt8TR TJop *[Srasi % T«q t|' TTO1 opt WWdl 3 #=T #n t, fofFg TTr^on; nt -q^t f i 215PT[ ^Fl ^f 3T«f f foF izmm opj foigTR MM^"^:fl ■oprffof? ^rft ^at ^oiTan cpj foigiR f&\ m\ im *fr #rff Tf^toRobTT^nr ^ 'TOdi'dt^ ^t^an^n foTSTRIft M^oR % WR SJlWobdl ■opT fe«S obR fo^oJRf % 3TT8JR TR FT -^op^r'l 2S3m^wt? fee™ yobd^^opifHr FT-i^H obdll 3TpTOIo|ob-%3I8JR-^f-tl 2641^H-Hl^^ffo|^o||4H%-oPRUl^El7wtL|

The text on this page is estimated to be only 1.27% accurate

'MM 4:14-5:7 1382 fd%T"fcMTl < H^^rtl 16#5pn*rE? 17^% ^[^sn % 1%8}R -q? ^IHT Wd" c(# dR4ft "Mil Pb-d^dobMi^ 3TEe5T "dlTt I ^ d*f? H^ ^ dfcrl'l cbidl t=||^^ f| cflfo fi^l'?Pffl I8=bl|fi-Hl^'-HTf'5?ff-*i-H i^i *?f^raciT%1?pi af| ^w oiwi ^iPui^^jferail 2%n%n aRWTffera Hr qcfe oft -RdTcF I , c|f oRJtth ^?#fR oft 3TR tott ■5RHt i ■cprffe ■sif 3^ srs^f % *na? ^ra?n yid iglil 2*fcb-t1wR"fel?li|^|^RWd-o|tl 3fk=I^^RIldcb ■qR#ajiM% 378ftR^t|3TT 3nrRIohl7lirlJ^^qg ^t%-q5r%^Wddl

The text on this page is estimated to be only 0.81% accurate

1383 'krlllcMf 5:8-6:8 ftSFTWTtl *^ft "fsFrfrT ^t g^ *R*T^^T oPT Tft t, cF?T^ ~^\F\ ^ M^oK opt 3TtT ^ ^#' 3ffqt"fl 9"«fcl *H WTk ^ W *Ffot 3^ opt wfa 3 [ Tfd" opt ^RTtl foP=a^t-bc|d-o|d|opt 3fT^ STFfqnf ^SPRR "3W^ ■Hl[sWl"*t'oT*t'!Ft ti-H obO, 43 dH 3fT^ 3TFt^ oPT?f?H"* 15fo^3T™"E['cpi2 cp^J^zrfecR IJop "3^ opt Wl T#t ?Tt ^S\\ cR 3T1TO T|' fft TJofJ ^opt^FIRToPT^tl 16foP=d ^f opi^l f flp 3?1?R1 % 3RWR % 3FTO1T 3ffoWopft 3?^ SFRt -qR ■qof Slopfd opt ^®i3Tf^T#tra'5Fftl 17^rffe^n(lR=t)4l?R7 3TfHMwt,Wf3)M^dM^|ob opt"?n^t"opnq;| ^jold" %T-#d~ %I t 73iq^ 3TTqopt TI3 t^ftl m^c\{ -opt oplf ^ H^l'sHI-Hobdl owlfob^Tt^l 41^11, okTftoPl^rnl *# 3wl opm "op i^q; "#^n, =w smt oppn ^ foFTm opt "cp?^ opiiblll foP=d # 3?1?RT op #1 Tf #3f ^IJI? "oTf 3fl?Rl "ip ^RJ 3T^R1 ^floH opt "CPTO

The text on this page is estimated to be only 2.09% accurate

'krlllcMf 6:9-18 1384 3JF\W%$ ^WT WI ~fo#Tll 10*TT ^} it o^f fe>w sfr £Ff-^n^rf%^fTsii n^#, ^R ^t WT 3^ WTO 3 f^T^ ^t ^f fel|o||ohll ^fe ?W3 f eft ■q? ^E|#t ^3R TTC, 3?k TTTR^T % W^ ^ Tlifcl cTSTT r sigjif gfi

The text on this page is estimated to be only 0.45% accurate

1385 $PbiM «Rf afk^rate^J^f fasMW «sld cIMT^i"^: ^irt^: y li 4-%m: opt teht 3 ■qwi # yfopqTl %F1 ^-H&i) fopqi 1% ■5W 3WRt ^#RFT 3RJIW % •sctto ^eft ^Pt wfei cf£ i ^r^ ^ i^f, ^?r ^g% s#TCRl ^%-gjn 3WIR 3^-qiqf^-gS^ opj 3TFF5 ^ T? 1 1 ^T4% OT5 3TRJIS % ■oFTW IT' £R|} 4l4l'oFtaOTTfH Twt 3*d3rf opt ■rfTw t' v^ ■of^ I "t^ =n3 #^ri art? ■qr%oTT % f=m % STOR'oFt^ll 3fay^°K"R3WHpH)y*iWH %ohKU|ftgif 'a^R op^ i^a^ gr ^t h!sN°ih tttr to opt ^ih ^spti 18rft isprat t % cph} "p^r ■op) 3trI ^ ^ aftr ^cyopm -^n^H^T *P?t'dTfe Hl%'q?TI W\ ^ fop '31? 3imT'oTqi't Pi-Hob &i) d^' ff "oPt ^TT, 31 fobdHI sq^Rd aftr wm tl 19d»n fR feonfM % f^ ^ispt "?Tfe ^ddHl'M "^t ^ fohdHl TfH tl ^W "?H% 3Wt TWH ?TiW % ^? 5%T % ^RFT t, 20M "o^TWtf ■RtR'opTRT'f^Pr »H;31oT'R^'?3Tf'R''^ 3T fm ^ fen oPT ^ % ^5T Tf 3TRt ^rtM 3TtT feloPT 21^ft VIW°bT, 3TfS4oh|R4l", wrf

The text on this page is estimated to be only 1.12% accurate

ifaM 1:22-2:22 1386 3tf> on^ y1 ^ ^ ^^ ^tft -faqi ^n tierttt f| 22lRJ^°K "RTR^fS'3?r'RT%%:ER1iTf% 41-3 cfR ft*TT 3J\t 3#^TRftf opt obeili+WI ^ ^cjfcci RkViP-i «ftptti 23^#fen *rati c?rt% i ark tm fMsprf t} tr ^s ^t sw£\ tott ■# ■qfrr'f ^rft ll T555%#R^t^tr ■qnJf ■% opnTTi an&Mi^ob wi t} rt iq; ?r 2f%:TR cR 'qi^l, TWIT % ^ "TR^TT 'CR W?) H2; 3ftr^n 3?i?RT^n 3TTOTO ^r^ jtj; ^ ^^r ^Tt SJT^t% wqr ^ft 3^=b ^flRh-Ml' "^ft ^srmt tl ^lt 3TTPR1 3W ^"=T "^TirPTf 'R' '3W^T Tit 1 «Tt 4tf % TRH TTT^T % 9frfa % ■qrst^l "f^Fd 4 %FT TW f^TT ^M 3FTR TF^ f=PWf 3T1T l3T5IT2rf % f^SJH ^ TfRFd ^T I^T I ^TF) ^■HI^&3i*-MI"fe^l sra^'FTlM'^'ll'yc?? ^'1%tti%i 3?lT"?Tfa^TT%m^7n^|-grH'qT 3fft1 ijg % 'gjn ^tf) ^n ^ =pi -sfci ^r i^n i 3?1t ^r^Frf^fqr^T % tpi^t? 13=^1 Tfforn "fenl 163ftr'awcR shmhI R^%'gjn'^T ^qra-^T Trm oFT% T3cR i\ % Tf ^=T %Tf ^ :%W ^T% ■qr^TT^i^FTFCT^i 17^r3TT^r^TF>Tf%,^r M-l-^VoK T^^1?1^T ^ 3TlT^^n%f=^S «t,^f ■o cs "^■^TJSRMTTTOMI 18=wTi*^TTl% glTl W, -^T -qf^IT 1 1 21"22ilT%^iTSI?n^ ^T«tFT=t)l WHI%T^"R,^113TP:n%S,KI-W-M ■qr%^T "Fraw ^nrn i, ^ar #nf % Tira tfittt ^ f^RFl T5P11 ^IT TIT 1 1

The text on this page is estimated to be only 3.28% accurate

1387 #biM 3:1-4:9 3^1fdil ^■qfewrwrh: q#R'R &3 *ral? Rig-RtctRRRR-fl 2RRT=t> RR1 R^ RRT i, ^sr% r} r' cff) rrrt •#) ■rr •ffni ^ r? t?rrr rRr R°^Fh ro R^ ^Rl^ ipft R, rr % r" r%' rsr r' %i ^ ^ran f 1 4str rR RR^RRJRRRR?ftN-!-lf RoRR'RR RRffe r?IrrsrIrrrri r? R' fasMW % RRR1RR LRJ^cK RR RTR Rk "R9fcn%Riafq|RR^Il 13?rrrrrrr R7RRtlRRRRTlR3RR>RRR?RRR?lii:,^R R R1RT Rd s5tf R5RT ^Ttfe f*t R?H1 ^' ■# nt ■gwtRftintl R#^T^T "^lldy, ~% RR R3T % RFt "f^RI f I 153RtR RRI R' R 8?Rft R: % R*ft ^R 3FR 3FR -RF1 TlFT^mll 16q^?RT^RRti%^TrftR% % 6i< I d^R "^Tf^'R^^TFRRWn ^TTt^' afRRR^R-Rl^ 18&-H+1 d^' 3Fq*mt*ra^R' % Rial Tl% RRfR ^ft Rfo "R?l RR % R^lW ^71 Tfo "RRR °i|N=t), %qd, "RRM 3R; TFqk fl 193?R cR tR)W % ^R ^1 ■^RRRtRTR^'^R: %^R^tR%?RRR?R:^R^RRRR3ff RRTRiarri 203M ^R RR^T % IrR RT 3RR ^1 ?Tiw R Rt Wf ^7R ^R R?t t , "RdR fR RR *RR I R RR cR7 Wl RlR *RR t , ^*R ^t opff 3TfsiR7 ^R R5JRI i, 21"3R^7t ^RflRR R' 3?It RR? R5] R' RR3 RlM 'd^7 R5I R5I % firR Rf%R RR R^ I RRRI 4RT ^RtSt^RJT ¥H % 'RTRI ^R 'R^IRI CRqRRfRRSRTRRntfRRi RRH R>R R^ R RRI RTftlj; RR fR RRt % RRRrf RRtl ^IR R5R RR 'RRRR % Ria?, ^RRR 3TTERR 'RRI RR R^ ■Rt R1 R RR^ RRI % RfR,RTR%' RFR^'R8^t,^R^RR RIrR Rt RRR Rt «RR RR^ % IrR R!! RRT RT RR RR^TRI %"QRlRRR%tRIrR^RRR?l T$#^srcF| ^ RRR R7T R RR R R1RI R' RRRRfR % RR R RRR RR 5T3RR^t, R^RfRRRtRRtRRRRriRRII "RTRRT T3R R I RR R? RRRT RR 1 1 Rft *R RT RRR i, Rr Irr % Rn Rft IrrrIr I, R% ¥T fRR ^'■RftRRRtl 7RR|RR{ fRRRt^RR RRJWRTRRlRfR ^3R?RRRR7TtRrRR?RtIRRnt, "3R^ "R31R Rt ^SR RS, ^Isihi-mirIt^r R>ff Rt RR^ RR=R R!! 1r> I " »RRRR?7 68:J8 9SR RR, R^ R? RRR t "® RS" R RRH R8f 1*1% RRRR RR I? fR RJ 8RR R7 "RRR

The text on this page is estimated to be only 0.98% accurate

ifoM 4:10-5:4 1388 wff'qT *rt^dnatil '"^"^^dn «n, =w wti ^^ 4^ an-^ni ^1opTmt anopmfT) 4 wqr,?nfcFWT^W5^TFqof'cFT^l %nn T^^^^yRd^^^HR-MI'dt'cWcFr ■^■^■^■qr%w%^Rf^^§TT afa-ftren^Pil ?pijt w*3 'opt 1^ ?nfe in ^ tr% 'opt % f , n' 3?k lkj^°k % -gjf % *ih n' M,8JK|Ji

The text on this page is estimated to be only 0.65% accurate

1389 $MM 5:5-6:1 ^'^^l^d£ll^cT^3Hct) sffc ~m ^51H^ ^T ^H ^FT?t Tft1=F ^K^VoK "5FTT "5P7T mcutl 11^'5Fm^3fsjcFK4U|f ^-^prc;% cpwf t( Utot tm -^i3rr t#5f ^ran *fci--q?tf ■^■^fobl Jl4l^wfdkjd ob< ^obclli^tPll«bdcb?r,lf^f^"dl?T?l' ^T Rw*T ^1 3lk obl^ cbHl "^Itl '#^^f-qfe^ sfft ^rasn f^fq itl 28qffprf opr 3^-3^ 3Tq=ft ^f ^ 'cFT^ f I ^T 3R^t W^\ ^ ^t '=FT?n t, ■=W^3[q^3nq^#ifa'5R?Tli|l 29^tf 3qq# % ^ eft" ~Sf>"H\ ~^U "=#' 'oFTrn, ^froT? ^W ^ ■qi^M-qtent 3rh:^pn sTHT^ntl ^#^ 1% 3)MH1 oheilfe'MI ^PT 305Wff5T7-fR ^^^1^ % % 3ft ft ll 31o?irc5t opjfn f); "^l&i) i^op 3^q3iq^^raT-1qffl'cPt^tecM siml mchI^^si ^iidit 3rk <1h1 i

The text on this page is estimated to be only 1.46% accurate

ifoM 6:2-24 1390 ^"^jrfd^i^ 4f5t, *%! imf\ art? ttjml ■qr'feTPJ'stl"* %n3Tt sffcop yq ^ -R^t ft^n aftr f^ff opt ^ m ^=pi isH-ilw opfri ifocpsffcwft 5t^=pt,^3q

The text on this page is estimated to be only 0.75% accurate

1391 fcfafaraf 3TtT^*rate qfejTf'felcT"fofanft'% l4 Hiwispqit, c|# ^^"^■3^7 «HH3; T^TT, ^M *rate ^] ft* ?r?jti ira ^i^t |ffe 3rh: HR%Wl~RT^TT«jtl ^"■TOtestF^JTl 11 4Wj irate w\ sfrm s$\ xn ^ 12i *npf, ^" frci ^r=n ^tt ^etmn f % ^ ^T?rai 3F^r'?mt#iTf^:qw'q?n'EH:rFni:"fe «HWHI-4lil 141^ 3#R"^ JR^tfelcT 3ffetsp?TT «TI^^T -^ ^ ■% oPRDT d^Hlftd ^ f 3fa 3TfeFnfe?^%TTO^HMI^1^dN°l'ob 15^? ^pt t % ^=t^ ^ ^® ^rf 3rk ^r % 18f5Fd ^ oPt^ 3?dT -RWf qsrnl H^rc|4uf # qf flop Uch ai|^^IT

The text on this page is estimated to be only 0.70% accurate

Phfafuwf 1:21-2:13 1392 4 %*ft *ft «nd ^r fRrm "rsT ftsRi crf^?? -qnf f^rai % wi ^ ^ % ^ tr% ^r *#ri ^ FtdT T#) t, ^ ~£\ 3RR *ft ftdl tM; ^ A ^& T^3k^^3rot^ RTT ■^TTR ^R ^Rr, ^TT RTR^T ^ ^ t, H=n' R^t °b<.clltl/>

The text on this page is estimated to be only 1.05% accurate

1393 Phfafuwf 2:14-3:9 l1£ni cPt£f?lcf>FRrqra5l£-f»lSl Mw^RlR =tHd *g) 1%fe^R'Rl^'R#|3ffcqfSbl«H^3Tn y^cK % In^ct, cnTO«R^i3Tn ^r%#e? 3F^ft jjfRRl t( t ^ ?fteR % f^R r ~m ^s ^r % ^ ^h ^?t ^rFT^te tor Rff "rpft, cTR RT R^ ^T TO I 17?f?ri f^cii-H TOsffo^^RRtlanTRfe RTT^d^Kl4&RT^raRSTO-HRH^KlJ|iR

The text on this page is estimated to be only 0.81% accurate

PbRlM 3:10-4:12 1394 T4%Tffti ark &-h# RT% ?frg "^ T^ 3^RJ f 8J3TI sHFTT ■sr^Frr fi t?: wr ^r? I % ^ft ^pt %nr ^pt, ^f ^RT TIFTR t, ^3Tt ^ST TO W=tR % ^ $ Wrf ^PT?TT TFTT tl 14R ^3T4 ?IS*T % "R# f^RTT *TR SfTUW TFTT # % R spqR "3^T MlRdlPlob "Spt'^TlfT 15cTTfsF 'TR #>Tr ^T, ^t IR*? T? %5 5^ ^T ^t, ^^T^^Tilf^Fg^qftcTRfi-Hl «lld ^f^3fc^^T}#^^^^tfir&^U-H tl C^R c[R? ^J?T «TR «JdM t 3TTT WRtR^Ti? Plntl 20f^d FTRT ^FT^ft ^'^^^Mrt,'5rgTfgiT'^#is ■^Tftl ^ qftfen afa T%#%Tf opt yldHliid obldl f Isp^'n^TfT^op^'tsraR^TT^TStl ^TT^ T4T?ft^T^4^03Trjrift%FTT#^T3Tf'^t'H^lildl ■^TTTl ^ =(

The text on this page is estimated to be only 1.45% accurate

1395 PhfaM 4:13-23 °f7® ft 3TR ^% ^® *ft "=#, ^ft ^T TM Tf Wt T% ^n^TtofrMii 13#y^i viRt) ^nt, 4m^> ski 14^S5 *ftft?FR'3T'37

The text on this page is estimated to be only 2.55% accurate

1396 l^fe^f *l 2TT%T'1iai?[ *^Hl^' I1T ~R# SnaHl ^RT I, T51 it 3RT |l 1owTfi itt tt)i ^frg t' cFni fe^ra t?h T^T3;^Tf%yidd^RtR%'^T'TTI'll 5^II ^3T 3m\ % ^CTOT 1311 1 ^tt T«Ili firl^ wf T' TTfeT I 3?k #1T % "fWT T' TT TI^ it T^t T%T 3}S|felWWMK ^'grOTT^ltl 6TTTMTWt TTJT T' TT^raT TT Til 1 1 T? '^it it T7^ it Til I ^ T^ ^ ^ ^T T=PT T it T>T^ llT Wn ^ ^ TTT TTT^T % 31TJH % «ni T' TR1 ^ 3Tk ^TE^^T^TT^n SITI 7fTl^i^TTI?lt cTO"|TOnTT, # ini fri^ tt% ^n f^rrcn ite i, ttt TTTraT^f^CTTPftanl 83n?n%'grn^&d cput itr % iwr t' ^tt t) it' ^tm 1 1 '3*i)fdA) #1T i%T it ITT 1T% «ni T' TR1 1, ITTTld^R&i)3iaHT^TTI3Tk^llftHdl*HI Tlf^feTI: 9T ^1 3#ITc[ TT> *Tlc[ It, TsfSStnT^TTfT-^ ^ 3TPT ^TT; 3?k TT^fe'TtWT'EfiTt IT'^TRTTT^T^Wiy-HH^ftl TfHT T^T^^T WR -H'-hcHdl Tisf T^#^TT?5RTT%T^?Ff TT ■3T TTT^T % ^TFT T' fTRTT «I3T Tit I 11 -5HTJ%3TTTlTiinTof ?Tf^TT|S cHldMli) Tlfe f^ti% % ^l?l ^ft T TITO ^ TT TM TI ■# I 123T TTT iTdl ^1 SP^K ^ft, I^TT TT> "|T %T ^HM "fe TTT^T % ^T Td *Hf % TITO # ^lid4-M-41=(H-41^I,TT^TTTf8J=t>K m^TTITFft «R T% 13qTT^T T 3T=S13?71T ^ ?Tiw it itri

The text on this page is estimated to be only 0.76% accurate

1397 $ ^s oft 'grra f l TIT%Tffd~T?t ^TTT giTR ^n %J opt TR% 3?R -R9J % T^t "R' WT"fop5nt>m "?r#fq; jsn fop ^ra cfI wfcm\ ^f ^nip Tna? ^ms fen "n^n

The text on this page is estimated to be only 0.83% accurate

$^R*Wf 2:14-3:13 1398 -&Q 3#l^ S&wti #3 3 $ 5^1 fen I^FFi^T ftW =PT -ioriy fen "TO an^f^ yld,^^3^"^"t,^T5ptWlim lll^RJWWTT^olhWplob obW|^TR%o^^ tl ls5Rff ^rt% ^r 3W^ am cpt ydiiSd ^pt^ % ^>rf^i'wkdT'^' ##E^TfH 4ld'Tra#ETn 3=wli*^#rff^ny

The text on this page is estimated to be only 0.99% accurate

r tjr? to *n=t ^ sri ^r feni 'V ^Rtf % ^IdRtfiiRR^snT^RR^liR'^R^R^RTO^R' ^RlRfrRRWctHdlill 15dR?lTRRR:RT%:R ^[JR IR Wt "^nf?T R^l RRR ■ftl ^ft % firR cF| ^l^^R'^WHWltlR^SJ-MclKcMd'^l 16rrr -HH^idi % Riai rc% r^i r^?i ■gR^fsfm r^tI *iRRf, wid-MT rk RirRi^Tfldf^tTjidjij; sit H^cj; % ^nsn^ trt opt 1rsh ark r#?i ^d T^lRT^^^RR^RRSPRrc^t^iTTjRRfri 17RK c[R Rf R«5 r) ^7R R R}?t, r? TR ^TR r?j % RR RT itl ^3R| % URJ c[R ¥T RRT RTR Hdl R7RIRT opt SJRRE; 7R T#TI RR#R%fRRR 18l r!?rr, 3rr -qiM% pri^i ^r srr: RRRd 19l RRR, 3RR RJFRTT R 1R RRt, ^3R% ^TR 2(% sH jrg % 1?R RR tI Itl 24r? t# % cr! ^ r ^rnfsRR: ^n yld>+>

The text on this page is estimated to be only 2.85% accurate

$^lHWf 4:15-18 1400 15W 3?h: t?t obdlRi-Mi oj?r ^t ^s% ^t 3 gf^ft i, H^+obn ^1 163rh: ^gr, ^ ^sr g^ ^ga

The text on this page is estimated to be only 1.03% accurate

1401 1 f^

The text on this page is estimated to be only 0.79% accurate

2:9-3:13 1402 Ft M #i 1 m?#, ctr wwt ef&K trftm sk I Tnfo ?r rt^tc % WffETR sfi ^RRTd J(T oif on^oTTftl afkgiT falNlfMRT Rwcb I -STRICT *ft ■=7?t ^#1^ fRR "^?fe Tf 3^ -ft ^^l ^H oft Pi^'Mcbild'MII 23?k $H~A $H\} WVflVfl mHwi % £$ R%% pRTETR % 'qETR R' 3iqR ■H^

The text on this page is estimated to be only 1.29% accurate

1403 4:1-5:6 qr^cR % titrr fRR ^ %j % 3ifirr ^ swRTrot qfe *°H^dT%wi qfe i^Hj^r-Tfei "3R1^ %fRgi%«I?llft^%"tl 12gs3°M)fa-4l^«nWT %^g^^TtR%^i^i3TCR^#tl $tw)d*3 f^'Rt^FRRTfRSR: Hff{fHI mS'III LKH.W^tW?^RR:^M#R 41 «npt, 3w^ » ark wf wRtitl "^ TRflf % "R1R RT "fR cPKt ^naFTT T^R^ P)^H cf^?f f % rt^r tfi wa ^tr % ^ -3$ % 3FJRR WR1 :ET#^I "F^ER ft ^R ^?lt WR ^ *ft Tf ftl fe§ ?[R ^R Rfe 'ft ^3Tt,°4i*Hltf T^Tft, 43^ WR^7t^RHI3ff* IT f^RR t^j tMM$ ^1 3 # tfe I 3TR ^K^il-4 «ftl *R % ^ olWHiquf qj5Hl ^ *Tt m*to°K =Pt ■rwT m^TR ml ^srPprf cjrt 4at il **iw *ft rt%r: oift ^esi | % -^r fe*r 3 ttii 3^ *T1^ % "5Tlcr opt^ 31RTra R ^T m opt^ 3TRfel W "R ^31^; ^Ttfe T$ Tfflt RlRt % t%^ wr ^s ^ri toi "ft? fR tjr| wn ft "5% f 3?r tjrJ Tiras^H «ftoR^?-|i 7trr^T^^f3Tqfe^T^ ■^ Hfl'HcW* Tilt ^IrcbLKH^cR^ftHcbK Tfl il ^*r rt^r opt ^t g>%' sm\ Rfe 3h?ri *ft y > ^ fell^fl %fk^lT^3"RR3^TWt W^ T^T^JfellHA||TfT*Rlft"5FR qtTfftl feR m^! fR RRT} T^Rl ft 3#^ t} 3Tfsra ^R^ ^t ^FJfdf I "viildMofob #^ o(?t 31RT ^t ^3 TF#I 3^ ^FTT^cblH

The text on this page is estimated to be only 1.02% accurate

5:7-28 1404 fe ^ ^^f^sr I i*#nr, ?j3 3W^ w ^pm TQ^l #fl 'owlf* m^dn ■%■%$ ^-sA yct,l4% M n^T, ^1w f1^ sty %j un 'givp siri ^r^ % 1?& ^HM fl 10%T iRftw "^ fRT^ Ht*I WI Wl f^ rnfe ^ in wNt | ^l| TJ3, ^M ^W g^T: StJir U$Hfc$ H°b ^ of?t 5@l 4fN3Tt 3Tk TT5R ^ ^t 3Tl&MlirHf ^Rdcoi srai^snrqi, w\ ark % cptimr TJR ^ TR% % 3TR rT^ WI: ^fa T%I ^=# 25t«n|JTr!fi^i^qt3i?f=n^fti 26^ram^rf ^opt "^ ^ srei? ^r?n f % "^? ^ 'opt '?r ^n^rf opt TIB «R :f:TFn ^1 28W# -R9J %j tr% oft

The text on this page is estimated to be only 0.85% accurate

1405 2"f«R^ftfe^f ^ TTTR %J T?%5R: 3Tfc ^Wt tr% o(ft 3TR ^ 3?^JIW clan TTlfrt w*\ ¥N ^Hl "ETTft^: %FH ^RT ^fel *ft ll cPlffe TJflT fe^ra ^n 3Hi^-oi4^noh "^t 3 ft ¥tl 6lH!N-M wt M^V°H cfft |ffe Tf Z15 ^Mtfel I % cFt # ^3 \ Til, 3^f ^^ Tf ^g ^ fen ^l 73rh: gq ^ ^s 331 Tl ¥t, 3^f ¥IT1T TH?1 3T4 '?WT fejFl fen ^ ^ w %t 3^ T^ms^feH ^rf % T4i«i wf 3 8sisi5p?ft 3tft if ■a^s wti 3fk ^rr ■qr^r ^t ^H ^F^ ■aan fqiT 9^ %[ ^RT% % y-HHNK ■qr "=# "er#, 3=% ^s fen ^t^tti "^ zffs ferm ^n ^? fen ^^nl ^«n 3^%' ^ ark 3 Wt HftHNuf ?li%5 % WT^ T^ ?31 fen ^^F^lll 10^RT cR iffm ^ ^> 3FR 'qfe ^ff % #Ef Trftrn ^rfe* ^^ tw! ft v ^ i Rh -41' % feq; ?TTft^ #^l 7=FTlfe ^ 3T^ Pw-4 Tf # TflSf) ^ sft, ^3T4 ■qr wfi f^m f^n an l I % 'Futt 'qr^R \M\ -HH^II ^ildl^3fk ?18IR7f8raT^tt&-H45JdWMI-MI#%^^Tfe 3TT :™ I, ■gr; 3^ tr t>' ^|cjT^ t^ ^n| %r, 3^ 3TTWti^ft% ^■gjnf^ft ^y yobdH^'^^idii^i^rfe^f^tHri^mli ^TTl M =l'ki3ff^T#4

The text on this page is estimated to be only 0.74% accurate

-3:15 1406 ^JR?I ~£\ fife ^R Wfl jfe fl I r\fe ^W ~sfe\ ohtfiTSb oA|o)4^t#:rai^ ^-wh41 vif?b 3^1 ^ ami W^0°bdl *$'ll,^TT5R,^Rft% {&'■] oll^opt 9^ #Hl ^ JPJ *faj 3mt *#R1 Tf fcR; -p^S #TIW?tHK^I^iraaTI 3iqRqR:31FlRR% 3T5RR ■qr 3^FTt ^qfrarftl 3 ^ "=T^^T ^TTl %*T «gd si^l ?#),■?# 1%wf 3rk sii!m4*hT10ci«it'st vr^K % qiq ijof s^r-'jiqg ^ *rn #nl ^ ^=m ^%l^°Mld>4f%te^cb}'ll#^cHI^I%RFf 3#^tl^'R^^t^ffi^3T^^Tft?ian^Tr^q^T ^Hlfecb^^iRi^q^^^rnl^iwil, 163M iRin sty w? ^Wt ^RRIw 3fc 1RTO RTR ftdl RTR^TC "pTRR ?R RT 3TCR1 $R ^TRT f sk ^f rtr 3iff5 5^r %*n I ttsu #ra^ I*f 3FTR 3T^if^f^|s awiJRR^ill 17g^"pprf^t 3TFF5^3fkfT 3T^^lcl31^5jR'3i^?t*?T Ftlt1^JIT«jRT^t 1^'Sn«fRTcf^t%'Srg'5PT'H ^l^'ll "fe^H^d^^^5\ I oFfo[5t3ifHo||iid| ■q? sn^T 1 1% cr fr ^?r *nf ^ ^r t# ^rr ^n ;3fto^nt^t^T'%i^^i^^#'tl '^■qf ■^rf^ off TIT f ^ffl% ?W^^R ft ^^# 7t% #sf t?^ i^; fr ^*ft swmi "=# ill ^r^ I^tt ■R^T ^ob$ feft ^ qt5R TJfDj "=iff -f^n ^^ ^?r 3rtr ■qir!?R ^r^ nr fr fe tm ^ft ^f ^ t% ?nfe 'gTR ^ fert ■qr *ft^lfr'R'qfi 9^ft";# 3) jWI =b< ^optl 10ltf^'?R^tcF^WT8t gH^d^'^^l^l R-MI ^TT: "■MfSi ctTl^ oh l-H "=T "^rr^TT #"^n4ion41dt^ft^R% ^H

1407 3:16-18 ■R^-Hly=tiK'?T'cPt'cR'?Fnw:'^T?iitl^&tei^

The text on this page is estimated to be only 0.80% accurate

1408 l^tigfaga Ixftejsr =Ft 3TR ^, ^rr wwi ^sr w^ ^ fqai -qr^R affc f*f} spj %j ^r% ^ 3TR 3 3Fjfi? , ^n 3tr "siifa jiri Ftl 3HiF ^t fl^ 1?TOT! ^ TF^, 1cbl M, *fr fe^ra -qr ft^n f, sth ^ ^ fte ^%l 5^ snw ^n 5Wt3R I oi? ifa ^?r iffe f^t, ^ft %=n 3tr s*^iWH'^#ti^lt

The text on this page is estimated to be only 0.74% accurate

■aifo -3^ mi\nn % -fsrftar if ^rr^r opt f¥5[ ^pt^ ^ t^r =pj w q^pn ^i t?=p I T?sl% #i*t 3n^i, "5nsf=n^, agrtc? aftr TM sqf^jf opt 3TR T^ SP^R Hji ^| ^IWcbf 3ftr % Tnar viildMofob twi «sgj 3ftr ttt^t % #i Tmt ^mt ^pi ^sr :=Ti?di i 3ffr ^nwdi i % 3 l^pHH^i, HN ^1r^3IIT'qST^3TSlcTT3TT'qT"?TITR ^l'#^^5ft^HN#TW;n:ElT%lJj 135prffoP 3K^ opt ^ WWf\ WJ\ an 3TR TT«f t# ■ffSSTT opt I 14snmr cpt^fopM"^wf^^opi an flFtj Toft opt «IS°bl R+MI 'HI 3TR o|fqHTTfiri?RrWfTpftl 15foTF3 1409 l^f^T 2:1-3:12 ^■ot^ff-q^% oR^opt'Pwi^J^'fsRoTO,1)'?, qPbidi 3ftr qr^oH % stfri Twfrr 3 =Fft tI »IHdl

The text on this page is estimated to be only 1.29% accurate

l^flgfap 3:13-5:4 1410 Tf"^TWT5qt}'37Ill1:5R 3TFt:E^I'^T ^ 3ira cl ?TTT# % 3?Tq ^ft TTTT^ TT3I 14d^ ^Tt ^T^H W

The text on this page is estimated to be only 1.43% accurate

1411 l^gfagS 5:5-6:3 fi 3^ ■qfi^R oift ^qra ^rt t^tt ^nfl^l •5fn ^?n ^TFf ^rffe "^ tt^tc wa wtdi i 1 ^IfT^^ITCd^'feM? 3TK R+H« #nf% 414 -HOi ^4 T^^TS'ft^t 3TTT ^TFT% M UWd

The text on this page is estimated to be only 1.08% accurate

l^gf^T 6:4-21 1412 993 41^1 H-Hte %^ ^oi^nl'oFi- ngt Hindi f ttkit ^ ^fwH ^ fir ^TT^'qiqjtl ^^fRT^'TOft^taftT^fli #fR^ft3*Rptl fsFg^^t sransFRi "Eflfd I, ■g^Tt^Rf *f -qf^TT *T1?1 if W ^f Tm ^f"^ft 3T^ H^dl4uf3fk ft-ilVI cT^r # 3T1^T fen "iPH is, cl "3^t ^R f^TT ^tf ^TRt Wt| fir i^h «ira ^ :E^Rn Til 153? ^h 'ttr gf^r^ "q^ "^i, TPn3Tf % trt 3rfc wnii % ^ =Pt '$3|fircFT":T'^l 37?M^i 8R^^t^lly ^inl ^rt ^ ^ ^r^ ^fto ^t s?i^ Tf^l 20tMaFW,'^^Tr-HlLllJl'Mlf,'a

The text on this page is estimated to be only 0.66% accurate

1413 2 "!!, 3RJIW ° OS cs ^Ht^rt#Ff 3rfc'df|Tf[^f)%^' ani ?$ mmife ^cT^TR^Fdjf sft^d£l'cR:'RH3}tRlfiaiWl ^ # Tift? ^ I, ^} WWMK % fi># -MldHli? ^[^ *f -^j ^TTSf ^| *g^t -r finft T^fT ^ f 3?k ^#5 % 3TT8nT -cr; "R#f, ^SR ^1% 3}q^ ^t ■>#)? t| :fH 'q?^ wt ar^rrft ^irt ^ ^frt "fen w ? I ■^^Taf-^TafF^ir^y^iRidi^n^Fntl^r^ ■RJ5 ^iw^t fei ?rati ^f^T afk stottti ^ ■H-HHHK%4Kiy=t)lRldfi-Mltl "^WTMT^T w^% &i) y#) y,* y-^Koh,^irfTalki%T^f^'% IcR* 3^, 133^^rFli?T§n^&^ d^ H$\& 41^1 tr% if ■yra ^ ^ii f^ro 3rh: ^t % ^s? *ri % fT^TT fetelldl t ^WT 3K?1 ~m\ ~Sxm %8fl ii 1%RT^ ^lld< nHo)l4H *-H %'qfi^R ^ ■yg 3RJI? oB^loRfjSF ^tr 3T^ sisraff ^ ^ ^ ■qfETM 1 1 'dsn ^w ^3M ftR 3TFIT an, ^ 'd^J 'gfT^ 1^M "RffffirPTl, i|H4ofob^^dlTfTl 18^^^H, ^tl^R'y^ ^3TtT ^ ^TyFdWt,

The text on this page is estimated to be only 1.42% accurate

2 cflgfagg 2:3-26 1414 H°b -ciTlJH -QlHcb %'SFrFT'^'Siat 3TT"fo^l %W 3TTOSft ^!* ^ sj^tlfra^cpg R<4NI-4lil Pb^ q 4 "^t 3?mT % ^nai % 4

The text on this page is estimated to be only 0.80% accurate

1415 2=K ^ft ■RTWR TETl ^fRT f I ^f #% ^1"R?T ^?t "%^T ^, ^r^wt^, 3^ 3 h o, TaTT'SFttl 83W Ph-4 R*

The text on this page is estimated to be only 1.76% accurate

2 cflgfap 4:11-22 1416 ^ro^'g^^FTi^nt ark ^ fawkrjH) % :e^tt Will 9kl | cM -^rf-T^foBt *ft^ 3TMI "dW*Kfa*^^y^Jd£llH4JN|i|l^^ ^f^ni,'^^^!!'?! !+«ri 5Jnl '^^^t^ ■5RTTlT¥lil 163JTW} 3 ^«J ^ 3TO1 sTETR WTd ^R^ WJ1 nt ^ ■q§r *f ^lf wi^ "=#' sipiil ^fiN? ^?ft 1*™ %im "=t ^n ■qil 17^: ^§t 3 3r 553 3 igf #pt ^ ?Tiw ^l ?nfe ^ ■grn wttetk ^n 1TqT5^#^,1^*mi">TT:JT?^-HH 4|i)l1% *RST1 T^3fj ^ ^i%rn| ^^ft t#ri ^ri ^ki wftft T%l 3TPTfal istefentl 21^^"q^l 3^^n^idH

The text on this page is estimated to be only 0.62% accurate

1417 TTd ^T^ ~$m, "^ ^t ^Tlf^ ^ffil, fa^-Tpif srrfF, ^RP, rTSU sra^ ^R Iwi ts^ ^M #n ^nft^l ^ ^f f^ra °m3 5?N -bfoi ^^n^ snr^ M

The text on this page is estimated to be only 1.19% accurate

cflgST 2:5-3:15 1418 i=Ft3ra0-3wn ci^laftTRiM^ifcTOTR'cFi ite ^TOI 5&-H-t) 0 'RRRt, R^, 3}RR-3}RR'Erft-5pt ^RF[ ob I ^3TOt 3WT^TWR ^FTll>TTOJT%^RR Tf % ^w 3^| otid^K ^FT'l %^^&^dlT?lt'5fRTO'?R *ft, M,=t> -HR-M SH,^R^0l 3WT^TlcFcTO 3 #T SRI cFT0 0 'dan 1R *ft RTW TO ^RT opt ■spii ■=¥!?! 01 4fcTFd^Mfcn^^5n;-^nL|WR fi^ltl 73M4t ?F)Ti I 0^10#Rt%1%q; ^1R3fk iidoblilll 9c^ll°ll

The text on this page is estimated to be only 1.08% accurate

1419 PW4 ^ TRTlW % "f^ #S ^ 't%?? "fTSTT IRK: ^ idyfa^l "^ft 3Tk ^: ^TC %f fe sk *I3<=M H

The text on this page is estimated to be only 5.19% accurate

1420 $5llM 3 siid4ld ^, 1^ ^s3 ^ra ^® ^t ^rrnfy^nft PH-4di Pb-4lt 3TR PkA 5R1 3^ -HH^ sl^l^^ft M'U 3 ^Hl # ^TO sR TRI "feRT % ^3R% h "d'HTlTSI; sir ^[ ^1 fq?n ^r fM f I " 3fa^#l*-Hl-W'fcd^^R^cF^Ti|, 2WV^7:14 '% ^KH^cR! d*l RigWH VlliMd'l, d

The text on this page is estimated to be only 3.19% accurate

1421 pfM 2:1-3:1 2i*A\\tf& it' 3nr 3Tfe ^nsrsipft % Tiai, ^rr ■^5 itt tjtt i, ^r tt str ^n ^r#^ Tfe it tssft t tit'i 2erPf tS wM ■gjn "fen ttt t%i wit^im! an Tan ^t% ti^f 3^#r ark 3iwi%firrq;^feT^ng"fenTTiTt" Tft it i*r tu^^sr ^ ^sn ^r ^ I ^rt IT ^FT =TT Tpftl IT 3^R cfft TI# ^RT "5HJ % 'grn oft ipft aftl 3?k fe fewfr it ttt an, ^lf^ITti%^"|T^Tf^^l Vt^tt Tt 1%lf, STFTTTf T^TT TTI-TTI ■% rlHrobliMuf ^>rf Tan Tfe 3TT?TT % ^T JMglO" 'gJTr, *ft ^TSfft ^537 % 3TTTR snfe TT $, "|T yHlfuid fen l fe^IT ■5RT fenl ^T%%Tf|TI3fR 3n^^n

The text on this page is estimated to be only 2.17% accurate

pfM 3:2-4:5 1422 ■^n ^ri%Frfs? ^«n ^rit: ^tfe fe™ % 3ftojt fe^R^ an, ^ # #g *ft, #fj3 ^ ~ffto fen an ^r m^°n % jrt%, tawi «ni ^ 3Tl^Wlt,^!>t4WlH'yi'^'3#ra3n5T oblMM ^tt^ ^rai Ffai I, feg m^or # wt ^g ^n Rimh^k ¥l 5lrj^°k % ^ft^ 'srn^ if '■tot w 3^p % *f!r fe^ra w an, ^ ^ «imf ^n *n§ft an^ iqfejif mjj an, TraTFtar^^^fian, ^^ft'JWfeiFfTif ■hIj-hRw h^T #tf" mmifem 95:7-11 12l m^jt,^^ &) g|J||G|d %1Mf iffe Stl" WW UlSd/ 95:7-8 16*m 3 ^pfi 0 "fsp^ft ^ri 3rh: f^lw fen? ^n an? 175iw wte ^wf ?r^ fei w: 9^m\ tw\i Wfl 3^f tR T^f i^f^ -qjq f^T an 3^ #H% Tra^R^a^Tf-ql^l^? 18trr^T^fe#1^ T?iqai ^^fH aft % ^ ^pft f^»#a if -g^T ^#' ^T'qFft?^^'^ ■#"=#' at &^ 3Tf^W % ■5FHTT Wt ^f ■R%T ^ ^f ^Rsf ■=#'?t^% atl 43ra: ^ra ^i^?t fsraifci if -g^T ^7t ^?w sra Tlcf? ^ft |f t # ^f ^R8?H TF=TT 'Enft^ % jjiwf ^ opt^ ^H4^ %& "=T 'ftl ^spffisp 'Ff 4 ^#f ■% ^TH WTTETTT ^H ^q^T f^l WJ\ 1 1 feg ^?r mi^T ^?ft wj\, m ^=t% ^ "srsf am ^rffe ?^ft ^m ^ ^n ?it "^ fe^m % ^nai 8?Hn "=# fenl 33ra ^#, ■ft^, ^t fe™t I, ^i "f^sgTF^ if g%Tira 1 1 ^n feqr^rc ^ ^wt "^9hlS[Tf'^TR^?ra?Ftai^n:-^fT8n, ^^It^flraifcl^i-Hfu^d H^'^ll'" •ifSH^fm 95:11 ^Fn ani *3^ ^nasf fe % ^^F^y t[ ^ y\o% if =t>^' ^ll'^l'Tf'SpfTt, "3ftT fi+i< -Hld^' Rh 3FFt^*ft ^FFff^ m^°\< "^"f^'gFI'FMl" 53fkfe

The text on this page is estimated to be only 1.57% accurate

1423 pfM 4:6-5:12 ll 7^-hM ^^"^fq^T^f^fe Infold f^TTarh:^^ HIH R-MI "3TM" obeS oHfl°% ^rr ^ *ft trr^T ^ feil^Tf'H^i 'oW ^T ^TRlTf 3?k ^TS% |3Tt % W8T ofTtfM sqoTfR '°PT ^oFdl|l3^-Hl&i)^3^tnqf%i^3fh:^-ft #Tf%'qiql:% M si^K^hI q^dlll ^■H-H^HH'oFfoFlf^3^'qTH^''qT^T wt % %^ ^t 4M

The text on this page is estimated to be only 1.13% accurate

pfM 5:13-7:1 1424 cn^^*IHMlf^S[Tlf*^d/^3T4fefti$ Fftft 14fsFd "ste sum iW, wjftm; ^' f^ra, Vri?rFTT3Tf* ^ Ittsti wra TWRl, TT^ % ^T? f^FT ^ ^t TS^TT 3?^ ^> =^FT #ra^ wm ^ 3fri ^^h fnR-Md #jti 33ffr; ^T5H ^n sn^i^T cr ^% t, ^rr ■qfe 3ti?ri % 3?t^ ^ ^fi ^Trfe^f ^n 3?^ ^n: ^% I, ^rft 3raw^ll^ft^3R^^T^^1^t4

The text on this page is estimated to be only 1.86% accurate

1425 pfM 7:2-27 *TF1 g^H f^TTII (^T?% "=TR ^H 'qW^n 31?f f-"sllfHPk

The text on this page is estimated to be only 1.08% accurate

pflM 7:28-9:5 1426 %r ^#pff ^^51^1 ^?3 Ht ^I-^I % 1?PT ^=T% q\\, ^^t^t m^voH mMl'opT'MRHdTitif'lH" fafaw 31 -.31-34 % 3wt^r 3?TFn sffc # 'jrm qf t?i t 'aan #nanr ^, % sft, aftr «qfe ^t tW sftl ^ ^fe f21H ^fl ^FTT »nl 35^R ^ % il# TO 3TR

The text on this page is estimated to be only 1.02% accurate

1427 pfM 9:6-26 *^ f® % IS ^PR ^#a)d it ^1R % «IR zn^ sflffi cp§r if TT% fe 3%T ^PT% 3RRft Rsn ^Pl=t)IH Mpi|^^ c^ijdiifsp^^afR #kr #1=% ^Rd Pb^i^i T^is,4 3RT^ ^ TW RTt ^SPT R*R 'cfe fatH if 'Rf^s J3fl anl W WR ^R^fRR. &i) 4NT^3Ff^^iot,|^ ^Hf^ldRR 13^7ff 3rk rM rh -^ ^an RiiRi r3 RRd rh ^r rt -fgfspr rhi, mtgj r?T ?p rrrtt t Rjf5p^RlirR< "f^Rll RT^RapTW 3HKl^dHIR?t^R}RTR^icW ^tt^ % "f^ fq7M % -^q if -^ 3^ 1%T#f?^o(^li|dH^*^nW^t,'d>^l%1eI'T 3Hio(yi|oh | 17^rffe opff Arm %s^j &) Hgl'MWcb^T^If ■^^ai^d^ot,! 3TtRTRff|,-q^-qf^f^Hif WT:HM^T^T?Tltl 26^#'HH:q7!:TRT)W^:gffe % 3# ^ i\ 3^ ^R -MldHli? $i

The text on this page is estimated to be only 1.90% accurate

pflM 9:27-10:23 1428 TTopftwRops-ft-rpn-iii 27^i^'^H:'RT;TT3Th: ^q% ^r ^tft opt wrqr ^pri wi ^ft f^llrt f qiqf'oftfT#q%1^''#RR^PT.~RqTqqTl 3rfr: ■^f mimI obi o|^H'^rr^%1%q;"=#','^ir^^rd'ycbl sITS % t| f, ^3R5p %n ^5R ?TR oft fcR ^fffl ^TT'35FS'?tTnl 3§R#RR 1 /"V'S'ra^n'cFl'fcraRHt 3fl^ oImI <4t1H ^ftf -L V/^?1t5FnTira'g^R'5R?ntl awqaqq^f of «nq' ^«n«f "RWf ll 3*ftfiqq ^# '#FTf % "SRT 1M> fa'KK 5ffr|cT^3R^T"^q^'Kqi^mi % rPIR 'oft 6 cl fi-Hl Pb-Hl glHslfo ^Nft 4N«lfo *} M'HH n^Tfsn f Mi^cU t 3TFIlf I'" ^SR^fl 40: 6-8 %*r qf^ ^pwt sn, "«#iqT sffc £r', fra^M! sfk 4N4fa4R'qtTT:o?ifqif 3ftr^f)'q^rawra f^I1^ °R^ 3Mlfl" Ht o?5 c?gft-5S[^8n^f wfqq 'optr % fqq, q^'optT^'oPTRqT'ii 10?Tt qr^oR opt f5®T *) t^p ■qir ft w-'flofeT % #iq qtej ^raif opt % % ■#rh ■grn fq qfqq ^pt. ~Rq ufT ilWop iJcp Rn-% «|K^ RH i\v\ &M\ f I 213R oRfioFftTft-qraiXopi^iT-jqjR qFraf ^qT%o^%-ErrTq^n3TfsTopRtfl 22qt fq^3q#,fiT^f53>R^qqof'fe^RI3Tqqt 3rqn£tqDf ^tri ^ f^f ^ 'oprq % 1%q fop^; q^; t®fopra ^ grfj 3Tqq "p^it 'oft ^cpr. ^ '3^t ^ oftq f^ 3iqq TRtff % ^nsj qT^oR % tqopz qf^ 1 1 23qt 3q3tt #ra 3rmT oft fiR 3tqtopR

The text on this page is estimated to be only 1.89% accurate

1429 laiftqf 10:24-11:5 irfora^-fenf.oifiiRoiraqofti 24d?H 3fl3ff, 1^ SIFTT^H^ ^ ^ 3?fc 3?^ cpqf%ylrl U ^ «l

The text on this page is estimated to be only 1.35% accurate

pfM 11:6-29 1430 63Tk feoTO % t^Hl fTt TTT^T ^Pt" OT3 ^PT^l 3rat9^|| cT^^TTcp c|f ^^ip-qR[3fiFI7 t, ^0% 1%^ ^f 3M^ra I fifi '5W "IT? sIJF[ ■5P1 fecTO op} % 4^cR °F1 3Tfel^ I 3Tk^^f 'Pismw % -^t^ # ^ opr ^ ^=t «n#' opt i)dl°IHl ^ ^Fft # ^3TI^ ^§ft TO "=# sft eft" ^3TI^ tfe ^Mofob 3^ TtftoIR opt ^ETT^ % ^ TToP TfTtJT opt \\\" 19f5FFJ-p#R^ TTfEnioF m^o^ T^i^-spt ^fti^nTiEpFnt 3rtr ^3)K?iohlR

The text on this page is estimated to be only 0.95% accurate

1431 15#Wf 11:30-12:11 #rff % ^ifl fe clop ~3W& wf 3TtT MRsbHI^T ^FJH^'tH °bii^i?i"feii"rPiil 37^®'qT'qaRra fi-Mi ji-mii ^%3^^4l<% "g=r ■% -^fI '% ^ -g5|, -R9J % 3^TRH o(!I ldU°bl< TlcT'cR,

The text on this page is estimated to be only 0.97% accurate

pflM 12:12-13:5 1432 uiM\v\i\ ak cFl ^W -qfEfT^ -^an ^IFd^f cf?t "f^f?T ^7T^%f w w^r ^t Wd" Tt-ft ^bt ^T5R 'ctHT "EnwT ~f5Fg -^ 3ff} 18gir 3#^ ^ ^t^ f^ -$$ tj^\ % ■qra "Riff 3ti^ ^%r % f^s sn^ fn 193?n: "R wt ?RFi ^ nte «2ffd 3??M"fe#"^^T %^FTO Tf 3^#^ERf cB1<5t=IKU| =tH ^Fu PtH*) &^ld"^*Rl,"R12fal ^fft fsB ^R% firF> fsB^t 3^; cfER cB^<5^KU|"R I^MI^I20^^l*#3^l^lR'!^HI'!^l^^,'^■i.Ll$]

The text on this page is estimated to be only 1.75% accurate

1433 ls#Wf 13:6-25 6^1 4?^HI ?l 16d?TT ^7t ^Hl 3TK 3WHl =)W3Tf^3TTff%^^^TI'T?T'T#l'5Rf% ■qr%^T i^tt ?t ^tf it wra ?tdi ? 1 173T^ TFT ^tVf ^ 3WT TFTTI ^=T% 3TSft=7 T?>l ^^^^4^ratT^?^^l^Tt%^f^R Wt ^TRTf t PhT=! ^ 3T#FTf 3tV ^td «Hf ^t HH-bb

The text on this page is estimated to be only 0.66% accurate

1434 "qicp I^Fgsj'ERi.^TNi^cK a?k jrg 41y irate ^n ^^^^K^'^^HR^KRJR^ ■RRR ii r[ R^l W ¥ I %^ 9R§Rf,^^'RlRRd^d^'3RRftell3Tf r? ^ttr^ ■ft'fe rwi f^ra -*& w\%\ *f ^rto ^Idlf Rt^RR S^RR^f ^IfR^TiRf^RR'fldTil 43Tk^W ^R^WRTTiW WTkRR0TdT'3R;R=R M i #ir^ rr i$ ras »h ^=pr ^ 1%rr' opt^ ^t'RWTTW ^RFftil ^RftRR^lRRR'R'lRRR} cfR cpift f 8JTRR RT^Jl, #ra RT%RT ^ 31RR RR °MH o||, ^T % %^l ^R RRR sntrl I Rft ^R %o^J ^H ^RRR ¥R ft

The text on this page is estimated to be only 3.02% accurate

1435 ^Icfjsr 1:23-2:19 ■qr^r -aft i^T^fT ^r *rai ^ i afa ^r w -^m "=# i, 'gsropr^'frrTf^sRiT*rcii 2%^-^t 3tee?1 ttti ^?n i, ir ^ ■^if it wi ^^n i eft TRTT ^^^FTll "fe^? ^r?tttqR ^-H^l =WI TTfqf? 17^-h1 y*K -mR ft^=)i-H%^ai^R^iti # ^1 3^ 3TFt Tf t%Wl 1 1 18fi-^ ot,l|

The text on this page is estimated to be only 1.71% accurate

^Icfjsr 2:20-3:18 1436 f^w radt i % RT%ra: i 3?k 3 rarer! Tfdt 203# ^3! rail ^ 3RF1 raft^ % ^TR T%d % 3}raJTTO?^R:RR*T SmfHSl'd^^l-MHI-MI an^M ^sh 3FF\ ^ sjwra rat raft rt 3TfRdraT~fcRi an? 22d^a1ra^raira? f^cii-H^raraRfra Iraf^roRfrrolraRiw anl 23^f wm ~?m rai ^ramTO|3flan/'^l£lR^4 "ira "feg "SRivi? t eft fwC T^RT rani^^RRTTO ^n rara ri '?radi t? %*r ^Tlff%^Tf sJ-H&i) ^f f=rf afk ^snaf ro? Ricsrafenq; T??ft I, wf ars^ra^n 3?k ft wm rat'jft'^fTWrfttl 'Tra^fSFf^aTRrarninR ■R^ R?^ 'dt Rirat 'flrn f, f^C TTfirtRnf, 'RFR^fte, ■R^T-'g^ra, =h-!?uii_Tfuf -^w f | 3^ ^^ s^m raRf rat ■

The text on this page is estimated to be only 1.10% accurate

oHdionuiTf^iiraitl 4gr?i^ #Ef ?ifTf -fFif opjf ^ f? ^n ^=ran ^wi jjfft sm^ ?t *te ^#f h lift? ^^T^En^HtWtf^Fg^fHcrl H^TmWII ^?r ^nw^ "^r, 'SFfT ^tfT ^r "qi^l afh: $h)&3 wl Mkl ^TT^ ^1#, 3¥^ ^rf-^-qf^t^fH 'yfte^ft, feiq^ft 3rk wf 3rk gwt ^ wa?n 1srk 3 «m?i ^l 10a^ % wr=t ^opj cjit ^nattl oif gr| ^n ddl^'lll ■^H<=bdIlTT^fit nl wrr, "^ ^ % Wu t( %ri w, opfri # 3FT=t # *n£ % faffa Tf %ffil f, 3T«M 3*t 1437 ^J^T 4:1-5:5 ^d^ TM ll W ^^FTT giT^ 3W=t mi\Wi ... i =ffict. 3:34

The text on this page is estimated to be only 1.37% accurate

^fSf 5:6-20 1438 anwt^q Hp^ ^ % for % -fcri w-4)-tm 7# ^TT^^TT, ^ % fcRT t} 3TT^ ?(oP Sto Sjftl ^w% 1?ri ^ih *iWdi T¥?n tl "?n% "firri ^w %rit #ftl 3^ "pprf opt ^s «Hri Tsfr ^rPf TO^^RlobWd'Tra^^dlfi^SPTnsft^ d£l| for

The text on this page is estimated to be only 2.42% accurate

1439 1"TO*T IRdTR c& 3ftr R, Rf Rfg RRf? rh jtfrcT i: m^cK %^-r^ j^^qf^RiR^RRR, J| RTR 1% M^cK % Rcf-*1R % 3RRIR RR1 iRI I, Rf 3RRf SffiRT % "SFPf'SRT^- RRTRd it, ~f%i ^3R% ^WloblO ftR % %* 3^T "fRRRT Rf^T RRff % elf % R*4°bi°i % 'qfei %R rt^ % %^ rri wn il hr TR q*R?RT RTT 3P|Jlf 3Tk ?lfi?t 3Tfe ^ 3Tfe itRxifl 3fRixR^^R*fff R^RTRlRdi lkjh><=k sfr #1 rt jarf r r Rtej R?fff % rr^cRir % irt ^3RR?f 3mt rr^tt r ti^ Rsffa 3^mT ^n ^r % 1%r ^rr i*f rrt ^fr fen i I 4rnfsu tjr TffR 1?TR TR^ R^TO T^R it T# f^ 3RR-3TRT Rl<>l Tfid ^Phivi) ^rttIrrr?: opf m #i ^rr fe^ra RRTfeii, ^R>Rf ^§RRfRRR% 3TfRR"®R RTRR^itRR^RTRitl 6§RRTRRR|d'qRR ■ffl RRfq 3M RRR?f Rlt RRR % %5 RTf RTf R?f Rrtsn3if if'qsRR nsfl glni sgd ^ioiv«M°b il 7dTf% cFfRl RR31 J3fl fR!?RTR Rf 3IFT R -q^| jit ^ ft *ft 3Tf1l5f7 H if, 1rrj 1rr iff wf fe^ra wt if ark v^ ^ 3ttr^ 3 rt fi it Rf brfrrIr tt^ hRhH'M il 93TTT RR 3?qR fe^ra % mRu||*H<=Hp4 3icpff sttrtt rtt ^sr rr t! if i 10?r ^sr % iwf ff ^RfMR, RfRfT^%TRR^4lHRffi-5k R?t ^Rsrsrpft % rtr Rdr wtptt i, ~f%iiR rr rt yct,d ff3 °llt 3n?Ri ^ ^r? ^m # l^f tRlAon^5'Sf opf sjdl ^ SR3TtT^?Trf%TTT ^f^l^^ «IK yi ^I'fll If -3H 1-cMI d'f' «(dl RHfe "^t ^ :h% Tit ark 3^ ^r Pl^^uiT#I^T4^r5R'cR'cRf3WTT#^Tf%T TRTff %'R^Hif^1R^li"felI^'^ffl 143TM RH^ o(l^ ■^f % T4RH ^T4 TFRI o(S ^ff -^5T3Tf % 3T5FTR Siq^'^f'ira^TeTf^HR^'qf^ 8ff,«R ■qt%t t, ^ if 'dR iff 3TR^ 3^ ofiif R tjt% ^Hf I 16^TR5f # %H ft opfrU f: "qfet «Rf, oWlf* R Rfeii"* 17affT ^R^, '3^ % ^Rf % 3TRRR l^Tqid Tfid if5R ^IFT RRR Rlet RTR^RT off % fqdl R^ RR 4*K^ifRflRR^Rf SRRfRT 3RI^ R1RTR RHeT R RJRJRqoi RR % RT»t «f^R ^tM 1 18dR Rf RFl^ if % RRf Rl RtR ^RTf RTR3Tf R RR> ^R ozjsf RfRR R eSi

The text on this page is estimated to be only 2.08% accurate

llcf^T 1:19-2:12 1440 ^\\ Mcf4^"fent19^r^'^'^d^ Pkjn 3TR cF^fcpTffcTRRR'% *RH RH)i? % RTTfRf, WT-"3^Rf, RR^S RRI ^-■ftfWf afc RTRR 3r WJTR R RR TWtl rtMife T?t Rife ^rr rwi 1rrrr aftr ^sk Ffl 33}R^Rr,RRRRTq'R% 3RJIWRR'?Rrc^'?t %RT%T "Mkj RRl? % fRRFJ 3R3Ttl R? RR^R "RcSR" tl^RRKl

The text on this page is estimated to be only 0.85% accurate

1441 l-qcRST 2:13-3:10 % 3?SIR TWtl ^ ^3^R ^°bPWl''3Ft^g iR 3rh; •cStI-H <=M dH^j #3T^|3Tk^Fff % fa§ 1^rt ^rft I ^fiNs ^r% ^#^3trfi "opfe ^rft ^ 4^=k % ^ri^r r^?t ti^ jit ■MldHli? Wdl I 3?fc ^H ^trldl I Ht^W y^i-HHl-M ll 2(^^^^^%^nr^^fi'qteT^i?ni| ak ?r ^ wl # ■fTt iwf mm sft wn mi i 1 fsFd^rftcP^cF^ 3T^^7Wf% M -HdWI *1ldl 22 "^R^felTW^'f^Ri sk r wt ^H% *R3 ^ sfi$ W3?t W?t Hctxrill" 37WW 53:9 2%^^ 3fflpH J3TT cR^I^i^Tt^T 3PRR RfffsfRl, ^M ^3R^ 5:^3 "^, ^3R^ "fe# ^t SR^Tt ^'^■^rf^^R-H^-MW^Rclltrl m*W% 3?R 3[tR 3TlWt 3?fe ^R I^TI 243R^ WS ^ 3}TR % ^ f^ ~

The text on this page is estimated to be only 1.27% accurate

l"qcRST 3:11-4:11 1442 ^1 SFFt 3}SRf ^teScrl o||uJ)%f)% 11 ^4:EtTil^'5|l4^44 ■3^44r4=PH3T3ldl ^4 ^ lii^ -4H¥l) t^p sir *r: tri % i4 mt 3WT "=TWf RH^ sto % *H?1 Wt§H ^TTllSll^fRl^'stt^ 3T8^%^I 3n5-o#[j^lx[Hl^ 44 u||Jl 4l 2% ■qpfl^H5J4id-WI%:?RHt#ra^3Md^KIifi -3^% StS^^T^l^fl 4WI Wife ^ !fllORt 3tr 4 4r 41 ^t^r 14?n I, ^4 :Enfi^ % cr4?cr % fsrf^ar 3^jh % ^w 3ira;*t5pl%'?fRH,"^5p'5fF4'5pl4oiT% idy.d+1 °pfi 4^1 114t

The text on this page is estimated to be only 2.27% accurate

1443 llcR^T 4:12-5:14 ■qr ^t g^ - TTrfcprf % ^TTar "sptt ■s^rni"* 19^r "for # ttt^tc ^t f^ro ^r, ^ % T$m\ sft 3mt-3mt 3Tl?RT^#t^ft:EITfPl 1^ ^t cpi ^ ws I, gq ^% ^k fn^vi cffi off *T5q TgfrZ wa it &-H TWtTl 1 1 " ■illdWH 3:34 3^4n^ ^? ■qr wts ^t 83T^R^R HA|^|U| Wtl Tiras^H Tltl d/lKI ^^ "^■dra^fTi?ni"fe^iHr^twH 12^R gi% ^i t5teT-Tn ■q^t, %ra™ % tiw%t 3, #m ^' wfu f^raq^f *nf ^RRdi i, Tpi yldHiftd=b

The text on this page is estimated to be only 0.97% accurate

1444 2-qzm ^n it f^ra wa i 1 ^rffe iwi ■qr^rc sffc V? m^°n ark i^ srg ^Wt *tc% opt ^h 3Tfe^3TfsW3Rl'ffl 4t «ft ?nfop ^=t% un gr ^pt M^oR % :SITH it ^TT3Tf 3TTC ^f "fsHm 3 ^fEf ^TT3Tf # #rff opt ^| f&s513}f % ^PRm ^ ^m t( felcTfl ^rr $h)[

Tf i#n^ ■sRtafk *n#Erft^f"STT"5F?t-ci

The text on this page is estimated to be only 1.48% accurate

1445 2"q?IW 2:1-22 2^M^T?T # 'SR 'Sd «Ht % #Ef ^ fT^ ^4t "fell ^ #t ?) faTf %3^fTO3^TER^^f:sitTfT^T?n snl % Spff-q^^TOsftEtT^Jirl^.yldfcH -4HI

The text on this page is estimated to be only 0.95% accurate

2-qcIW 3:1-18 1446 R$1%* <4H •H-wfl oh^Wdl'-^f \H\%; "c£HT RqRt ^Rft % RR # R^TT if* RK 'R=F? H^cII'MIJ^RR'HI *%!4R'RteRRH"%lRH ■%fw: suhtt 3% trr ft#, rh h? ^ri ^pi i ht r" h/% "firra tr #1 ^ 3Nf h?)"^ '^h hir' H?t hr ferii°M h3 her} RH51 "pPTT HH HHR HH HHR 1hrt I Rife gq hIhh ^W ?ri rh)h h' h^? hh cfERf h^hrhr)" rr ?hr sthhhi ?f?r RTHf wi w% Wt hh I, «HRT*Rl 3^H?^?FlH?HRRRHTftHlH} SffrR fcff Tf -S^I^Nld ffft ^3fR H# M ^?R |it rptc 4rr h^r-"hr|rt ^h% rr 3 sir h?I RHfn hh? hrTh} ihr hhh nr h?t ntl ■qr HH^ RfeHRi,^HR,H^HnHRRH#RT T#tl" SJHFcIHHHH? 37T^T HRH t Ht H H? ^irhrIIh} 4\\ RRHHGSHR ^rhfri "tR ^ ftR! ^H"^ Hlcf HH tra 9*jTt: ~WR % iR^TTHifR'fHRHMH} «KI«K s? RRIFHRHI?! HobRn^fl 95nj3)MHl ylclifil Mil

The text on this page is estimated to be only 1.59% accurate

1447 i"W^ FTR "^ gRT 5, 3mt 3iW ^ %m\, stir ^ fRFn, 3TTT ^ T3Q 3TRR # WTSTT ^ FTR"^T"®3TTfl FTd-H ^H%1wt'R''3dTTl'!>^TrT3TtaRF %^ ^H ^1 *1TR Fi ^RP?T TTTI FTR ^ ^3Tl FT ^s%wli| 3TTT araFTrTR^TPff^t^ftaTRra *tteR^|U|l°M7ll#%T%*lT«l«lT3TlT Ft PtHobl #y T^PTT iRII 'FTR^R^l'i 3TTT wj\ 1 1 3ra cp% Mt ^# ^n ^q^T 3 tI I tttter ctr wjif^^^w&T&ifrQ-cm^-^^vih %r Rftw?r^Tml LK^<=KF^'qiqf'^tWT'^Mt SpTR ^faj 1% ^ ^TT y-HHNK *R1 i, ^ ^5 %FT^^^|3TTTR1R%3T^*KMum1cH ^t^TtcftFTfTSsffaTfl 3ttt ^rt^r 31R*K"I Hs*7< it'll 7&>-d)'MRFT-3T5J'SIcSmTf lrh^oK %"cT5t:5fr^T'^nF4

The text on this page is estimated to be only 1.86% accurate

l^FTT 2:9-29 1448 3^ *[jf Tt kf II <=tHdlt,'^'5Il 3Pfd5R 3?Sra7R^' ■^■qR^'^ll "fsFd^TrSR^^nf^kfllcMdli, 12 1 13^ sfS^, ^[ d*tf iM\v\i\ ld^

The text on this page is estimated to be only 1.07% accurate

3f5FEnT^^feq ^Ri'ft'^i'tl 3wT'^t^^Tr^?T"cR i^Rt 3WT twti I, m a^ anwt ^ # Rfe "# ^ w\ ^?rri i, ^ ■qr^R % fwr cpt cTlfRll^Rffol^^RlfRlltRiqil ^Rt ^rt'!ft'?t%H-Hte

The text on this page is estimated to be only 1.71% accurate

l^pTT 4:1-5:3 1450 yj % i?PT ft#, fT 311?qi "5FT "ft^TO ^ ^Rt 1^ h41 -h'-hk if^i^ill 2t-K-^ivoi< ^ 3n?RT'5frr ^iFi?ft i %, '%] ^rate ^^f % "^ if t^ ■qr 3TM tl" ^W ■qr%^T ^t 3TK 3 ll 33fa fT w TR% % 7ra3?f ^R 1%3RT ^n # i I owTfe ^w ■RT^^T "# giT^f t, WR if TF^ "31^ *IR ^ w ll ^ ^rate "fcM ^T -Hi-HlR* ll Sj-HlR^ ^ ^Tt ^5 «fl?T?t f, ^f -HI-HlR* t 3TR TOT ?t ^raft^raill "fsFrtm^R^R % I #*ft 1"^ "fa#, FT ^RFR ifa^'l "spfff^J ^R q

The text on this page is estimated to be only 1.06% accurate

fe^qT^^^faop^fl^^3n^31cqfS|oP opffc^fff I 1oHlfi # obl| m^dn Tft^SdH^R ^M\ t, '°TW WFI ^R "fspSFT ^ #n f sftr TO % ^ 4W ^WT? ft % ^tfJTK TO ^ 3tk ^fs! fdl f ofiiffob sn^qT ft ^PT tl %afi f^ ^ #1 f- 83n?*n, ^r aftr w 3?k ^ ftff *nfis*ff w ft wtfopr-qrFrcwtrafi *3M in wi 'sro ft ipft *nsn opt Trt | ft ■qr^r wi ft ipft ^TT^ft ft 3ffc 3rfsra hi'35r":#i,'3?i%1TCf =iw 1451 I^tT 5:4-21 3W3t^T#RIinTTt 13qT%oTT t( TSR5TO T^ oTT#, cRoft ^ wf n ■^#Hr %3 T¥l f felt TJ*T ^f *1H # fe 3PFd 41oHd^l^4l-Hll l1^KI4^^oH^'^ft!,io|wt fe^ftfRd^obl^T^l^^H^Kd^ftHdlobM ol? 3HK)^Hdli153ftT ^M'^R^^F^IioP'oT? shr! yndi i-^ m ~sm\ ^7® ^ftifFt

The text on this page is estimated to be only 1.89% accurate

1452 2^1T ■^■5gif-SFft3fa^-3*JiT%Ho|5t-'^MM "R ^5t &-HnfTf *nijteR 12^fa d^' fatei^^^ qra «ijd^^i?it1^g ^#^^a^3Th:F?#^H^T&teHM^dii'#5F ^ swn I % ■g^ ttot sn^r 3tfr ^fr % slld'ob^'lll ft^^HKI 3TFF5'qfwf# 1 13rkl «I^H* ■q3?n I, ^m ^ ^ai ^ ^ ^ fen I "asn 'g? ^&qf , ^ Till

The text on this page is estimated to be only 1.07% accurate

1453 3:*Jpff W31 ^ 3TtT it: "&T f*T5t, "TTO % "RFF fNt ^t w% t( wrft! % ^q t[ ifa of^h f | %^ % for, ^[ 3TTSTRT SfHsW f "fe ^ ^ 3flSqTfc^ "^ ^ m^f^^"qw3n5R^c^%yidd^KlPiwi% itl "g^ 'q? 'g^ it 3#^ 3?ff5 3^t f^tt ^ gsj ^tt ^r^ it, ^ fe^ra % war^T Tiiti ^t ■qr ^#n |, ^ift cbdlfwi % *rm^ ^^ ^=raft "I^T ^FR WW ^T=n r^HHohl ^R^N 83*#rq wi t^rrlM ^t i$ #qf ^ wra V> ^^

The text on this page is estimated to be only 1.02% accurate

1454 *f» 3Ttr 3 cr #rff % ^rrn # -qr^r % %t ^an ^frg trtIw % ~f^ frfer ?ran m^cR sjn i^ "n^tl ^ ^1, ?ltfrt -sk ^T s|t?dHd ^ W3 ^tdl 31m ft#, :qwft ^[ ^|?r "Enw?n an "fe cf! ^i d^fo^d^3fod/^yl^llidcbdcbi^ i" 10f^5 ^ #n ^ ^=t afk ^ #n ^fegln ^3Tf % ^ctrh #h "^ftT 3 wsf "5^ ^ qRftd 1, 3 mi ^ €t I i^# ^=ran "Rm ^ ^ fl u3^ #%%i?#'qi"^??T'gTT t ■R# ^ft 3^ 3TTq^t ^ # Ti^f| % -^n^ ^T "fen^"fetFT"^"ft^n anl #^if)^s'ft^i^t^ ■^k? % "f^SlW t( ^fj -^ -^ -^kj -s^; fa ipf ^| ^ro^t^-sn^ti^^-f^rai % ^nat gc^ ^FT Wl-'qB f \dn-^ ^ "^ ^ ^ #rff % f^ Fl Tis^f ^' ^ftw|c||U|l "5fft aft: "^# ^W ■q^j 3^ ifsnft-^nT wferf % ^nai 15^w #nf

The text on this page is estimated to be only 1.52% accurate

1455 ^pr 16-25 ■°FI ^TPT W^ % %^ 3T1 T¥l el Tllfe ett "^ # 16% Om wmin t 3fk ^r fs^ ^# tl ^ ^R ^R^ TI^ % M %FRt SPJ :jft5T tr% % ^TCcTt" 5TU t^ ?t opt *n "5% f 1 "Sp^tr'rTSIT ■otStqfopt fEt5T3ff % i^-Tfl&^H op^tl "^^Tot^l^r^F^^oH^fl 3n?*n "=#' ?l foTFg fip? ft# ?r v^ ^ ^Jt ^T^TWtl tfe 3flrRl%*HafRT8Rl'oFftl 21F1TC jfj ^Wt trtIw ■or?) ^?nn opt snz ^r?3 |^ # grt 34 -HI ^oHTIop^^Tt 4^V°H otft «#>Tf#=T 22# dioTfsld I ^ tr ^qi opfri 2:%ff opt 3^^^3^3^fH°bM#l1°TRJ^T'foai?t ^m'5pft#H^^T%TmqDf^omioi% ^wi 4

The text on this page is estimated to be only 1.15% accurate

1456 y°blf§ld ofloR ^T "3JT "%T TR^fte "=) "^ 3^ ^N^> ^^T ^t TT%tT H -4IHI '3^', *^dldll)'%?I3'%'fe^3tel#ql

The text on this page is estimated to be only 1.19% accurate

1457 y°blf§M o||oH 1:17-2:16 ^ft^ Wl if WT TUT fa§ jq ^| ^g% Tg§; t} tier ?fa iim\ ?i?mt ^ifr f^n t# afti^n^sjfe ?ffem^^Tpf%-HHHw\ anl 14"^5 ^ Ft, ^T "qiT? tIt f^fts? if ^5 ^IrT ll rlTW'gS5"^'#TT^l^r %IW^ Tte "qr "^ 1 1 ^tf} -etwm; ^t %iFn an % -^ mn^ % #nf cjjf Trf#i -5tn ^^m tsf> 3ftT^rfirEnr ^7T^^ylHiiiid

The text on this page is estimated to be only 1.52% accurate

H*|Rk1 °II°W 2:17-3:8 1458 isretsi t( ^ ?t?mt 3 ^5 ^r#n ^tr rt r^ 3 pHobddlll 17'^TfTTloT5dlt,oWTT^t5p31lcHI ohcrli^l-aflTt opn ofi? TIT i, "# 1=FPtt #n, R* ^3R c?spf R' tsqORaTfqtl R 31^ 4 TJofJ WT

The text on this page is estimated to be only 1.71% accurate

1459 W°mRm o||oH 3:9-4:6 Os • -$ Os o ^ Os ^ ^[ ^% ^f 3^ sft f^T ^R% ?ft ^m\ T#t f^T % ■aan ^[ ^% f^T ^r#qi % 3 m *tf( ^

The text on this page is estimated to be only 1.99% accurate

Hr 3fpiwt 3frcf qft'qfT affl Rn iWa) Pk-tK °Md ^ sr^fttR ^n w snl 7"ftR oi? 3tm a?fc ^rr Ri^wn ^ ftf Tl at: "oifRiiTn^TnT^Mi j^i an, TfTn^TT[f|T[T3fK^fft|" 13fqR r^ ^n % ^spf o^; a?rat w sft wm "^T "^T wft "^W T?T 2TT:

The text on this page is estimated to be only 2.46% accurate

1461 y<=blf$M o||oH 5:14-7:4 "# 1t%1TR IT sfel 1 3Tk ft*Fn! ftTrcTTRTTrrfcI'qio), ark ft"?n% °bl *ki •ycki yiki obTi ft"R3TR?ToF#FT of»f T^^

The text on this page is estimated to be only 4.15% accurate

H°Mf$k1 o||oH 7:5-8:9 1462 #H #rff ^R F?T WFTl ^Fft ?ft, F^ ^T^fft WIT F=ftl^ HT!" 13cmt ^3F W^Hf if F feFt F F^IF ■r^f fen, 'f T^ft ^ftstto #n ^N ¥ ct«n f ^wf ^3T1^I?" 14F^ ^3F ^FT fell, "F^ FF cT # FFTdT li 1 1 " if ft ^sf^ f^f ftift, "f ^ #n f ft ftsk; FTdFT3Tf%FlFF'?teF. 3?lTlt 4-3W awn1 t Stefan I fe ^1? Tft ?rc? ^r% Fra wa 1 1 cwiJ^ hP« f'Rh I cbtf H^'R'II^'II fttf^ ftdftdidl sw^f) 3^ cri^Iti 17spffl% oi? ^n ^r %wr % -^ if i ^ra7t ^it?i ^TTI" ^3flSCT^TT5R WraWTTTfll ^T^ LKi)^c«%-HIH^tel^^^l< 8TFdt'cR;lb=tjR'4IIW'cR'^Tf ^ITSTR-?^, ^iWni^TS;, R^^WT^R 3TTT ^^TJqWT^^Ftl f^FT ^FTd -WKd, #H% 'qiFFTd d 'trinf WT ^< *Wfl"Wl "^ %T^ % ^T?T M 3TTT Fv^t fft "ETRT TF3 ¥t 8^ -M'Kd ^ obl HtFT# 3#^71^T?Tdl cs cs o cs |3TI "^ f^TM ■qflf FT Ffl5 ^ fe %T TM ftl IF^T^irffT^F^FtTiif^^TTFnl 9rT?TTF5s;%

The text on this page is estimated to be only 0.83% accurate

1463 flofflftra o||oH 8:10-9:19 TO %%\$ *Tfa Wd TT "ipt 3Th: TO tclfjf ^ %T "H^if^l 10dM wkd 3 *re cR^t ^nf nf 3totct 3 ^M^d^^ddljaTlTOfsmMdKlpKII^ dKi^%^^rf'aan"frRf%ttHt'cR^n'q5Tl "l^rTi^'^n'Rm 8n'Hiji^lHi'*#-HH=l ^w^tito tr^Wl HM^Hlifit«raTMlTrai^?^r'% Sfll sftTTtraifitTO fd£l^-sWI 3Tt?:TO%jf ?nrt 4Ruiih-w^4 i^oh id^ilRn^an^-Hly^K ^ id^i| TTd3F£Jrif^f^i 13f^T ^ ^31 1% TO T^f ^ 3TOTCT ^ ^ T?l 1 1 *f3 ^ "3q^ ^T ^ ^?^ f? Tffl, "3H ^"pr dlHW'KdT^d3}1 TO WO ^311 # ^rt 1wft ^ft ^'^ $ wft ?ft # ■qraM ^' ^dTnttl 2fq^:^?'dlT^^?1^W^^ndMl^l ^t^ ?ftl TO^d ^# ^ 1i?qi -rpn an % ^ "=T # SR?ft ^?t ^tra ^f ^ ufa w^Ft 3TR ^ it -?r "qftaff ^i 3ff ~^\\ ^ ^Tf^^^M^fit^llH MsM-fl sft'fsH^^stf'qT ■qr^R ^ *t?t ^if w\\ |f ?tti 5fes5t ^r ^ f=feT ^ t^n "fFTr an"fe^#qt% wi^^f *&**> mh hsP TO^i qtei qjMid Til wqteT^rr^i HI'I^HI ^t if 3TTfTRTtFT ^t ^FTFTt W^iwl *d *dcH">^Enl ^HldHfJt1^ W37I ydl* HHI ^Idl ll %^T2^^il?fttl 6d ^rmtl 73fh: aM^f^^ts^t ^5% M d-MK "f^ M*M4h) R ^ft T?Tf% 8ft| "-qicTM % 3Tfsrant ^d ^ ^?ft 3^ TM % "^q ^' #RT =tHH"c|MI) wt 1 1 13fq7T"^ -wkd^^it^ml d ^

The text on this page is estimated to be only 1.22% accurate

Hcblfikl °II°W 9:20-11:9 1464 ^ # ■=!# ^hr ^n ^% ^ ^ift 3^ imf ^ "f^ ^wf% %; aw ^ ^ "=i f&m\ wsn *?d-M ^ 3??m #^, #3, -*m\, ■qfSR 3lk oT5f7ft ^ ^ Trfd^f^fUm-HHI H£7^,^$arcrft'qT'3ft crarwrc afR^rr^ew-H^i^T^'^ftTEHi'^fti, oi? 'H #3RT'tRtlt^l3'fl Pk) 3^ m'A *)<=|ob ^M ^Mdl R-41 anl" *3^r ^iobivi°ii"il "3,#w}^Tffl kit, y$wl Am ^3fT t, ^3TO IT*? # ~&$ ^g?ft itsft ^r ^ ^ I " *#3"3*T'W'l

The text on this page is estimated to be only 0.87% accurate

1465 McMftkt oIIoW 11:10-12:8 ^TR Sf^JI crai WTT Tq?TT ^jftl ^Ttfe "^

The text on this page is estimated to be only 0.79% accurate

Hcblfikl oIIoW 12:9-13:11 1466 ^t^pfTf-^opi^H-s^lW^PiotMrl 'mil 93TR 3TT PlVIMobl-4 3T3FR ^t^ afellfeTTFIll m olgl^HIHgHI'ltPKUHol ^SM^dHc^HWI fl ~m -HR=) -H-HK ^teSddl T R*ii Rw^-g5r«Ri«ni 14f5Fg ^rt t4I ^t t^f ^i ^?ra % ^r w 1^ ■g^R %^ "n^ Hfl% h? ^tt hr a^T ^t ^f «n^, ^t ^i% 1w) W1K "fesn TRI STTl "^T1% "cfl^T "^TTcT TO Hfl'^T! ftwi ^TFT 3WR 3 cR ^TO WI-Rt^ fen *tht«iti 15^t^nH£Hm^^rrT#%il^3m ws t} -^ % trh ^ m\ y°iiBd ojft ?rn% ci? 3TR-f ^J cp7 ^ ^| 16f^F3 SRtft "^ 3TO1 r^ ^d=M^T^^WHdl^3TR^TlP^IM W t! «Tt "=Rl Ph^m! «ft, ^ ~RfT?T #P?II 17W^ «n^ 1 P)-

The text on this page is estimated to be only 0.63% accurate

1467 yohl^M o||oH 13:12-14:13 fclkrlcbW 3WR % *ITH^ ^W T# cpg % *wt 3TfeRf^TTT ^l^fff 3RT TJ5F WT ^TFTt ^ ^faTT3TT ^ ^CRT ^jftd % ^fFTR ?TTI ^#qiWRH,^TJTfcT^f?T?TT'ciT#Tf % WT^ "^ "=TTT ^TTd ^TT Tt ?Tl #R T^ ^TM ^=(m1-H ■?5TR #rff ofjt STT^ftcR fch^dl ^7T ^8FT ^ "gfT %TT ^FTT ?TT^i"®Tf 3T=T ^lf *ft "STtvli ^i % sfi ^H ^rte ^fr^n ani "^ ^ ^rt% ?r l^^f^^%^^^3Tcr^3T|CI^crfqdTTff Iwtt sni ^rffe-^-^H: ^^"Tob^'^HHMidi,^ ^T^^H4HTf % "f^ WTMT ^7T "^ 3T^tT ^?T 8TTI 7^t ^5R ^' ^f -#n, "4

The text on this page is estimated to be only 1.59% accurate

HcMRkI oIIoW 14:14-16:2 1468 aUcHlcMdlt, "lT,'Mifl3rk>'tl ^3R> 3RR}RfR3R r 3ra fsraw r#tt orPr ^t% oRif ; ^% ^jat SRRtR*tR*MR^R^ 141rr ^ ^31% r} -hih^ ^it t>Rr" 3KRd, ftf) ?n% 3RRR t, |RRRTR!?RT, ?R RF1 Rs| 3TR S#fedl 3 *R |it 1 1 RRtRliMRnTlRl, 4 #RR, d^ -tH Hohl HldR^RRd" at, RJIRRR Rfel Rof Wl^ R^ 3^1

The text on this page is estimated to be only 1.91% accurate

1469 yobli^M o||oH 16:3-17:4 "fi^T fen 3rk m ^n ~*\& fjk w °^ % w % "^qTf'««(rl 'WI^T^TfigH'clkrlTfflt^fa-^RJ ■RIT^I 4fq>T cfrer ^aRRfeit 3=k w^ftr^t ■qr ^^I%+o|IHl ■M'Kd'EprTlWlTRl: #1,#SHT^ -TINT'S ?Titi^t'qfeTi TR # 1°MT 1 '3W ^M 1 I 6 ^irt^^^pi tr t=t% in opt srt wst fen, ^FTffe 3 1# % ^T T?> I " "Ft, I -H^lRhHH fft ^TPT T&k 3?k "^op f | " 8jtR^ c^-^ 3^Ri"ran?n^3T'cR ^id fell # ^ #rff =Ft 3TFT t ^?n ¥1?R cfft "?lfe 'g^H oPT ^t"ipftl 93ftT^^H=h 'l4^ 3TETT3T R' ^M %|e|f 8RTf#^|J|dl^dlt,3nT^4^o|^'opt 3iq^RraT*3tniTllfe'31RTllRl:qR 3Tk

The text on this page is estimated to be only 0.79% accurate

y°blf$M o||oH 17:5-18:6 1470 3TR ^1% ^#RTR offt 3^5 W[3Tf ^ *RT J3TT ^n3Tf3TR sRcft'qT opt^mt 3Rdl Jl* 3FR WI T^FT 3 ?g& wi, " w ^t % sfk rwcrt ^r ^ ^ f, ^i% wte ~s$\ mh&m\ f I wi t%ff 3tr ^f? #nf tHifwy 3tr cmt ^wt t^nm # ^^pVjii fqR sr^I % 3 Tf "Rff #R| ^ f, ^T -CRT ^ ^PT ^TfsRrl #t ^rffe oR*ft oif ^fcw «n, rp^ 3Rt ^ftfe ^f I, TR tqR *ft °W 31Ri '5tM ?l tl^-HId ftu^-HId qcfdi,RR'cR'3!>'^si31'il'^ ^1Ir,^wttm3tT % 'Hi wrpI, 10i^wf^ Tilt, 5k^?RT 3R1TTRP aiWH^Ttl fcb-d-^'cW 3Tl^?TU4Hcbl^1%^ilcpcW^5^'?tT%oP twtiI 3^ 3t^rt tjttcr snrwr "=# fen i w^ ■q^j % 13?^ ^ETf TFrf ^7T "^ ■# 51#5R ? fop ^ 3FRt Tlfvii 3TR 3mi 3#5PR ~&3 tRj ^ ^q ^| 14^ ^jaif3TR 3mTPt3Tt%^nat^%F0^nl ^ffe ^?TM3it'^TTM3fR'5m3Tt'^T'5mil" 153^i ^ 3 tj?r} fqR '5PWT, "t "=rfM #p% g^ ^TfM3TR 91M3Tt^?t'q^tl 16^^F?#Ti%^ ^t M ^#t 3TR ^ 3TFT ^f ^3^n ¥lrf^tl 173iq^ Ti^ -q^ ^T%, ^1% ^ Tf -q^t ^gi i^n | % ^? TJTTCR ^!R ^7T 3PRT 3Tfs^R ^T '^RT opt #t ^'l 18cW^#cPR^#2ft,'cWH£HJ|(l ?ft,^TrSRHt %TM3ft'qT VIKHH oP^ftfl" «njp^Pi1oHm 1 Q W^^R^T^3TR-WJKd'opr3TT5pm J^ O ^ ■*?! ^lfd> %^Tat nW dd Hq ^1% WTf Tf oPff Tt\8& "=T ^1 ^T3TT; gq ■qr ^ -ot rrt rr' # ^i% t! $, 5 oFTtfop^IopTmoplift ■^Wfl ^Br^t "fFH ?FP 1 1 •qT%R ^H% ^ opqf -opt ^R -5PT TIT 1 1 6 ti'gq^Ht^^^Top ski "4°I^R

The text on this page is estimated to be only 1.20% accurate

1471 y<=blf$M oIloW 18:7-20 fiWcbdftTfHftilftMl^ tg^Hl fadl-Stl 7 cprffe#T#qT3fk^«^ ^ -ST^t^RR pRlPld H^KHl 3Tk , 3 ^T-^ ¥t Igk Tp oRpp 3 ^g% ^sff 3 ^T M tl 3 flft-RlcrHsId "PbdHI *RJ3W 3Tk IsRcRT WfH^ i,

The text on this page is estimated to be only 2.20% accurate

HcblRkl °II°W 18:21-19:10 1472 2%r ijdh ^iRb^iMl-wkd^:Era^%'qis;M °PWT, "HSH'lOl t ^IJ^T H^H'Kl! 3^ cHgT Pfcrl Ml*)1!) I gfrf 3Mcbl|wm\ 24 ^Flft^^iM'Epl^T^Hf'Epl "^TSrdttR&H

The text on this page is estimated to be only 2.33% accurate

1473 HcmRm o||oW 19:11-20:10 ufw; ftft Toiftoptipct %m\ 3ftr cTFtftr Ttmft to Tift^; ftifi anl ftli cft tmt 'Pi^oi-hhI'M' 3rtr |3Th;^g:^T?ntl %T^3MT^aff*nftf3Tf^ °Ft w& i\\ ~3w& fftr 'qr wa ft ^ros ft I ^rt ■qr to hih idfeii an, kft *)i KnlftfqRft^ftfoTd^f^ 3fk^?fft Tifttj op -?nat irsp f^nr ^q tt^p tft "fspjni 5(?tq < ft ^1fo|d H^I'f'Jl)'^ ■q??n ■q;reraiH |i ^ spq I 3rtr ■qfora ftt t # ■qgft gq?f«tH ft wi ft jw\ i l fi ^rf^rf n ^rft Tjg opt-cFtf 3?f815PR m\ "=# 1 1 ^fiNp ft Hf ^Rft^T afc ^Rfttf ft? ar^rft rrsf #t 3fk ^n% tusi t^p WW orf ?15p TFT ^Plft I '■fcpT to fsnr °Tqr ■qr wf ^spft ^ wth °Ff ^cksj^ftesWRilMI^III 83TtT^T^^t STTHt ■qr ft^ft ^TiM =Ff w^ift % "foft 1ftoF?i qfnrl w ftFT 3fk ^RTnm oFfl5ftfnl ■oT?^%^'oF#lftT^^ ■oFTml ft ^dft i\ 3T=Tf?FTd #f FRTft TfR5 ?TS % TT5-cFCJl !%TH'5Ft*lHI -HH41 Sirftt'qT i+i

The text on this page is estimated to be only 0.84% accurate

HcMfikl <=II<=H 20:11-21:19 1474 11fqR ^ "^ f^M ?% Rig WH ^PT 3TTT ^ ^ ^^ ■qr f^mH an, ^sti ^h% ^hw^ ^ a^ 3rk 3ttctot wit^i^^t^^-^-^4^ ■qral 12fq""T ^ ■£& 3ttt sri Tfrspf ^ ^gil ^ ^•5Fqf% 3T3""""TT """TI" 4-kil 3Ir^F "5PT =""n"""" ""JTI"% "Spiff % 3g^R tcpqi ipirl 14?ti"% ^rc ^ ^ ^ ^n^i '^3TFT'^7i"|ficTTf'^f^feTI"rFTII:'T?3TFT=hl §ilo1 "fUwl'Mil 15-mR fe-Hl ^n^m '"""ftsR-spi-qT^Tcp' ""=f Mtell H^T lHil3Tfe% °hKU| o),l| T"H it ""3"""Ft if' ^■qT """ft Iwi-hh tt 1st «n, m '#n, "^r, ^r fl *^? ■g^ %r ^fen, "wi ^ wi f\ "^t ? I 'R # 3T?q?if -sk ~%~£\ 3Tl^n f l ^ 3rrft f 3?r ^[^t Ff^in 3tV oil ^1 "g^r TTml SfoTFgi -oJTR^ ova cs ^wt^l Tisra oift ^# -ffta if 3Tq=Tt %?n -fem fcRT ^=T 'fflcT ^cff Tf 4 #H% tjrt ^HM 3TffR foHmf ^ ^R ^R 0, "^ 3TFt 3TPT( 3TR ^lt ■qtfl" l»,5f#^[3n?RT% 3no^TTfft anfoH^-q^ t^ Pi vim ark -3)^1 qofd n ^ Trail fqR ^nT % 4

The text on this page is estimated to be only 2.97% accurate

1475 HcmRm oIIoW 21:20-22:17 Ri?n rtsr ^q^ra rr rrt an, ^rr "%ir r, r]rr ■Wifcob R, Rtsft RR R, 20RTRRf RfRc; R, Wt RTR5P 3, RlRRf "iflcf Trf&T ^, Snffoff rtIr r, Roff RT3RR R, ^RRf l4obT RRR % foRsffl 3o|gffop^lyopK-opF-optf3if^!;iimgl'gli||| CRR?oR 3RTRRRRRtell-HHRllRRlTlRTlRSn ~3W& RRSP :3RR?t Wtt RR RR T^ RRtfoP f^RlRf%RfeT?tRcPIRRRlRopZ^ti| Uift-ep] RRR R^ 3T1 Tl f, R RR RRR Tf I ^Tt 3TRfRR RR JIT f, R SRJRR •# RR T#l ^TT Spfft, R SIR? it RRR T# I RTRfoTRiRRfRR-^RTlff 12"^#, R ?f)R it 3TT Til t 3Th: 3TRR RTR R1^ #IR RfRcpR W TfT 1 1 iRRR ^R opif "flpR f R ^% ^RSp 3RRRT it R^l 13R it 31RR^ 1 3fh: R it 3TfRTF ll R it Rl^TF 1 3Tk R it 3#dR ll" R it 3#!3|R^[lt3RTll 14"?fR 1 Rl Rl 3TTR oRRf RR Rt ^R fl ^3RJf ^RR-^a?! % R^I Tgti R7T 3TfST5pR itTTl R^T % ltoPTRRTR'RR?TRRR% 3TfRRRR'lfTtl 15foP;R 'RTrl', ^T?-"JtRT RR^ Rl^, "STfRRTR, RJR-RRSp RT R?RoP Rl RT "^ RT R^IRI 1 3TR "^ RR ^ RRRT l,RHTltRlTfnl" 16,,TRR^RteTRRR#nfop"fRR aRT oPRn%RI3ft %1%R,"?R^Tf'^^T^t^^^LIHI-wkd^RT f I ^ RRT5 % RJTRR RR R?R 1 1 R[ RR RR ^RRRn faTTrTTTTtr' 173nrRT atk ^iWR EpiRt I "3TI!" 3RT RT ^R RRRI1, Rl Rt R#, "3TI" 3Tk ^Tl ""RM it Rl Rt 3R^ 3RT Rl Rll Rl Rt "?R RIrR RIRt R^I % ^RIR opt ijfb RloTRTJfnTR^I

The text on this page is estimated to be only 10.25% accurate

yohl^M o||oH 22:18-21 1476 ^r?I f : ^mf 3 ^ ^fif *ft ^=r' ^® *ft aftr 3TFfRlt^^T3n! 21'R'R:%T'Efil3RJ!? ^%^T8TT|! 3TFTRI

License Agreement for Bible Texts World Bible Translation Center Last Updated: September 2 1, 2006 Copyright© 2006 by World Bible Translation Center All rights reserved. These Scriptures: • Are copyrighted by World Bible Translation Center. • Are not public domain. • May not be altered or modified in any form. • May not be sold or offered for sale in any form. • May not be used for commercial purposes (including, but not limited to, use in advertising or Web banners used for the purpose of selling online add space). • May be distributed without modification in electronic form for non-commercial use. However, they may not be hosted on any kind of server (including a Web or ftp server) without written permission. A copy of this license (without modification) must also be included. • May be quoted for any purpose, up to 1 ,000 verses, without written permission. However, the extent of quotation must not comprise a complete book nor should it amount to more than 50% of the work in which it is quoted. A copyright notice must appear on the title or copyright page using this pattern: "Taken from the HOLY BIBLE: EASY-TO-READ VERSION™ © 2006 by World Bible Translation Center, Inc. and used by permission." If the text quoted is from one ofWBTC's non-English versions, the printed title of the actual text quoted will be substituted for "HOLY BIBLE: EASY-TO-READ VERSION™." The copyright notice must appear in English or be translated into another language. When quotations from WBTC's text are used in non-saleable media, such as church bulletins, orders of service, posters, transparencies or similar media, a complete copyright notice is not required, but the initials of the version (such as "ERV" for the Easy-to-Read Version™ in English) must appear at the end of each quotation. Any use of these Scriptures other than those listed above is prohibited. For additional rights and permission for usage, such as the use ofWBTC's text on a Web site, or for clarification of any of the above, please contact World Bible Translation Center in writing or by email at distribution(5)wbtc.com. World Bible Translation Center P.O. Box 820648 FortWorth.Texas 76182, USA Telephone: I -8 1 7-595- 1 664 Toll-Free in US: I -888-54-BIBLE E-mail: info(5)wbtc.com WBTC'S web site - World Bible Translation Center's web site: http://www.wbtc.org Order online - To order a copy of our texts online, go to: http://www.wbtc.org Current license agreement - This license is subject to change without notice. The current license can be found at: http://www.wbtc.org/downloads/biblelicense.htm Trouble viewing this file - If the text in this document does not display correctly, use Adobe Acrobat Reader 5.0 or higher. Download Adobe Acrobat Reader from: http://www.adobe.com/products/acrobat/readstep2.html Viewing Chinese or Korean PDFs - To view the Chinese or Korean PDFs, it may be necessary to download the Chinese Simplified or Korean font pack from Adobe. Download the font packs from: http://www.adobe.com/products/acrobat/acrrasianfontpack.html